XEF Calibration Run: 155641

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

0_L^R

1_L^R

2_L^R

3_L^R

4_L^R

5_L^R

6_L^R

7_L^R

8 L^R

9_L^R

10_L^R

11_L^R

12_L^R

13_L^R

14_L^R

15_L^R

16_L^R

17_L^R

18_L^R

19_L^R

20_L^R

21 L^R

22_L^R

23_L^R

Wedge

0 0 1 1 2 2 3 3 4 4 5 5 6 6 7 7 8 8 9 9 East West Tower

Raw PMT counts

0

10

20

30

40

50

0_L^R

1_L^R

2_L^R

3_L^R

4_L^R

5_L^R

6_L^R

7_L^R

8 L^R

9_L^R

10_L^R

11_L^R

12_L^R

13_L^R

14_L^R

15_L^R

16_L^R

17_L^R

18_L^R

19_L^R

20_L^R

21 L^R

22_L^R

23_L^R

Wedge

0 0 1 1 2 2 3 3 4 4 5 5 6 6 7 7 8 8 9 9 East West Tower

Normalised PMT counts

Raw PMT counts

0 2000 4000 6000 80001000012000140001600018000200002200024000 frequency

0 10 20 30 40 50 60 70 80 90

hispmt Entries 960 Mean 5240 RMS 3198 Underflow 0 Overflow 0

Raw PMT counts hispmt

Normalised PMT counts

0 10 20 30 40 50 60 frequency

0

20

40

60

80

100 hisrat Entries 960 Mean 10.88 RMS 6.89 Underflow 0 Overflow 0

Normalised PMT counts hisrat