ObjectMon #2 TimeMonitor HADTDC Timing

Run:192987 Event: 774580 # of Events:13975 Time: Thu Jan 27 09:56:57 2005 Ref.Run:191783

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 80125

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580 590

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 83723 Mean 569.5 RMS 7.285

CHA: Raw Time /ndf= 8 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 83723 Mean 55.42 RMS 2.614

CHA: Hit Width

/ndf= 2.5 (<17) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 100858

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

Entries 135542 Mean 562.2 RMS 5.931

PHA: Raw Time /ndf= 7.3 (<18) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 135542 Mean 56.92 RMS 2.664

PHA: Hit Width

/ndf= 4.9 (<18) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 26298 Mean 1.84 RMS 0.6821

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

Entries 28252 Mean 566.5 RMS 7.773

WHA: Raw Time /ndf= 2 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

4000

RawWidthWHA Entries 28252 Mean 54.29 RMS 2.618

WHA: Hit Width /ndf= 3.9 (<15) 2χ GOOD