YMon #66 EMT EMT Summary Plots

Run:185072 Event: 3732014 # of Events:12613 Time: Mon Jul 12 12:40:29 2004

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.05 0.1 0.15 0.2 0.25 0.3

12613 events

EMT Leading Edge Time Distribution

0 200 400 600 800 1000

1200

1400

1600

Tower (Eta) ID

-18 -17 -16 -15 -14 -13 -12 -11-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18

Wedge (Phi) ID

0 2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 36 38 40 42 44 46 48 12613 Events

0 0^1

1 0^1

2 0^1

3 0^1

4 0^1

5 0^1

6 0^1

7 0^1

8 0^1

9 0^1

10 0^1

11 0^1

12 0^1

13 0^1

14 0^1

15 0^1

16 0^1

17 0^1

18 0^1

19 0^1

20 0^1

21 0^1

22 0^1

23 0^1

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9

-9 10

-10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT Leading Edge Time Distribution