Distance along long edge (mm)

10 20 30 40 50 60

Short edge (mm)

2 4 6 8 10 12 14 16

Surface height (microns)

-500

-400

-300

-200

-100 0 assembled pixel module 513029

Flatness surface contour of

Meas. Surface Height - Flat Plane Fit (microns)

-60 -40 -20 0 20 40 60 0

0.5

1

1.5

2

2.5

3

3.5

4

Residuals of fit to flat plane h1

Entries 27

Mean -5.045e-005

RMS 17.19

Underflow 0

Overflow 0

Residuals of fit to flat plane