ObjectMon #2 TimeMonitor HADTDC Timing

Run:183491 Event: 3248302 # of Events:27827 Time: Sun May 30 21:17:24 2004 Ref.Run:183209

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 216150

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

Entries 237119 Mean 565 RMS 7.047

CHA: Raw Time /ndf= 7.9 (<20) 2χ GOOD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

Entries 237119 Mean 55.35 RMS 2.531

CHA: Hit Width

/ndf= 4.8 (<20) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 161360

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

12000

Entries 201952 Mean 560.2 RMS 6.123

PHA: Raw Time /ndf= 10 (<19) 2χ GOOD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

Entries 201952 Mean 56.91 RMS 2.666

PHA: Hit Width

/ndf= 6.7 (<19) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 70745 Mean 1.686 RMS 0.7632

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

Entries 81964 Mean 562.9 RMS 8.05

WHA: Raw Time /ndf= 3.5 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

RawWidthWHA Entries 81964 Mean 54.21 RMS 2.94

WHA: Hit Width /ndf= 2.1 (<17) 2χ GOOD