X GA 10 lines terminate GB 10 lines terminate

GC 10 lines terminate

3/ 4" 3/ 4"

3/ 4" 3/ 4"

Elevator

E781 Proton Center
Layout

      W

      E

S N SCA LE:   1 inch =10 Feet
                                 1 cm   = 1.20 m
 Gas House

                    J. Lach   M ay 10, 1993
                    H-460R2

P1 HL1 P1 1/ 2 P2 P3 TRD/ HV/ SIG P4 P5

PE

PC3 AN

Hyp e ro n Ta rg e t t ing Ma g ne t 6 0 0 Ge V/ c

HYPE
1

PC3TGT

   PC3W C4
      (0.5m m  XY)
      Non Magnetic

CWS Work Are a

C. C. #74

C. C. #75 x3419 x3361 x4988

x3361 x3419 x3361 x3419

LS 1-3

X

X X GD 10 lines terminate

40 - 1/ 4 inch Cu tubes in 10 bundles

Solenoid & shutoff valves as needed

Vent 3 feet above building tee and screen on bottom

V ee
B

                 V ee
                 C

Pho t o n 2

2 0 in

t a rg e t , ve rt e x re g io n

M
1

Pho t o n 1

S1 S2 DC, PWC TRD

M 2

1 0 in DC PWC

HOD1

HOD2

TRD

V ee
A

Ring-Im aging Cherenkov

la m b d a d e c a y c ha m b e rs

V et
o

       neutron
       calorim ete
       r

Phot on 3

                                                                                                           M
                                                                                                           3_{2 0 in}

PC3 PC4