Tracking Status

Tracking 4.8.x status

• 4.8.3 or 4.8.4

– All mentioned before – Bug found in COT HL tracking beam spot code: reverted to no beam spot code • 4.8.4

– Refitter update to include small angle stereo alignment constants will be reverted out – Crashes fixed in silicon simulation:

Uninitialized variables and math exceptions • In progress

– Standalone tracking lower memory consumption code: done – Fitter crashes due to very high momentum tracks(1TeV tracks): done – COT refit code with different options for the input z vertex: done – Final COT scaling parameters: in testing

– Working HL beam spot code: in testing – Refitter update to include small angle stereo alignment constants: in testing – Small bias in impact parameter of fit code and hysteresis in multiple fits: under investigation

Release Status

Production, Farms and Releases

• 4.8.3 released

– Reprocessing started: Stream A done and Stream H half done – HL fixed for all but stream A – Still working on fix to make concatenator faster.

• 4.8.4 in pre release phase: 4.8.4pre2

– 4.8.3 with new simulation code integrated – Currently: fixing bugs – One more week?

• Integration release

– Next integration release: 4.8.4int1 – Need to finish 4.8.4