0 100 200 300 400 500 600 700

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 CEM eta,phi Nent = 721 Mean x = 10.02 Mean y = 0.008322 RMS x = 0.3156 RMS y = 0.1578

Et tower in DCAS != ADMEM: Em E

0

1000

2000

3000

4000

5000

2x10

Et ADMEM

0 50 100 150 200 250 300 350 400 450 500

Et ADMEM - DCAS

-10 -8 -6 -4 -2 0 2 4 6 8 10 CEM trigger tower Nent = 495360 Mean x = 0.8326 Mean y = -0.001451 RMS x = 3.926 RMS y = 0.03807

ADMEM-DCAS vs ADMEM Et: Em

0

10

20

30

40

50

60

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 CHA eta,phi Nent = 119 Mean x = 16.18 Mean y = 2.773 RMS x = 4.994 RMS y = 3.441

Et tower in DCAS != ADMEM: Had E

0

1000

2000

3000

4000

5000

2x10

Et ADMEM

0 50 100 150 200 250 300 350 400

Et ADMEM - DCAS

-10 -8 -6 -4 -2 0 2 4 6 8 10 CHA trigger tower Nent = 495360 Mean x = 0.4449 Mean y = 0.0003553 RMS x = 2.694 RMS y = 0.02436

ADMEM-DCAS vs ADMEM Et: Had

TrigMon #94 L1TriggerMonitor DCAS-ADMEM trig towers comparisons Run:138611 Event: 112886 # of Events:860 Time: Thu Feb 7 10:07:03 2002