ObjectMon #92 MuonMonitor Slide Show

Run:185248 Event: 10094832 # of Events:126235 Time: Sat Jul 17 00:07:47 2004 Ref.Run:1852015

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 500 1000

1500

2000

Entries 78799

=0.95 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 500 1000

1500

2000

2500

Entries 78799

Mean -0.8689

= 1 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 2000

4000

6000

8000

10000

12000

Entries 78799 Mean -0.01128 RMS 8.708

= 1.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

500

1000

Entries 37681

= 1.3 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 2000

4000

6000

8000

10000

12000

Entries 103819

Mean 0.0063

= 2 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

Entries 37681 Mean 0.02252 RMS 12.47

=0.89 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500 Entries 14444

= 1 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 200 400 600 800 1000

1200

Entries 14444 Mean 3.022

= 1.3 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 500 1000

1500

2000

2500

3000

Entries 14444 Mean 0.1216 RMS 12.81

= 1.1 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:185248 Event: 10094832 # of Events:126235 Time: Sat Jul 17 00:07:47 2004 Ref.Run:1852017

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 50 100 150 200 250 300 Entries 7543

= 1.2 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 200 400 600 800 1000

Entries 7543

Mean -41.59

= 1.2 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400

Entries 7543 Mean -0.04166 RMS 30

= 1.3 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10 10^2

10^3

10^4

Entries 103819 Mean 2.561 RMS 1.842

= 13 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:185248 Event: 10094832 # of Events:126235 Time: Sat Jul 17 00:07:47 2004 Ref.Run:1852014

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

500

1000

1500

Entries 78799 Mean 180.3 RMS 103.6

= 1 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 1000

2000

3000

4000

5000

Entries 78799 Mean -0.00357 RMS 0.354

= 1.1 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 2000

4000

6000

8000

10000

12000

Entries 78799 Mean -0.01128 RMS 8.708

= 1.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800 1000

Entries 37681 Mean 178.5 RMS 103.5

= 1.1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 500 1000

1500

2000

2500

Entries 37681 Mean -0.000126 RMS 0.3111

= 1.3 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

Entries 37681 Mean 0.02252 RMS 12.47

=0.89 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 14444 Mean 168.7 RMS 105.9

= 1.3 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 200 400 600 800 1000

1200

Entries 14444 Mean 0.008556 RMS 0.8651

= 1.2 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 500 1000

1500

2000

2500

3000

Entries 14444 Mean 0.1216 RMS 12.81

= 1.1 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:185248 Event: 10094832 # of Events:126235 Time: Sat Jul 17 00:07:47 2004 Ref.Run:1852015

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10 10^2

10^3

10^4

Entries 103819 Mean 2.561 RMS 1.842

= 13 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 10 10^2

10^3

10^4

Entries 102596 Mean 1.012 RMS 1.057

= 12 (> 3) 2χ Number of Muons