htemp

Entries 37642 Mean 11.14 RMS 23.91 / ndf

2χ 1203 / 40 p0 0.01849 ± -1.095 p1 0.001305 ± 0.7262

0 100 200 300 400 500 600 700 800 900 0 100 200 300 400 500 600 700

± ±

pe_reroot:pe_photon