ObjectMon #2 TimeMonitor HADTDC Timing

Run:193167 Event: 732556 # of Events:16271 Time: Thu Feb 3 15:36:36 2005 Ref.Run:191783

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 110241

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580 590

Events

0 1000

2000

3000

4000

5000

6000

Entries 116465 Mean 569.6 RMS 7.308

CHA: Raw Time /ndf= 13 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 116465 Mean 55.44 RMS 2.638

CHA: Hit Width /ndf= 9 (<17) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 158629

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

Entries 237906 Mean 562.2 RMS 5.847

PHA: Raw Time /ndf= 18 (<20) 2χ GOOD

Width [ns]

50 55 60

Events

5000

Entries 237906 Mean 57.02 RMS 2.604

PHA: Hit Width

/ndf= 7.6 (<20) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 37644 Mean 1.841 RMS 0.6813

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 40786 Mean 566.6 RMS 7.633

WHA: Raw Time /ndf= 3.9 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

RawWidthWHA Entries 40786 Mean 54.28 RMS 2.646

WHA: Hit Width /ndf= 4.8 (<15) 2χ GOOD