CBM 92-10

Early Identification of Hearing Impairment in

Infants and Young Children

January 1988 through December 1992

861 Citations

Prepared by

Lori J. Klein, M.A.L.S., National Library of Medicine

Lynn E. Huerta, Ph.D., National Institute on Deafness and Other Communication Disorders

U.S. DEPARTMENT OF HEALTH

AND HUMAN SERVICES

Public Health Service

National Institutes of Health

National Library of Medicine

Reference Section

8600 Rockville Pike

Bethesda, Maryland 20894

1992

SERIES NOTE

Current Bibliographies in Medicine (CBM) is a continuation in part of the National Library of Medicine’s

Literature Search Series, which ceased in 1987 with No. 87-15. In 1989 it also subsumed the Specialized

Bibliography Series. Each bibliography in the new series covers a distinct subject area of biomedicine and

is intended to fulfill a current awareness function. Citations are usually derived from searching a variety

of online databases. NLM databases utilized include MEDLINE

�

, AVLINE

�

, BIOETHICSLINE

�

,

CANCERLIT

�

, CATLINE

�

, HEALTH, POPLINE

�

and TOXLINE

�

. The only criterion for the inclusion

of a particular published work is its relevance to the topic being presented; the format, ownership, or

location of the material is not considered.

Comments and suggestions on this series may be addressed to:

Karen Patrias, Editor

Current Bibliographies in Medicine

Reference Section

National Library of Medicine

Bethesda, MD 20894

301/496-6097

Ordering Information:

Current Bibliographies in Medicine is sold by the Superintendent of Documents, U.S. Government Printing

Office, Washington, D.C. 20402. To order the entire CBM series for the calendar year 1992 (approx. 14

bibliographies), send $41.00 ($51.25 foreign) to the Superintendent of Documents citing GPO List ID:

CBM92. For your convenience an order blank is given inside the back cover. Orders for individual

bibliographies in the series ($3.25, $4.06 foreign) should be sent to the Superintendent of Documents citing

the title, CBM number, and the GPO List ID given above.

Use of funds for printing this periodical has been approved by the Director

of the Office of Management and Budget through September 30, 1993.

EARLY IDENTIFICATION OF HEARING IMPAIRMENT

IN INFANTS AND YOUNG CHILDREN

There is a clear need in the United States for improved methods and models for the early identification of

hearing impairment in infants and young children. Approximately 1 out of every 1000 children is born deaf.

Many more are born with less severe degrees of hearing impairment, while others develop hearing

impairment during childhood. Reduced hearing acuity during infancy and early childhood interferes with

the development of speech and language skills. Although less well documented, reduced auditory input also

adversely affects the developing auditory nervous system and can have harmful effects on social, emotional,

cognitive, and academic development, as well as on a person’s vocational and economic potential.

Moreover, delayed identification and management of severe to profound hearing impairment may impede

the hearing-impaired child’s ability to adapt to life in a hearing world or to prepare for life in the hearing-

impaired community.

The critical period for language and speech development is generally regarded as the first two years of life,

and, although there are several methods of identifying hearing impairments during the first year of life, the

average age of identification in the U.S. remains close to three years. Lesser degrees of hearing loss may

go undetected even longer. The result is that for many hearing-impaired infants and young children, much

of the critical language and speech learning period is lost. There is general agreement that hearing

impairment should be recognized as early in life as possible, so that the remediation process can take full

advantage of the plasticity of the developing sensory systems.

Infant hearing screening has been attempted with a number of different test methods, including cardiac

response audiometry, respiration audiometry, alteration of sucking patterns, movement or startle in response

to auditory stimuli, various behavioral paradigms, measurement of acoustic reflexes, and more recently,

auditory brain stem response (ABR) audiometry. In addition, attention has recently turned to the

measurement of otoacoustic emissions, which shows promise as a fast, inexpensive, noninvasive test of

cochlear function. Each method is effective in its own way, but technical or interpretative limitations have

impeded widespread application. Moreover, these approaches vary widely in their sensitivity, specificity,

and predictive efficiency in identifying hearing impairment.

Today, most neonatal screening programs are focused on infants who satisfy one or more of a number of

criteria for inclusion in a "high-risk registry." The preferred screening test method has come to be ABR,

combined with audiologic follow-up for those infants who fail the screening protocols. Despite the relatively

good predictive efficiency of ABR, its cost, time requirements, and technical difficulties have discouraged

the general application of this method in screening the far larger newborn population not meeting the high-

risk registry criteria. Using the high risk registry approach misses approximately 50 percent of infants with

hearing impairments. Consensus on a unified approach to early identification has also been delayed by the

scarcity of data on the relative sensitivity, specificity, predictive efficiency, and cost effectiveness of the

hearing screening techniques currently used to identify hearing impairments in infants and young children.

This bibliography was prepared in support of the National Institutes of Health Consensus Development

Conference on the Early Identification of Hearing Impairment in Infants and Young Children held March

1-3, 1993 on the NIH campus in Bethesda, Maryland. The purpose of the consensus conference was to reach an agreement on the following questions: which children should have their hearing screened or tested and

at what age; which methods and models are preferred for identifying hearing impairment in infants and

young children; and what are the key areas for future research. The bibliography surveys the literature on

topics pertaining to the early identification of hearing impairment in human infants and young children

published between January 1988 and December 1992. Literature on rare or relatively rare medical conditions

involving hearing loss are not included, nor are animal studies. Journal articles are divided by subject area,

and a reference can appear under more than one subject, with the exception that articles dealing with

otoacoustic emissions (which may also discuss other methods) are listed only under otoacoustic emissions.

Letters, editorials, news, and articles on developmental problems are selectively included, and literature on

otoacoustic emissions is more comprehensively included than literature on other methods. Books (including

book chapters) and audiovisuals are listed separately by format and are not included in the subject

categories.

Special thanks to Ralph F. Naunton, M.D., for his assistance in the preparation of this bibliography.

SEARCH STRATEGY

A variety of online databases are usually searched in preparing bibliographies in the CBM series. To assist

you in updating or otherwise manipulating the material in this search, the strategy used for the NLM’s

MEDLINE database is given below. Please note that the search strategies presented here differ from

individual demand searches in that they are generally broadly formulated and irrelevant citations edited out

prior to printing.

SS 1 = SUBS APPLY PC, CL, ET

SS 1 = EXP *EAR DISEASES

SS 2 = SUBS CANCEL

SS 2 = (TW) DEAFNESS OR DEAF OR HEARING

SS 3 = EXP HEARING TESTS OR EXP EVOKED POTENTIALS, AUDITORY OR

EXP AUDITORY PERCEPTION

SS 4 = NEONATAL SCREENING

SS 5 = RISK FACTORS OR ALL MODEL# (TW) OR SCREENING (TW) OR

DECISION SUPPORT TECHNIQUES

SS 6 = 2 AND 4 OR 3 AND 4

SS 7 = 3 AND 2 OR 2 AND 5

SS 8 = 1 OR 7 OR EXP HEARING DISORDERS

SS 9 = EXP INFANT OR CHILD, PRESCHOOL

SS 10 = 8 AND 9

SS 11 = 10 OR 6

GRATEFUL MED

�

To make online searching easier and more efficient, the Library offers GRATEFUL MED, microcomputer-

based software that provides a user-friendly interface to most NLM databases. This software was

specifically developed for health professionals and features multiple choice menus and "fill in the blank"

screens for easy search preparation. GRATEFUL MED runs on an IBM PC (or IBM-compatible) with DOS

2.0 or a Macintosh, and requires a Hayes (or Hayes-compatible) modem. It may be purchased from the

National Technical Information Service in Springfield, Virginia, for $29.95 (plus $3.00 per order for

shipping). For your convenience, an order blank has been enclosed at the back of this bibliography.

SAMPLE CITATIONS

Citations in this bibliographic series are formatted according to the rules established for Index Medicus

�

*.

Sample journal and monograph citations appear below. For journal articles written in a foreign language,

the English translation of the title is placed in brackets; for monographs, the title is given in the original

language. In both cases the language of publication is shown by a three letter abbreviation appearing at the

end of the citation. Note also that a colon (:) may appear within an author’s name or article title. The

NLM computer system automatically inserts this symbol in the place of a diacritical mark.

Journal Article:

Authors Article Title

Tucker SM, Bhattacharya J. Screening of hearing impairment in the newborn using the auditory

response cradle. Arch Dis Child 1992 Jul;67(7):911-9.

Abbreviated Journal Date Volume Issue Pages

Title

Monograph:

Authors/Editors Title

Fritsch, Michael H.; Sommer, Annemarie. Handbook of congenital and early onset hearing loss.

New York: Igaku-Shoin; 1991. 170 p.

Place of Publisher Date Total No.

Publication of Pages

_________________________________

*For details of the formats used for references, see the following publication:

Patrias, Karen. National Library of Medicine recommended formats for bibliographic citation.

Bethesda (MD): The Library; 1991 Apr. Available from: NTIS, Springfield, VA; PB91-182030.

TABLE OF CONTENTS

page

Taxonomy/Epidemiology 1

Developmental Issues in Early Hearing Impairment 9

Methodology, Instrumentation, and Personnel

Auditory Brainstem Response (ABR) 14

Otoacoustic Emissions (OAE) 20

High Risk Register/Other Risk Factors 23

Other (e.g. Behavioral Methods, Immittance Measures, 34

Developmental Measures)

Models/Programs for Early Identification and Follow-up 40

Other 43

Books and Book Chapters 45

Audiovisuals 48

TAXONOMY/EPIDEMIOLOGY

Adler SP. Cytomegalovirus and pregnancy. Curr Opin

Obstet Gynecol 1992 Oct;4(5):670-5.

Alho OP, Koivu M, Sorri M, Rantakallio P. Risk factors

for recurrent acute otitis media and respiratory

infection in infancy. Int J Pediatr Otorhinolaryngol

1990;19(2):151-61.

Anagnostakis D, Messaritakis J. Hearing loss in

high-risk neonates [letter]. J Pediatr 1990 Feb;

116(2):316. Comment on: J Pediatr 1989 May;

114(5):847-52.

Andersen E, Fledelius HC, Fns M, Haugsted R. An

epidemiological study of disability in 4-year-old

children from a birth cohort in Frederiksborg

County, Denmark. Dan Med Bull 1990 Apr;37(2):

182-5.

Arnos KS, Israel J, Devlin L, Wilson MP. Genetic

counseling for the deaf. Otolaryngol Clin North Am

1992 Oct;25(5):953-71.

Augustsson I, Nilson C, Engstrand I. [Is auditory

screening of 4-year old children a good method for

locating serous otitis which demands treatment?]

Lakartidningen 1988 Mar 30;85(13):1134-7. (Swe).

Augustsson I, Nilson C, Engstrand I. The preventive

value of audiometric screening of preschool and

young school-children. Int J Pediatr

Otorhinolaryngol 1990 Sep;20(1):51-62.

Baart de la Faille LM. Validity of large scale

standardised behavioural screening. Acta

Otolaryngol Suppl (Stockh) 1991;482:94-101;

discussion 102.

Baker RC. Pitfalls in diagnosing acute otitis media.

Pediatr Ann 1991 Nov;20(11):591-3, 596-8.

Comment in: Pediatr Ann 1992 Apr;21(4):212, and

Pediatr Ann 1992 Apr;21(4):213.

Bakht FR, Gentry LO. Toxoplasmosis in pregnancy: an

emerging concern for family physicians. Am Fam

Physician 1992 Apr;45(4):1683-90.

Barnett ED, Klein JO, Pelton SI, Luginbuhl LM. Otitis

media in children born to human immunodeficiency

virus-infected mothers. Pediatr Infect Dis J 1992

May;11(5):360-4.

Bendel J, Palti H, Winter S, Ornoy A. Prevalence of

disabilities in a national sample of 3-year-old Israeli

children. Isr J Med Sci 1989 May;25(5):264-70.

Biering-Srensen M, Biering-Srensen K, Kaufmann B.

[Follow-up of children screened at 4 years of age

through school age with particular attention the

evaluation of speech function]. Ugeskr Laeger 1989

May 15;151(20):1240-4. (Dan).

Birkebaek NH, Tommerup BE. [Hearing loss among

premature and full-term infants in Rinkobing county.

Results of tone and speech audiometry]. Ugeskr

Laeger 1991 Jan 7;153(2):107-9. (Dan).

Bluestone CD. Otitis media and congenital

perilymphatic fistula as a cause of sensorineural

hearing loss in children. Pediatr Infect Dis J 1988

Nov;7(11 Suppl):S141-5.

Bock GR, Iurato S. EEC hearing impairment

programme: collaboration in Europe, 1974-1988.

ORL J Otorhinolaryngol Relat Spec 1988;50(6):

349-54.

Bresson K. [Hearing loss in premature infants (letter)].

Ugeskr Laeger 1991 Feb 25;153(9):668-9. (Dan).

Brookhouser PE, Auslander MC, Meskan ME. The

pattern and stability of postmeningitic hearing loss

in children. Laryngoscope 1988 Sep;98(9):940-8.

Brookhouser PE, Worthington DW, Kelly WJ. Unilateral

hearing loss in children. Laryngoscope 1991

Dec;101(12 Pt 1):1264-72.

Brown J, Watson E, Alberman E. Screening infants for

hearing loss. Arch Dis Child 1989 Oct;64(10):

1488-95.

Bubalo FS, Davidson DD. Recent developments in

hereditary nephritis (Alport’s syndrome). Indiana

Med 1991 Dec;84(12):860-6.

Buren M, Solem BS, Laukli E. Threshold of hearing

(0.125 20 kHz) in children and youngsters. Br J

Audiol 1992;26(1):23-31.

Burke P. Otitis media with effusion: is medical

management an option? J R Coll Gen Pract 1989

Sep;39(326):377-82. Comment in: J R Coll Gen

Pract 1989 Nov;39(328):478.

Cantani A. Genetic causes of hearing loss in children.

Padiatr Padol 1989;24(4):321-30.

Carter BS, Wilkening RB. Prevention of hearing

disorders: neonatal causes of hearing loss. Semin

Hear 1991;12(2):154-67.

Carzoli RP. Infant hearing impairment screening. Risk

factors and testing. J Fla Med Assoc 1991 Mar;

78(3):163-7.

Chaloupkova J, Kollar A. [Auditory function in children

and adolescents with diabetes mellitus]. Sb Lek

1990 Jul;92(6-7):219-23. (Cze).

Chan LP. Hearing loss and hearing aids: the Singapore

School for the Deaf experience. Ann Acad Med

Singapore 1991 Sep;20(5):628-32.

Charuvanij A, Visudhiphan P, Chiemchanya S, Tawin C.

Sensorineural hearing loss in children recovered

from purulent meningitis: a study in Thai children at

Ramathibodi Hospital. J Med Assoc Thai 1990

May;73(5):253-7.

Chaurasia MK, Geddes NK. An analysis of the

aetiology of early childhood deafness. Clin

Otolaryngol 1991 Jun;16(3):280-4.

Cohen BA, Schenk VA, Sweeney DB.

Meningitis-related hearing loss evaluated with

evoked potentials. Pediatr Neurol 1988 Jan-Feb;

4(1):18-22.

Conijn EA, Van der Drift JF, Brocaar MP, Van Zanten

GA. Conductive hearing loss assessment in children

with otitis media with effusion. A comparison of

pure tone and BERA results. Clin Otolaryngol 1989

Apr;14(2):115-20.

Couillault M. Ear trouble (part 1). N Z Nurs J 1990

Dec-1991 Jan;83(11):20-2.

Cremers CW, Graham J, Parving A, Ruben RJ. Biology

of sensorineural hearing loss in children. Report of

symposium held in Holte, Denmark, 14-17 June,

1987. Int J Pediatr Otorhinolaryngol

1988;15(1):1-15.

Cremers CW, van Rijn PM. Acquired causes of deafness

in childhood. Ann N Y Acad Sci 1991;

630:197-202.

Cremers CW, van Rijn PM, Admiraal RJ. [Meningitis as

cause of prelingual deafness (letter)]. Ned Tijdschr

Geneeskd 1989 Aug 5;133(31):1562-3. (Dut).

Cremers CW, van Rijn PM, Hageman MJ. Prevention of

serious hearing impairment of deafness in the young

child. J R Soc Med 1989 Aug;82(8):484-7.

Czeizel A, Skirpeczky K, Mester E, Sankaranarayanan

K. The load of genetic and partially genetic disease

in man. IV. Severe visual handicaps and profound

childhood deafness in Hungarian school-age

children. Mutat Res 1992 Nov 16;270(2):103-14.

Da Silva EO. Waardenburg I syndrome: a clinical and

genetic study of two large Brazilian kindreds, and

literature review. Am J Med Genet 1991;40(1):

65-74.

Daly K, Giebink GS, Le CT, Lindgren B, Batalden PB,

Anderson RS, Russ JN. Determining risk for chronic

otitis media with effusion. Pediatr Infect Dis J

1988;7(7):471-5.

Das VK. Adverse perinatal factors in the causation of

sensorineural hearing impairment in young children.

Int J Pediatr Otorhinolaryngol 1991 Apr;21(2):

121-5.

Das VK. Aetiology of bilateral sensori neural deafness

in children. Scand Audiol Suppl 1988;30:43-52.

Das VK. Aetiology of bilateral sensorineural deafness in

children. J Laryngol Otol 1988 Nov;102(11):

975-80.

Das VK. Prevalence of otitis media with effusion in

children with bilateral sensorineural hearing loss.

Arch Dis Child 1990 Jul;65(7):757-9.

Davidson J, Hyde ML, Alberti PW. Epidemiologic

patterns in childhood hearing loss: a review. Int J

Pediatr Otorhinolaryngol 1989 Jul;17(3):239-66.

Davidson J, Hyde ML, Alberti PW. Epidemiology of

hearing impairment in childhood. Scand Audiol

Suppl 1988;30:13-20.

Davies B. Auditory disorders in Down’s syndrome.

Scand Audiol Suppl 1988;30:65-8.

Davis A, Wood S. The epidemiology of childhood

hearing impairment: factor relevant to planning of

services. Br J Audiol 1992 Apr;26(2):77-90.

Dawson JA, Wardle R. Detection and prevalence of

hearing loss in a cohort of children following

serogroup B, meningococcal infection 1983-1987.

Public Health 1990 Mar;104(2):99-102.

Dawson KP, Abbott GD, Mogridge N. Bacterial

meningitis in childhood: a 13 year review. N Z Med

J 1988 Nov 9;101(857):758-60.

De Melker RA, Burke PD. Epidemiology of otitis media

and the role of the general practitioner in

management. Fam Pract 1988;5(4):307-13.

Debruyne F. [Congenital malformations of the stapes

area]. Acta Otorhinolaryngol Belg 1988;42(6):

716-9. (Dut).

Derkay CS, Bluestone CD, Thompson AE, Kardatske D.

Otitis media in the pediatric intensive care unit: a

prospective study. Otolaryngol Head Neck Surg

1989;100(4):292-9.

Devilat M, Tosso M, Espinoza N, Mellado L, Thick E,

Rimasa A. [Auditory brainstem evoked potentials in

hearing loss after bacterial meningitis]. Rev Chil

Pediatr 1990 Sep-Oct;61(5):258-61. (Spa).

Dias O, Andrea M. Childhood deafness in

Portugal--aetiological factors and diagnosis of

hearing loss. Int J Pediatr Otorhinolaryngol 1990

Jan;18(3):247-55.

Dietrich KN, Succop PA, Berger OG, Keith RW. Lead

exposure and the central auditory processing

abilities and cognitive development of urban

children: the Cincinnati Lead Study cohort at age 5

years. Neurotoxicol Teratol 1992 Jan-Feb;14(1):

51-6.

Dirksen WJ. [Results of Ewing screening and the chance

of otitis media with effusion in early childhood

(letter)]. Ned Tijdschr Geneeskd 1989 Sep

30;133(39):1950. (Dut).

Doyle LW, Keir E, Kitchen WH, Ford GW, Rickards

AL, Kelly EA. Audiologic assessment of extremely

low birth weight infants: a preliminary report.

Pediatrics 1992 Nov;90(5):744-9.

Eight-year outcome in infants with birth weight of 500

to 999 grams: continuing regional study of 1979 and

1980 births. Victorian Infant Collaborative Study

Group. J Pediatr 1991 May;118(5):761-7.

Elango S, Purohit GN, Hashim M, Hilmi R. Hearing

loss and ear disorders in Malaysian school children.

Int J Pediatr Otorhinolaryngol 1991;22(1):75-80.

Epstein S, Reilly JS. Sensorineural hearing loss. Pediatr

Clin North Am 1989 Dec;36(6):1501-20.

Figueras Aloy J, Botet Mussons F, Jimenez Gonzalez R.

[Pattern of survival and sequelae in very low birth

weight infants]. An Esp Pediatr 1990 Dec;

33(6):542-8. (Spa).

Fortnum HM. Hearing impairment after bacterial

meningitis: a review. Arch Dis Child 1992 Sep;

67(9):1128-33.

Foulke FG, Reeb KG, Graham AV, Zyzanski SJ. Family

function, respiratory illness, and otitis media in

urban black infants. Fam Med 1988;20(2): 128-32.

Francois M, Marie P, Narcy P. [Detection and treatment

of deafness in children]. Rev Prat 1990 Sep

1;40(19):1733-7. (Fre).

Freij BJ, South MA, Sever JL. Maternal rubella and the

congenital rubella syndrome. Clin Perinatol 1988

Jun;15(2):247-57.

Froom J, Culpepper L. Otitis media in day-care children.

A report from the International Primary Care

Network. J Fam Pract 1991 Mar;32(3): 289-94.

Furukawa CT. Conductive hearing loss and speech

development. J Allergy Clin Immunol 1988 May;

81(5 Pt 2):1015-20.

Ganga N, Rajagopal B, Rajendran S, Padmanabhan AS.

Deafness in children--an analysis. Indian Pediatr

1991 Mar;28(3):273-6.

Gates GA, Northern JL, Ferrer HP, Jerger J, Marchant

CD, Fiellau-Nikolajsen M, Ranney JB, Renvall U,

Ruben RJ, Stewart I, et al. Recent advances in otitis

media. Diagnosis and screening. Ann Otol Rhinol

Laryngol Suppl 1989 Apr;139:39-41.

Gerber SE. Review of a high risk register for congenital

or early-onset deafness. Br J Audiol 1990

Oct;24(5):347-56.

Gerhardt KJ. Prenatal and perinatal risks of hearing loss.

Semin Perinatol 1990 Aug;14(4):299-304.

Goycoolea HG, Goycoolea MV, Farfan CR. Racial and

familial factors in otitis media. A point prevalence

study on Easter Island. Arch Otolaryngol Head Neck

Surg 1988;114(2):147-9.

Gravel JS, McCarton CM, Ruben RJ. Otitis media in

neonatal intensive care unit graduates: a 1-year

prospective study. Pediatrics 1988 Jul;82(1):44-9.

Gravel JS, McCarton CM, Ruben RJ. A prospective

study of otitis media in infants born at very-low

birthweight. Acta Otolaryngol (Stockh) 1988

May-Jun;105(5-6):516-21.

Grogaard JB, Lindstrom DP, Parker RA, Culley B,

Stahlman MT. Increased survival rate in very low

birth weight infants (1500 grams or less): no

association with increased incidence of handicaps.

J Pediatr 1990 Jul;117(1 Pt 1):139-46. Comment in:

J Pediatr 1991 Feb;118(2):322-3.

Hakansson A. Health complaints and drug consumption

during the first 18 months of life. Fam Pract 1989;

6(3):210-6.

Hamill B. Comparing two methods of preschool and

kindergarten hearing screening. J Sch Health 1988

Mar;58(3):95-7.

Handrick W, Schille R, Jaeger HD, Tauchnitz C.

[Ototoxicity of neomycin]. Kinderarztl Prax 1988

Jun;56(6):283-7. (Ger).

Handzic J, Subotic R, Sprem N, Bagatin M. [Hearing

disorders in patients with cleft lip and palate]. Chir

Maxillofac Plast 1989;19(1-3):19-23. (Scr).

Hanna JN, Wild BE. Bacterial meningitis in children

under five years of age in Western Australia. Med J

Aust 1991 Aug 5;155(3):160-4.

Harada T, Yamasoba T, Yagi M. [Clinicostatical study

on the sensorineural hearing loss accompanying

otitis media with effusion]. Nippon Jibiinkoka

Gakkai Kaiho 1990 Nov;93(11):1874-81. (Jpn).

Harada T, Yamasoba T, Yagi M. Sensorineural hearing

loss associated with otitis media with effusion. ORL

J Otorhinolaryngol Relat Spec 1992;54(2):61-5.

Harsten G, Prellner K, Heldrup J, Kalm O, Kornfalt R.

Recurrent acute otitis media. A prospective study of

children during the first three years of life. Acta

Otolaryngol (Stockh) 1989;107(1- 2):111-9.

Hellmund S, Begall K, Preibisch-Effenberger R.

[Meningitis and hearing damage in children]. Padiatr

Grenzgeb 1990;29(1):13-7. (Ger).

Hendricks-Munoz KD, Walton JP. Hearing loss in

infants with persistent fetal circulation. Pediatrics

1988 May;81(5):650-6. Comment in: Pediatrics 1989

May;83(5):807-8.

Hickson LM, Alcock D. Progressive hearing loss in

children with congenital cytomegalovirus. J Paediatr

Child Health 1991 Apr;27(2):105-7. Comment in:

J Paediatr Child Health 1991 Apr;27(2):74-5.

Holst K, Andersen E, Philip J, Henningsen I. Antenatal

and perinatal conditions correlated to handicap

among 4-year-old children. Am J Perinatol 1989

Apr;6(2):258-67.

Improvement of outcome for infants of birth weight

under 1000 g. The Victorian Infant Collaborative

Study Group. Arch Dis Child 1991 Jul;

66(7 Spec No):765-9.

Jahrsdoerfer RA, Aguilar EA, Yeakley JW, Cole RR.

Treacher Collings syndrome: an otologic challenge.

Ann Otol Rhinol Laryngol 1989;98(10):807-12.

Jiang ZD, Liu XY, Wu YY, Zheng MS, Liu HC.

Long-term impairments of brain and auditory

functions of children recovered from purulent

meningitis. Dev Med Child Neurol 1990 Jun;

32(6):473-80.

Johnson A. Screening tests for sensorineural deafness.

Nurs Times 1990 Oct 31-Nov 6;86(44):52-3.

Johnson A, Ashurst H. Screening for sensorineural

deafness by health visitors. The Steering Committee,

Oxford Region Child Development Project. Arch

Dis Child 1990 Aug;65(8):841-5.

Johnson A, King R. A regional register of early

childhood impairments: a discussion paper. The

Steering Committee of the Oxford Region Child

Development Project. Community Med 1989 Nov;

11(4):352-63.

Joint Committee on Infant Hearing 1990 position

statement. ASHA Suppl 1991 Mar;33(5):3-6.

Jure R, Rapin I, Tuchman RF. Hearing-impaired autistic

children. Dev Med Child Neurol 1991 Dec;

33(12):1062-72.

Kaleida PH, Stool SE. Assessment of otoscopists’

accuracy regarding middle-ear effusion. Otoscopic

validation. Am J Dis Child 1992 Apr;146(4):433-5.

Karma PH, Penttila MA, Sipila MM, Kataja MJ.

Otoscopic diagnosis of middle ear effusion in acute

and non-acute otitis media. I. The value of different

otoscopic findings. Int J Pediatr Otorhinolaryngol

1989 Feb;17(1):37-49.

Katona G, Farkas Z, Revai K, Szabo M. [Follow-up

studies of patients with neonatal icterus using

acoustic evoked potential audiometry]. Orv Hetil

1989 May 7;130(19):1001-4. (Hun).

Kayan A, Bellman H. Bilateral sensorineural hearing

loss due to mumps. Br J Clin Pract 1990 Dec;

44(12):757-9.

Keith CG. Congenital rubella infection from reinfection

of previously immunised mothers. Aust N Z J

Ophthalmol 1991 Nov;19(4):291-3. Comment in:

Aust N Z J Ophthalmol 1991 Nov;19(4):257.

Kitchen WH, Rickards AL, Doyle LW, Ford GW, Kelly

EA, Callanan C. Improvement in outcome for very

low birthweight children: apparent or real? Med J

Aust 1992 Aug 3;156(3):154-8.

Klein JO. Epidemiology of otitis media. Pediatr Infect

Dis J 1989 Jan;8(1 Suppl):S9.

Klein JO. Otitis media: diagnosis and epidemiology.

Clin Ther 1988;10 Suppl B:2-7.

Klein JO, Teele DW, Pelton SI. New concepts in otitis

media: results of investigations of the Greater

Boston Otitis Media Study Group. Adv Pediatr

1992;39:127-56.

Klein JO, Tos M, Hussl B, Naunton RF, Ohyama M,

van Cauwenberge PB. Recent advances in otitis

media. Definition and classification. Ann Otol

Rhinol Laryngol Suppl 1989 Apr;139:10.

Knishkowy B, Palti H, Adler B, Tepper D. Effect of

otitis media on development: a community-based

study. Early Hum Dev 1991 Aug-Sep;26(2): 101-11.

Kraft E, Zorowka P, Heinemann M. [Diagnosis and

therapy of Pendred syndrome]. Sprache Stimme

Gehor 1991;15(2):45-7. (Ger).

Kronthaler M, Rauchegger H, Guggenbichler JP.

[Sensorineural hearing loss as a sequela of bacterial

meningitis]. Sprache Stimme Gehor 1991;15(1):

9-11. (Ger).

Lehingue Y, Fassio F, Momas I, Daures JP.

[Epidemiologic surveillance through five clinic

screening of children in the Herault]. Rev Epidemiol

Sante Publ 1992;40(1):25-32. (Fre).

Lenzi A, Zaghis A. Incidence of genetic factors in the

causation of deafness in childhood. Scand Audiol

Suppl 1988;30:37-41.

Levine BA, Shelton C, Berliner KI, Sheehy JL.

Sensorineural loss in chronic otitis media. Is it

clinically significant? Arch Otolaryngol Head Neck

Surg 1989;115(7):814-6.

Liu Z, Wang E, Taylor W, Yu H, Wu T, Wan Z, Huang

Y, Ni Z, Sackett D. Prevalence survey of

cytomegalovirus infection in children in Chengdu.

Am J Epidemiol 1990 Jan;131(1):143-50.

Lobovska A, Sejna J, Kouba K, Kulkova H. [The role of

cytomegaloviruses in childhood deafness]. Cas Lek

Cesk 1990 May 25;129(21):654-6. (Cze).

Lokman S, Loh T, Said H, Omar I. Incidence and

management of middle ear effusion in cleft palate

patients. Med J Malaysia 1992 Mar;47(1):51-5.

Lopez Moya JJ, Alvarez Vicent JJ. [Follow-up and

evaluation by means of brain stem evoked potentials

of a pediatric population diagnosed as having had

fetal distress]. Acta Otorrinolaringol Esp 1989

Jan-Feb;40(1):1-12. (Spa).

Lopez Moya JJ, Alvarez-Vicent JJ. [Follow-up and

evaluation using brain-stem evoked potentials of a

pediatric population diagnosed as premature]. Acta

Otorrinolaringol Esp 1989 Mar-Apr;40(2):115-20.

(Spa).

Lopponen H, Sorri M, Serlo W, von Wendt L.

Audiological findings of shunt-treated hydrocephalus

in children. Int J Pediatr Otorhinolaryngol 1989

Sep;18(1):21-30.

Ma KH, Tang PS, Chan KW. Aural tuberculosis. Am J

Otol 1990 May;11(3):174-7.

Mace AL, Wallace KL, Whan MQ, Stelmachowicz PG.

Relevant factors in the identification of hearing loss.

Ear Hear 1991 Aug;12(4):287-93.

Mackenzie K, Dempster JH. External ear resonance in

children with otitis media with effusion. Clin

Otolaryngol 1990 Oct;15(5):415-20.

Madell JR, Sculerati N. Noncongenital hereditary

hearing loss in children. Prospective documentation.

Arch Otolaryngol Head Neck Surg 1991 Mar;

117(3):332-5.

Mali M, Tyler P, Brookfield DS. Developmental

outcome of high-risk neonates in North

Staffordshire. Child Care Health Dev 1989

Mar-Apr;15(2):137-45.

Marlow N, Chiswick ML. Neurodevelopmental outcome

of babies weighing less than 2001 g at birth:

influence of perinatal transfer and mechanical

ventilation. Arch Dis Child 1988 Sep;63(9):

1069-74.

Marres HA, Cremers CW. Autosomal recessive

nonsyndromal profound childhood deafness in a

large pedigree. Audiometric features of the affected

persons and the obligate carriers. Arch Otolaryngol

Head Neck Surg 1989;115(5):591-5.

Marres HA, Cremers CW. Congenital conductive or

mixed deafness, preauricular sinus, external ear

anomaly, and commissural lip pits: an autosomal

dominant inherited syndrome. Ann Otol Rhinol

Laryngol 1991;100(11):928-32.

Marsh RR, Handler SD. Hearing impairment in

ventilator-dependent infants and children. Int J

Pediatr Otorhinolaryngol 1990 Dec;20(3):213-7.

Mauk GW, White KR, Mortensen LB, Behrens TR. The

effectiveness of screening programs based on

high-risk characteristics in early identification of

hearing impairment. Ear Hear 1991 Oct;12(5):

312-9.

Maw AR, Tiwari RS. Children with glue ear: how do

they present? Clin Otolaryngol 1988 Jun;13(3):

171-7.

McGuirt WF Jr, Stool SE. Temporal bone fractures in

children: a review with emphasis on long-term

sequelae. Clin Pediatr 1992;31(1):12-8.

Mertens H, Schwenk B. [Diagnosis and incidence of

recurrence of chronic tubal secretory otitis media in

childhood]. HNO 1988 Dec;36(12):507-10. (Ger).

Meyer S, Hugo R, Louw B, Grimbeek RJ. Screening for

middle-ear disease in schools for hearing-impaired

children. Int J Pediatr Otorhinolaryngol 1989

May;17(2):163-70.

Moatti L, Garabedian EN, Lacombe H, Spir-Jacob C.

[Congenital sensorineural deafness and associated

syndromes]. Ann Otolaryngol Chir Cervicofac

1990;107(3):181-6. (Fre).

Morgenstern C, Scheidt A, Kau R, Niessen A.

[Cytomegalovirus infection and inner ear deafness].

Laryngorhinootologie 1989 Sep;68(9):503-5. (Ger).

Mosca F, Giustardi A, Orbinato F. [Evoked auditory

potentials in neonatal hyperbilirubinemia]. Acta

Otorhinolaryngol Ital 1990 Nov-Dec;10(6):549-58.

(Ita).

Nel M, Odendaal W, Hurter M, Meyer S, van der

Merwe A. [The prevalence and nature of hearing

problems and middle ear dysfunctions in a group of

black urban children in grade 1]. S Afr J Commun

Disord 1988;35:25-9. (Afr).

Newman TB, Maisels MJ. Does hyperbilirubinemia

damage the brain of healthy full-term infants? Clin

Perinatol 1990 Jun;17(2):331-58.

Newton VE. Etiological evaluation of the hearing

impaired child. Scand Audiol Suppl 1988;30:53-6.

Newton VE. Genetic counselling for isolated hearing

loss. J Laryngol Otol 1989;103(1):12-5.

Newton VE, Rowson VJ. Progressive sensorineural

hearing loss in childhood. Br J Audiol 1988

Nov;22(4):287-95.

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. I.

Methods and process of the mass screening

examination for hearing]. Nippon Koshu Eisei

Zasshi 1992 Feb;39(2):101-4. (Jpn).

Northern JL, Gerkin KP. New technology in infant

hearing screening. Otolaryngol Clin North Am 1989

Feb;22(1):75-87.

Oliveira CA, Pinheiro LC, Gomes MR. External and

middle ear malformations: autosomal dominant

genetic transmission. Ann Otol Rhinol Laryngol

1989;98(10):772-6.

O’Shea S, Best J, Banatvala JE. A lymphocyte

transformation assay for the diagnosis of congenital

rubella. J Virol Methods 1992 May;37(2):139-47.

Pabla HS, McCormick B, Gibbin KP. Retrospective

study of the prevalence of bilateral sensorineural

deafness in childhood. Int J Pediatr Otorhinolaryngol

1991 Sep;22(2):161-5.

Palti H, Haustein D, Gofin R, Knishkowy B, Adler B.

Process and outcome evaluation of preventive care

for infants in two types of practices. J Community

Health 1989 Winter;14(4):243-54.

Paparella MM, Fox RY, Schachern PA. Diagnosis and

treatment of sensorineural hearing loss in children.

Otolaryngol Clin North Am 1989 Feb;22(1):51-74.

Parving A. Detection of the infant with congenital/early

acquired hearing disability. Acta Otolaryngol Suppl

(Stockh) 1991;482:111-6; discussion 117.

Parving A. Evaluation of the hearing impaired child.

Scand Audiol Suppl 1988;30:89-90.

Parving A. Hearing disabled children--epidemiology and

identification. Scand Audiol Suppl 1988;30: 21-3.

Parving A. [Loss of hearing in children. Epidemiology

and identification]. Ugeskr Laeger 1988 Mar 21;

150(12):721-5. (Dan).

Parving A. Paediatric audiological medicine - a survey

from a regional department. J Audiol Med 1992;

1(2):99-111.

Parving A, Christensen B. On criteria for hearing

impairment in children. Int J Pediatr

Otorhinolaryngol 1992 Jul;24(1):1-9.

Pasic TR, Dobie RA. Cis platinum ototoxicity in

children. Laryngoscope 1991;101(9):985-91.

Pearce PS, Saunders MA, Creighton DE, Sauve RS.

Hearing and verbal-cognitive abilities in high-risk

preterm infants prone to otitis media with effusion. J

Dev Behav Pediatr 1988 Dec;9(6):346-51.

Peckham CS. Cytomegalovirus in the neonate.

J Antimicrob Chemother 1989 Jun;23 Suppl E:

17-21.

Penaloza-Lopez Y, Reyna-Lopez V, Poblano-Luna A.

[Early detection of pre-linguistic deafness]. Bol Med

Hosp Infant Mex 1988 Mar;45(3):155-60. (Spa).

Pensak ML, Keity RW, St John Dignan P, Stowens DW,

Towbin RB, Katbamna B. Neuroaudiologic

abnormalities in patients with Type 1

neurofibromatosis. Laryngoscope 1989;99(7 Pt 1):

702-6.

Perez H, Vilchez J, Sevilla T, Martinez L. Audiologic

evaluation in Charcot Marie Tooth disease. Scand

Audiol Suppl 1988;30:211-3.

Perry-Marion T. Hearing loss and persistent fetal

circulation [letter]. Pediatrics 1989 Apr;83(4 Pt 2):

655.

Pettigrew AG, Edwards DA, Henderson-Smart DJ.

Perinatal risk factors in preterm infants with

moderate-to-profound hearing deficits. Med J Aust

1988 Feb 15;148(4):174-7.

Pickard RE. Childhood hearing loss: overview. Compr

Ther 1988 Dec;14(12):3-6.

Piper MC, Mazer B, Silver KM, Ramsay M. Resolution

of neurological symptoms in high-risk infants during

the first two years of life. Dev Med Child Neurol

1988 Feb;30(1):26-35.

Radu HJ. [Screening tests in childhood. Hearing

screening--a necessity?] Laryngol Rhinol Otol

(Stuttg) 1988 Jun;67(6):304-6. (Ger).

Rahko T, Karma P. Pure tone hearing thresholds in

otologically healthy 5 year old children in Finland.

Arch Otorhinolaryngol 1989;246(3):137-41.

Ramsay ME, Miller E, Peckham CS. Outcome of

confirmed symptomatic congenital cytomegalovirus

infection. Arch Dis Child 1991 Sep;66(9):1068-9.

Rantakallio P. The longitudinal study of the Northern

Finland birth cohort of 1966. Paediatr Perinat

Epidemiol 1988;2(1):59-88.

Rasmussen N, Johnsen NJ, Bohr VA. Otologic sequelae

after pneumococcal meningitis: a survey of 164

consecutive cases with a follow-up of 94 survivors.

Laryngoscope 1991 Aug;101(8):876-82.

Rasmussen NH, Lee KD. [Screening of preschool

children. A multidisciplinary assessment of the

development and rehabilitation needs]. Ugeskr

Laeger 1990 Nov 26;152(48):3616-9. (Dan).

Reed BD, Lutz LJ. Household smoking

exposure--association with middle ear effusions.

Fam Med 1988 Nov-Dec;20(6):426-30.

Reron E. [Clinical and electrophysiological studies of

the organ of hearing of newborn infants. III.

Evaluation of the organ of hearing of newborn

infants from high risk pregnancy using brain stem

evoked response audiometry (ABR)]. Przegl Lek

1990;47(4):394-401. (Pol).

Rivron RP. Bifid uvula: prevalence and association in

otitis media with effusion in children admitted for

routine otolaryngological operations. J Laryngol

Otol 1989;103(3):249-52.

Robertson CM, Etches PC. Decreased incidence of

neurologic disability among neonates at high risk

born between 1975 and 1984 in Alberta. Can Med

Assoc J 1988;139(3):225-9.

Robertson CM, Hrynchyshyn GJ, Etches PC, Pain KS.

Population-based study of the incidence, complexity,

and severity of neurologic disability among

survivors weighing 500 through 1250 grams at birth:

a comparison of two birth cohorts. Pediatrics 1992

Nov;90(5):750-5.

Robillard T, Gersdorff M. [Cytomegalovirus and

acquired congenital deafness]. Acta

Otorhinolaryngol Belg 1988;42(1):76-83. (Fre).

Roland PS, Finitzo T, Friel-Patti S, Brown KC, Stephens

KT, Brown O, Coleman JM. Otitis media.

Incidence, duration, and hearing status. Arch

Otolaryngol Head Neck Surg 1989 Sep;115(9):

1049-53.

Rowe SJ. An evaluation of ABR audiometry for the

screening and detection of hearing loss in ex-SCBU

infants. Br J Audiol 1991 Aug;25(4):259-74.

Ruben RJ. The history of the genetics of hearing

impairment. Ann N Y Acad Sci 1991;630:6-15.

Rynnel Dagoo B, Lindberg K, Bagger Sjoback D,

Larson O. Middle ear disease in cleft palate children

at three years of age. Int J Pediatr Otorhinolaryngol

1992;23(3):201-9.

Salamy A, Eldredge L, Tooley WH. Neonatal status and

hearing loss in high-risk infants. J Pediatr 1989

May;114(5):847-52. Comment in: J Pediatr 1990

Feb;116(2):316.

Schildroth AN, Rawlings BW, Allen TE.

Hearing-impaired children under age 6: a

demographic analysis. Am Ann Deaf 1989;

134(2):63-9.

Schwartz J, Otto D. Lead and minor hearing

impairment. Arch Environ Health 1991;46(5): 300-5.

Sehlin P, Holmgren G, Zakrisson J. Incidence,

prevalence and etiology of hearing impairment in

children in the county of Vasterbotten, Sweden.

Scand Audiol 1990;19(4):193-200.

Sever JL, Ellenberg JH, Ley AC, Madden DL, Fuccillo

DA, Tzan NR, Edmonds DM. Perinatal ‘torch’

infections identified by serology: correlation with

abnormalities in the children through 7 years of age.

Int J Epidemiol 1992 Apr;21(2):285-92.

Sever JL, Ellenberg JH, Ley AC, Madden DL, Fuccillo

DA, Tzan NR, Edmonds DM. Toxoplasmosis:

maternal and pediatric findings in 23,000

pregnancies. Pediatrics 1988 Aug;82(2):181-92.

Shewan CM. The prevalence of hearing impairment

[published erratum appears in ASHA 1990 Apr;

32(4):55]. ASHA 1990 Feb;32(2):62.

Shih L, Cone-Wesson B, Reddix B. Effects of maternal

cocaine abuse on the neonatal auditory system. Int J

Pediatr Otorhinolaryngol 1988 Sep;15(3):245-51.

Shusterman D, Handler SD, Marsh RR, Bilaniuk L, Tom

LW. Usefulness of computed tomographic scan in

the evaluation of sensorineural hearing loss in

children. Arch Otolaryngol Head Neck Surg

1992;118(5):501-3.

Siebert GW. Hazardous noise at a child care center. Am

Ind Hyg Assoc J 1989 Nov;50(11):A809.

Sipila M, Karma P, Pukander J, Timonen M, Kataja M.

The Bayesian approach to the evaluation of risk

factors in acute and recurrent acute otitis media.

Acta Otolaryngol (Stockh) 1988;106(1-2):94-101.

Sorri M, Rantakallio P. Secretory otitis media and

hearing loss. Acta Otolaryngol Suppl (Stockh) 1989;

457:94-9.

Stapells DR, Kurtzberg D. Evoked potential assessment

of auditory system integrity in infants. Clin Perinatol

1991 Sep;18(3):497-518.

Steen J, Gallefoss K, Nordahl T, Rnning Arnesen A,

Bechensteen AG. [Hearing loss among children in

Oslo]. Tidsskr Nor Laegeforen 1989 Feb 28;109(6):

672-6. (Nor).

Stein LK, Jabaley T, Spitz R, Stoakley D, McGee T.

The hearing-impaired infant: patterns of

identification and habilitation revisited. Ear Hear

1990 Jun;11(3):201-5.

Stewart AL, Costello AM, Hamilton PA, Baudin J,

Townsend J, Bradford BC, Reynolds EO.

Relationship between neurodevelopmental status of

very preterm infants at one and four years. Dev Med

Child Neurol 1989 Dec;31(6):756-65.

Stewart JL. Otitis media in the first year of life in two

Eskimo communities. Ann Otol Rhinol Laryngol

1989;98(3):200-1.

Sundel RP, Cleveland SS, Beiser AS, Newburger JW,

McGill T, Baker AL, Koren G, Novak RE, Harris

JP, Burns JC. Audiologic profiles of children with

Kawasaki disease. Am J Otol 1992 Nov;13(6):

512-5.

Tainio VM, Savilahti E, Salmenpera L, Arjomaa P,

Siimes MA, Perheentupa J. Risk factors for infantile

recurrent otitis media: atopy but not type of feeding.

Pediatr Res 1988;23(5):509-12.

Taylor HG, Mills EL, Ciampi A, Du Berger R, Watters

GV, Gold R, MacDonald N, Michaels RH. The

sequelae of Haemophilus influenzae meningitis in

school age children. N Engl J Med 1990;323(24):

1657-63.

Teele DW, Klein JO, Rosner B. Epidemiology of otitis

media during the first seven years of life in children

in greater Boston: a prospective, cohort study.

J Infect Dis 1989 Jul;160(1):83-94. Comment in:

J Infect Dis 1990 Apr;161(4):806-7.

Teele DW, Lundgren K, Casselbrant ML, Daly KA,

Ingvarsson L, Karma P, Marchant CD, Roydhouse

N, Tos M, VanCauwenberge PB, Wood RP. Recent

advances in otitis media. Epidemiology and natural

history. Ann Otol Rhinol Laryngol Suppl 1989 Apr;

139:11-3.

Teele DW, Stewart IA, Teele JH, Smith DK,

Tregonning SJ. Acoustic reflectometry for

assessment of hearing loss in children with middle

ear effusion. Pediatr Infect Dis J 1990 Dec;9(12):

870-2.

Tharpe AM, Bess FH. Identification and management of

children with minimal hearing loss. Int J Pediatr

Otorhinolaryngol 1991;21(1):41-50.

Therien F. Otitis and hearing loss among northern

Quebec Inuit. Arctic Med Res 1988;47 Suppl 1:

657-8.

Thorburn M, Desai P, Paul TJ, Malcolm L, Durkin M,

Davidson L. Identification of childhood disability in

Jamaica: evaluation of the ten question screen. Int J

Rehabil Res 1992;15(3):262-70.

Thorburn MJ, Desai P, Paul TJ. Service needs of

children with disabilities in Jamaica. Int J Rehabil

Res 1992;15(1):31-8.

Tos M. Sensorineural hearing loss in acute and chronic

middle ear diseases. Acta Otolaryngol Suppl

(Stockh) 1989;457:87-93.

Ueda K, Tokugawa K, Kusuhara K. Perinatal viral

infections. Early Hum Dev 1992 Jun-Jul;29(1-3):

131-5.

Upfold LJ. Rubella-related deafness [letter]. Med J Aust

1988 Dec 5-19;149(11-12):723.

van Dijk JH. [Meningitis as cause of prelingual

deafness]. Ned Tijdschr Geneeskd 1989 Jun 3;

133(22):1125-7. (Dut).

Van Rijn PM, Cremers CW. Causes of childhood

deafness at a Dutch school for the hearing impaired.

Ann Otol Rhinol Laryngol 1991;100(11):903-8.

Vazquez-Gomez P, Fernandez-Carrocera LA,

Bravo-Cabrera Z, Venta-Sobero JA, Montiel-Garcia

G, Lozano-Gonzalez CH. [Hearing and language

sequelae in survivors of a neonatal intensive care

unit]. Bol Med Hosp Infant Mex 1990

Jun;47(6):385-9. (Spa).

Walton JP, Hendricks-Munoz K. Profile and stability of

sensorineural hearing loss in persistent pulmonary

hypertension of the newborn. J Speech Hear Res

1991 Dec;34(6):1362-70.

Watkin PM. The age of identification of childhood

deafness--improvements since the 1970s. Public

Health 1991 Jul;105(4):303-12.

Weir W, Camerson M, Cochrane M, Paterson M,

Thomson A, Bonn G, Fleming L. The Scottish low

birthweight study: I. Survival, growth, neuromotor

and sensory impairment. Arch Dis Child 1992;

67(6):675-81.

Wild NJ, Sheppard S, Smithells RW, Holzel H, Jones G.

Onset and severity of hearing loss due to congenital

rubella infection. Arch Dis Child 1989

Sep;64(9):1280-3.

Williams WT, Ghorayeb BY, Yeakley JW. Pediatric

temporal bone fractures. Laryngoscope 1992;

102(6):600-3.

Williamson WD, Demmler GJ, Percy AK, Catlin FI.

Progressive hearing loss in infants with

asymptomatic congenital cytomegalovirus infection.

Pediatrics 1992 Dec;90(6):862-6.

Wolfenden K, McKenzie A, Sanson Fisher RW.

Identifying hazards and risk opportunity in child

farm injury. Aust J Public Health 1992;16(2):122-8.

Woodroffe C, Abra A. A special conditions register.

Arch Dis Child 1991;66(8):927-30.

Wright PF, Sell SH, McConnell KB, Sitton AB,

Thompson J, Vaughn WK, Bess FH. Impact of

recurrent otitis media on middle ear function,

hearing, and language. J Pediatr 1988 Sep;113(3):

581-7.

Wright PF, Thompson J, Bess FH. Hearing, speech, and

language sequelae of otitis media with effusion.

Pediatr Ann 1991 Nov;20(11):617-8, 620-1.

Yeargin Allsopp M, Murphy CC, Oakley GP, Sikes RK,

Billings S, Bradley G, Coleman T, Doernberg N,

Hudgins R, Edmonds B, Maloney K, Sever S,

Trevathan E. A multiple source method for studying

the prevalence of developmental disabilities in

children: the Metropolitan Atlanta Developmental

Disabilities Study. Pediatrics 1992;89(4):624-30.

Yokoyama T, Okada I. Hearing screening in health

examination services for young children at health

centers in Japan. Eur Arch Otorhinolaryngol 1990;

247(5):305-11.

Yow MD. CMV infection in young women. Hosp Pract

(Off Ed) 1990 Mar 30;25(3A):61-5, 69, 72-9.

Yow MD, Williamson DW, Leeds LJ, Thompson P,

Woodward RM, Walmus BF, Lester JW, Six HR,

Griffiths PD. Epidemiologic characteristics of

cytomegalovirus infection in mothers and their

infants. Am J Obstet Gynecol 1988 May;158(5):

1189-95.

Yu VY, Manlapaz ML, Tobin J, Carse EA, Charlton

MP, Gore JR. Improving health status in extremely

low birthweight children between two and five

years. Early Hum Dev 1992;30(3):229-39.

Zakzouk SM, El Sayed Y. Bacterial meningitis and

hearing impairment: a prospective study. Ann Saudi

Med 1992;12(5):480-3.

Zhuang J. [Factors causing deafness in deaf-mute

students]. Chung Hua Erh Pi Yen Hou Ko Tsa Chih

1989;24(4):204-6, 253-4. (Chi).

Zielhuis GA, Bootsma-Knippenbergh W,

Groenendijk-Bemelmans H, Van Den Broek P.

[Results of the Ewing screening test and the risk of

otitis media with effusion in children of preschool

age]. Ned Tijdschr Geneeskd 1989 May 20;133(20):

1030-3. (Dut).

Zielhuis GA, Heuvelmans Heinen EW, Rach GH, Van

Den Broek P. Environmental risk factors for otitis

media with effusion in preschool children. Scand J

Prim Health Care 1989;7(1):33-8.

Zielhuis GA, Rach GH, Van Den Broek P. Screening

for otitis media with effusion in preschool children.

Lancet 1989;1(8633):311-4.

Zorowka P, Jennerjahn B, Kraft E. [Labyrinthitis

ossificans after pneumococcal meningitis]. HNO

1991 Jan;39(1):37-40. (Ger).

DEVELOPMENTAL ISSUES IN EARLY

HEARING IMPAIRMENT

Allen DA, Rapin I, Wiznitzer M. Communication

disorders of preschool children: the physician’s

responsibility. J Dev Behav Pediatr 1988 Jun;9(3):

164-70.

Amorosa H. [Early diagnosis and early therapy in

language development disorders]. Krankenpfl J 1989

Mar 1;27(3):33-5. (Ger).

Aust G, Foll U, Lutt B, Schaffrath R. [Hearing handicap

in childhood--responsibilities of public health, early

diagnosis]. Off Gesundheitswes 1989 Jan;51(1):2-6.

(Ger).

Baden EP, Matthies ML, Novak MA. Recovery from

OME related phonologic delay following tube

placement. J Speech Hear Disord 1989;54(1):

94-100.

Ballot DE, Rothberg AD, Katz BJ. Speech and hearing

problems in a high-risk population. S Afr Med J

1992 Jul;82(1):23-6.

Bernstein ME, Barta L. What do parents want in parent

education? Am Ann Deaf 1988 Jul;133(3):235-46.

Biering-Srensen M, Biering-Srensen K, Kaufmann B.

[Follow-up of children screened at 4 years of age

through school age with particular attention the

evaluation of speech function]. Ugeskr Laeger 1989

May 15;151(20):1240-4. (Dan).

Blasco PA. Pitfalls in developmental diagnosis. Pediatr

Clin North Am 1991 Dec;38(6):1425-38.

Bodner-Johnson B. Family conversation style: its effect

on the deaf child’s participation. Except Child 1991

May;57(6):502-9.

Boothroyd A. Assessment of speech perception capacity

in profoundly deaf children. Am J Otol 1991;

12 Suppl:67-72.

Bovo R, Martini A, Agnoletto M, Beghi A, Carmignoto

D, Milani M, Zangaglia AM. Auditory and

academic performance of children with unilateral

hearing loss. Scand Audiol Suppl 1988;30:71-4.

Cadman D, Walter SD, Chambers LW, Ferguson R,

Szatmari P, Johnson N, McNamee J. Predicting

problems in school performance from preschool

health, developmental and behavioural assessments.

Can Med Assoc J 1988 Jul 1;139(1):31-6.

Connard P, Kantor R. A partnership perspective viewing

normal-hearing parent/hearing-impaired child

communication. Volta Rev 1988 Apr;90(3): 133-41.

Coplan J. Evaluation of the child with deafness or

delayed speech. Indian J Pediatr 1988 May-Jun;

55(3):372-8.

Coplan J, Gleason JR. Unclear speech: recognition and

significance of unintelligible speech in preschool

children [published erratum appears in Pediatrics

1988 Dec;82(6):862]. Pediatrics 1988 Sep;

82(3 Pt 2):447-52.

Cox C, Hack M, Aram D, Borawski E. Neonatal

auditory brainstem response failure of very low birth

weight infants: 8-year outcome. Pediatr Res 1992

Jan;31(1):68-72.

de Villiers J, et al. Speech and gestural communication

between oral deaf children and oral deaf mothers.

Paper presented at: Annual Meeting of the Society

for Research in Child Development; 1989 Apr;

Kansas City. 20 p. Available from: ERIC,

Arlington, VA.

Den Ouden L, Rijken M, Brand R, Verloove-Vanhorick

SP, Ruys JH. Is it correct to correct? Developmental

milestones in 555 "normal" preterm infants

compared with term infants. J Pediatr 1991

Mar;118(3):399-404.

Dixit A, Govil S, Patel NV. Culture appropriate

indicators for monitoring growth and development

of urban and rural children below 6 years. Indian

Pediatr 1992 Mar;29(3):291-9.

Dixon R. Silent sufferers... deaf children may be at risk

from abuse. Nurs Times 1989 Aug 16-22;85(33):

38-9.

Eggermont JJ. Development of auditory evoked

potentials. Acta Otolaryngol (Stockh) 1992;112(2):

197-200.

Fick E, et al. Influence of sensory impairment on

mother-child communicative interaction. Int J Rehab

Res 1989;12(1):71-6.

Friel-Patti S. Otitis media with effusion and the

development of language: a review of the evidence.

Top Lang Disord 1990 Nov;11(1):11-22.

Friel-Patti S, Finitzo T. Language learning in a

prospective study of otitis media with effusion in

the first two years of life. J Speech Hear Res 1990

Mar;33(1):188-94.

Furukawa CT. Conductive hearing loss and speech

development. J Allergy Clin Immunol 1988 May;

81(5 Pt 2):1015-20.

Gallaway C, Aplin DY, Newton VE, Hostler ME. The

GMC project: some linguistic and cognitive

characteristics of a population of hearing-impaired

children. Br J Audiol 1990 Feb;24(1):17-27.

Gallaway C, Hostler ME, Reeves D. Speech addressed

to hearing impaired children by their mothers. Clin

Linguist Phonetics 1990;4(3):221-37.

Geers AE, Schick B. Acquisition of spoken and signed

English by hearing-impaired children of hearing-impaired or hearing parents. J Speech Hear

Disord 1988 May;53(2):136-43.

Giangreco MF, Cloninger CJ, Mueller PH, Yuan S,

Ashworth S. Perspectives of parents whose children

have dual sensory impairments. J Assoc Pers Sev

Handicap 1991 Spring;16(1):14-24.

Goodman J, Hopper C. Hearing impaired children and

youth: a review of psychomotor behavior. Adapt

Phys Act Q 1992;9(3):214-36.

Goppold L. Early intervention for preschool deaf

children: the longitudinal academic effects relative

to program methodology. Am Ann Deaf 1988 Oct;

133(4):285-8.

Gravel JS, Wallace IF. Listening and language at 4

years of age: effects of early otitis media. J Speech

Hear Res 1992 Jun;35(3):588-95.

Grimes VK, Prickett HT. Developing and enhancing a

positive self-concept in deaf children. Am Ann Deaf

1988 Oct;133(4):255-7.

Gunnarson AD, et al. Auditory deprivation and early

conductive hearing loss from otitis media. Top Lang

Disord 1990 Nov;11(1):29-42.

Gunnarson AD, Finitzo T. Conductive hearing loss

during infancy: effects on later auditory brain stem

electrophysiology. J Speech Hear Res 1991 Oct;

34(5):1207-15.

Hasegawa S. [Hearing and language ability in mild and

moderate hearing impaired children]. Nippon

Jibiinkoka Gakkai Kaiho 1990 Sep;93(9):1397-409.

(Jpn).

Hintermair M. [Psychological results of speech

development in hearing impaired children, and their

prognostic importance for successful schooling in

normal schools]. Sprache Stimme Gehor 1990;

14(2):53-6. (Ger).

Jensen JH, Borre S, Johansen PA. Unilateral

sensorineural hearing loss in children: cognitive

abilities with respect to right/left ear differences.

Br J Audiol 1989;23(3):215-20.

Jensen JH, Johansen PA, Borre S. Unilateral

sensorineural hearing loss in children and auditory

performance with respect to right/left ear

differences. Br J Audiol 1989;23(3):207-13.

Jessen BA, Beattie RG. Otitis media: occurrence and

effect on child development. ACEHI J 1990;

16(2-3):49-59.

Kacker SK, Basavaraj V. Articulatory ability of

hearing-impaired children belonging to the different

‘kostic groups’. Int J Pediatr Otorhinolaryngol

1992;23(2):133-40.

Karma P, Sipila M, Rahko T. Hearing and hearing loss

in 5 year old children. Pure tone thresholds and the

effect of acute otitis media. Scand Audiol 1989;

18(4):199-203.

Keith RW. Effects of early hearing impairment on

childhood development. Scand Audiol Suppl 1988;

30:135-8.

Klein JO, Teele DW, Pelton SI. New concepts in otitis

media: results of investigations of the Greater

Boston Otitis Media Study Group. Adv Pediatr

1992;39:127-56.

Kluwin TN, Gaustad MG. Predicting family

communication choices. Am Ann Deaf 1991 Mar;

136(1):28-34.

Knishkowy B, Palti H, Adler B, Tepper D. Effect of

otitis media on development: a community-based

study. Early Hum Dev 1991 Aug-Sep;26(2):101-11.

Kreimeyer K, Antia S. The development and

generalization of social interaction skills in

preschool hearing-impaired children. Volta Rev

1988 May;90(4):219-31.

Lamprecht A, Keulen M. [Vestibular function in

children with hereditary deafness].

Laryngorhinootologie 1988;67(6):286-8. (Ger).

Lederberg AR, et al. A longitudinal study of the effects

of deafness on the early mother-child relationship.

Paper presented at: Biennial Meeting of the Society

for Research in Child Development; 1991

Apr 18-21; Seattle, WA. 7 p. Available from:

ERIC, Arlington, VA.

Ling D. Technology and phonology: the essentials of

spoken language for hearing impaired children.

ACEHI J 1991;17(1):5-21.

Lous J, Fiellau Nikolajsen M, Jeppesen AL. Secretory

otitis media and language development: a six year

follow up study with case control. Int J Pediatr

Otorhinolaryngol 1988;15(2):185-203.

Lyon M, Gallaway C. Measuring the spontaneous

language of hearing impaired children. Clin Linguist

Phonetics 1990;4(3):183-95.

Maher TF. The psychological development of

prelinguistic deaf infants. Clin Soc Work J 1989

Fall;17(3):209-22.

Maw AR, Tiwari RS. Children with glue ear: how do

they present? Clin Otolaryngol 1988 Jun;13(3):

171-7.

Maxwell MM. A signing deaf child’s use of speech.

Sign Lang Stud 1989 Spring;62:23-42.

Maxwell MM, Kraemer P. Speech and identity in the

deaf narrative. Text 1990;10(4):339-63.

Meadow-Orlans KP, MacTurk RH, Spencer PE, Koester

LS. Deaf infants, hearing mothers: a research report.

OSERS News Print 1992 Winter; 4(3):4-7.

Molteno CD, Hollingshead J, Moodie AD, Bradshaw D,

Bowie MD, Willoughby W. Preschool development

of coloured children in Cape Town. S Afr Med

J 1991 Jun 1;79(11):665-70.

Morrongiello BA, Gotowiec A. Recent advances in the

behavioral study of infant audition: the development

of sound localization skills. J Speech Lang Pathol

Audiol 1990 Dec;14(4):51-63. Comment in:

J Speech Lang Pathol Audiol 1990 Dec;14(4):64-7.

Mulder HJ. [Is otitis media with effusion harmful for the

language development of young children? (letter)].

Ned Tijdschr Geneeskd 1989 Jan 21; 133(3):131-2.

(Dut).

Murray AD. Newborn auditory brainstem evoked

responses (ABRs): longitudinal correlates in the first

year. Child Dev 1988 Dec;59(6):1542-54.

Musselman CR. The relationship between measures of

hearing loss and speech intelligibility in young deaf

children. J Child Commun Disord 1990;13(2):

193-205.

Musselman CR, et al. The effect of mothers’

communication mode on language development in

preschool deaf children. Applied Psycholinguist

1988 Jun;9(2):185-204.

Musselman CR, Wilson AK, Lindsay PH. Effects of

early intervention on hearing impaired children.

Except Child 1988 Nov;55(3):222-8.

Notoya M, Suzuki S, Furukawa M. Academic success of

integrated hearing-impaired pupils who had enrolled

in the early written-oral language program. Auris

Nasus Larynx 1992;19(3):161-7.

Nozza RJ. Binaural release from masking for a speech

sound in infants, preschoolers, and adults. J Speech

Hear Res 1988 Jun;31(2):212-8.

Nozza RJ, et al. Reliability and validity of infant

speech-sound discrimination-in-noise thresholds.

J Speech Hear Res 1991 Jun;34(3):643-50.

Nozza RJ, Rossman RN, Bond LC. Infant adult

differences in unmasked thresholds for the

discrimination of consonant vowel syllable pairs.

Audiology 1991;30(2):102-12.

Oller DK, Eilers RE. The role of audition in infant

babbling. Child Dev 1988 Apr;59(2):441-9.

Parving A. Intervention and the hearing-impaired

child--an evaluation of outcome. Int J Pediatr

Otorhinolaryngol 1992 Mar;23(2):151-9.

Pearce PS, Saunders MA, Creighton DE, Sauve RS.

Hearing and verbal-cognitive abilities in high-risk preterm infants prone to otitis media with effusion. J

Dev Behav Pediatr 1988 Dec;9(6):346-51.

Plapinger D, Kretschmer R. The effect of context on the

interactions between a normally-hearing mother and

her hearing-impaired child. Volta Rev 1991

Feb-Mar;93(2):75-87.

Preisler G. Development of communication in deaf

infants. Paper presented at: 4th Biennial

International ISAAC Conference on Augmentative

and Alternative Communication; 1990 Aug 12-16;

Stockholm, Sweden. 14 p. Available from: ERIC,

Arlington, VA.

Rach GH, Zielhuis GA, Van Baarle PW, Van Den

Broek P. The effect of treatment with ventilating

tubes on language development in preschool

children with otitis media with effusion. Clin

Otolaryngol 1991 Apr;16(2):128-32.

Rach GH, Zielhuis GA, Van Den Broek P. The

influence of chronic persistent otitis media with

effusion on language development of 2- to

4-year-olds. Int J Pediatr Otorhinolaryngol 1988

Sep;15(3):253-61.

Ramkalawan TW, Davis AC. The effects of hearing loss

and age of intervention on some language metrics in

young hearing-impaired children. Br J Audiol 1992

Apr;26(2):97-107.

Rapin I. Children with inadequate language

development: management guidelines for

otolaryngologists. Int J Pediatr Otorhinolaryngol

1988 Dec;16(3):189-98.

Rittenhouse RK, White K, Lowitzer C, Shisler L. The

costs and benefits of providing early intervention to

very young, severely hearing-impaired children in

the United States: the conceptual outline of a

longitudinal research study and some preliminary

findings. Br J Disord Commun 1990 Aug;25(2):

195-208.

Roberts JE, Burchinal MR, Davis BP, Collier AM,

Henderson FW. Otitis media in early childhood and

later language. J Speech Hear Res 1991 Oct;34(5):

1158-68.

Roberts JE, Schuele CM. Otitis media and later

academic performance: the linkage and implications

for intervention. Top Lang Disord 1990 Nov;11(1):

43-62.

Ross M. Implications of delay in detection and

management of deafness. Volta Rev 1990 Feb-Mar;

92(2):69-79.

Secord GJ, Erickson MT, Bush JP. Neuropsychological

sequelae of otitis media in children and adolescents

with learning disabilities. J Pediatr Psychol 1988

Dec;13(4):531-42.

Senior G. Temporal orientation in hearing impaired

people. Disabil Handicap Soc 1988;3(3):277-90.

Shortridge RT, Bulmer N. Delayed detection of

congenital hearing loss [letter]. BMJ 1990 Dec 8;

301(6764):1332-3. Comment on: BMJ 1990 Oct 20;

301(6757):903-5.

Smith DE, Miller SD, Stewart M, Walter TL,

McConnell JV. Conductive hearing loss in autistic,

learning-disabled, and normal children. J Autism

Dev Disord 1988 Mar;18(1):53-65.

Spencer PE, Gutfreund M. Characteristics of "dialogues"

between mothers and prelinguistic hearing-impaired

and normally-hearing infants. Volta Rev 1990

Dec;92(7):351-60.

Steffens ML, Oller DK, Lynch M, Urbano RC. Vocal

development in infants with Down syndrome and

infants who are developing normally. Am J Ment

Retard 1992 Sep;97(2):235-46.

Stoel-Gammon C. Prelinguistic vocalizations of

hearing-impaired and normally hearing subjects: a

comparison of consonantal inventories. J Speech

Hear Disord 1988 Aug;53(3):302-15.

Tallal P, Allard L, Curtiss S. Otitis media in language

impaired and normal children. J Speech Lang Pathol

Audiol 1991 Dec;15(4):33-41.

Teele DW, Klein JO, Chase C, Menyuk P, Rosner BA.

Otitis media in infancy and intellectual ability,

school achievement, speech, and language at age 7

years. Greater Boston Otitis Media Study Group.

J Infect Dis 1990 Sep;162(3):685-94.

Tharpe AM, Bess FH. Identification and management of

children with minimal hearing loss. Int J Pediatr

Otorhinolaryngol 1991;21(1):41-50.

Thielke HM, Shriberg LD. Effects of recurrent otitis

media on language, speech, and educational

achievement in Menominee Indian children. J Am

Indian Educ 1990 Jan;29(2):25-35.

Tomblin JB, Hardy JC, Hein HA. Predicting

poor-communication status in preschool children

using risk factors present at birth. J Speech Hear

Res 1991 Oct;34(5):1096-105.

Updike C, Thornburg JD. Reading skills and auditory

processing ability in children with chronic otitis

media in early childhood. Ann Otol Rhinol Laryngol

1992;101(6):530-7.

Urban E. Childhood deafness: compensatory

deintegration of the self. J Anal Psychol 1989 Apr;

34(2):143-57.

Van Den Broek P, Rach GH, Zielhuis GA. [Is otitis

media with effusion harmful for language

development in young children]. Ned Tijdschr

Geneeskd 1988 Oct 8;132(41):1885-8. (Dut).

Von Deuster C, Ptok M, Axmann D. [Hearing reactions

and disturbed learning in children with residual

hearing dependent on onset of rehabilitation].

Sprache Stimme Gehor 1991;15(3): 86-90. (Ger).

Wallace IF. Role of developmental evaluations in

assessing auditory system integrity. Semin Hear

1989;10(3):262-71.

Wallace IF, Gravel JS, McCarton CM, Ruben RJ. Otitis

media and language development at 1 year of age. J

Speech Hear Disord 1988 Aug;53(3):245-51.

Wallace IF, Gravel JS, McCarton CM, Stapells DR,

Bernstein RS, Ruben RJ. Otitis media, auditory

sensitivity, and language outcomes at one year.

Laryngoscope 1988 Jan;98(1):64-70.

Ward S. The predictive validity and accuracy of a

screening test for language delay and auditory

perceptual disorder. Eur J Disord Commun 1992;

27(1):55-72.

Watkins RV. Processing problems and language

impairment in children. Top Lang Disord 1990

Nov;11(1):63-72.

Weir CG, Lamb J. Differential sensitivity of newborns

to synthetic vowel stimuli. Br J Audiol 1990;24(6):

419-30.

Weisel A, Reichstein J. A study of correlates of speech

production performance -- an ecological approach.

J Commun Disord 1989;22(1):1-11.

Wightman F, et al. Temporal resolution in children.

Child Dev 1989 Jun;60(3):611-24.

Wright PF, Sell SH, McConnell KB, Sitton AB,

Thompson J, Vaughn WK, Bess FH. Impact of

recurrent otitis media on middle ear function,

hearing, and language. J Pediatr 1988 Sep;113(3):

581-7.

Wright PF, Thompson J, Bess FH. Hearing, speech, and

language sequelae of otitis media with effusion.

Pediatr Ann 1991 Nov;20(11):617-8, 620-1.

Zargi M, Boltezar IH. Effects of recurrent otitis media

in infancy on auditory perception and speech. Am J

Otolaryngol 1992 Nov-Dec;13(6):366-72.

Zody JM, Gorman DR. Effect of age, sex, hearing loss

and etiology upon manual dexterity skill of deaf

children. J Am Deaf Rehabil Assoc 1991 Jul;25(1):

42-7.

Zorowka P, Heinemann M. [Diagnosis of juvenile

hearing disorders]. Fortschr Med 1990 Jul 20;

108(21):411-4. (Ger).

METHODOLOGY, INSTRUMENTATION,

AND PERSONNEL

Auditory Brainstem Response (ABR)

Adelman C, Linder N, Levi H. Auditory nerve and brain

stem evoked response thresholds in infants treated

with gentamicin as neonates. Ann Otol Rhinol

Laryngol 1989 Apr;98(4 Pt 1):283-6.

Anand NK, Gupta AK, Raj H. Auditory brainstem

response in neonates with

hypoxic-ischemic-encephalopathy following

perinatal asphyxia. Indian Pediatr 1991 Aug;

28(8):901-7.

Anand NK, Gupta AK, Raj H. BERA--a diagnostic tool

in neonatology. Indian Pediatr 1990 Oct;27(10):

1039-44. Comment in: Indian Pediatr 1991 Nov;

28(11):1348-9.

Anday EK, Cohen ME, Hoffman HS. Comparison of

reflex modification procedures and auditory

brainstem response in high-risk neonates. Dev Med

Child Neurol 1991 Feb;33(2):130-7.

Ashoor A, Baraka ME, Al Umran K, Al Fadel MS,

Dawodu AH, Badran O. Hearing screening of

infants at King Fahd Hospital of the University. Ann

Saudi Med 1992;12(4):377-80.

Audiologic screening of newborn infants who are at risk

for hearing impairment. ASHA 1989 Mar;31(3):

89-92.

Brookhouser PE, Gorga MP, Kelly WJ. Auditory

brainstem response results as predictors of

behavioral auditory thresholds in severe and

profound hearing impairment. Laryngoscope 1990

Aug;100(8):803-10.

Brown DP. ABR audiometry in Cornelia de Lange

syndrome. Paper presented at: Annual Convention of

the American Speech-Language-Hearing

Association; 1990 Nov 16-19; Seattle, WA. 20 p.

Available from: ERIC, Arlington, VA.

Brown DR, Watchko JF, Sabo D. Neonatal sensorineural

hearing loss associated with furosemide: a

case-control study. Dev Med Child Neurol 1991

Sep;33(9):816-23.

Carzoli RP, Murphy SP, Hammer-Knisely J, Houy J.

Evaluation of auditory brain-stem response in

full-term infants of cocaine-abusing mothers. Am J

Dis Child 1991 Sep;145(9):1013-6.

Charuvanij A, Visudhiphan P, Chiemchanya S, Tawin C.

Sensorineural hearing loss in children recovered

from purulent meningitis: a study in Thai children at

Ramathibodi Hospital. J Med Assoc Thai 1990

May;73(5):253-7.

Cohen BA, Schenk VA, Sweeney DB.

Meningitis-related hearing loss evaluated with

evoked potentials. Pediatr Neurol 1988 Jan-Feb;

4(1):18-22.

Cohen LT, Rickards FW, Clark GM. A comparison of

steady state evoked potentials to modulated tones in

awake and sleeping humans. J Acoust Soc Am

1991;90(5):2467-79.

Coll J, Regnier C. [Early auditory potentials in the

detection of deafness]. Rev Laryngol Otol Rhinol

(Bord) 1988;109(4):325-6. (Fre).

Collet L, Morgon A, Soares I, Disant F, Salle B.

Maturational changes in the intensity latency

relation of the brainstem auditory evoked potentials

in humans. Acta Otolaryngol (Stockh) 1988;

105(5-6):473-6.

Conijn EA, Van der Drift JF, Brocaar MP, Van Zanten

GA. Conductive hearing loss assessment in children

with otitis media with effusion. A comparison of

pure tone and BERA results. Clin Otolaryngol 1989

Apr;14(2):115-20.

Constantin MA, Michel M, Elysabeth L. [Intrarectal

anesthesia for auditory evoked potentials]. Cah

Anesthesiol 1990 Dec;38(6):381-4. (Fre).

Coupland SG, Ponton CW, Eggermont JJ, Bowen TJ,

Grant RM. Assessment of cisplatin-induced

ototoxicity using derived-band ABRs. Int J Pediatr

Otorhinolaryngol 1991 Oct;22(3):237-48.

Cox C, Hack M, Aram D, Borawski E. Neonatal

auditory brainstem response failure of very low birth

weight infants: 8-year outcome. Pediatr Res 1992

Jan;31(1):68-72.

Cox LC. Screening the high-risk newborn for hearing

loss: the crib-o-gram v the auditory brainstem

response. Infants Young Child 1988 Jul;1(1):71-81.

Dahle AJ, McCollister FP. Audiological findings in

children with neonatal herpes. Ear Hear 1988 Oct;

9(5):256-8.

Das VK. Adverse perinatal factors in the causation of

sensorineural hearing impairment in young children.

Int J Pediatr Otorhinolaryngol 1991 Apr;21(2):

121-5.

Dauman R, Daubech Q, Delaroche M. [Role of

electrophysiology in the current diagnosis of deaf

children]. Rev Laryngol Otol Rhinol (Bord) 1990;

111(1):37-40. (Fre).

Deka RC. Auditory brainstem evoked responses in

infants and children. Indian J Pediatr 1992

May-Jun;59(3):361-6.

Deliac PH, Demarquez JL, Barberot JP, Sandler B, Paty

J. Brainstem auditory evoked potentials in icteric fullterm newborns: alterations after exchange

transfusion. Neuropediatrics 1990;21(3):115-8.

Deriglazov MA, Volynskii MB, Volkov DV.

[Neurosensory hearing loss in children with acute

and chronic otitis media diagnosed by the

measurement of short-latency auditory evoked

potentials]. Vestn Otorinolaringol 1990 Jul-Aug;

(4):23-7. (Rus).

Devilat M, Tosso M, Espinoza N, Mellado L, Thick E,

Rimasa A. [Auditory brainstem evoked potentials in

hearing loss after bacterial meningitis]. Rev Chil

Pediatr 1990 Sep-Oct;61(5):258-61. (Spa).

Diefendorf AO, Renshaw JJ, Cox JB, Reitz PS. Infant

hearing screening. Ear Nose Throat J 1992 Oct;

71(10):503-7.

Durieux-Smith A, Picton TW, Bernard P, MacMurray B,

Goodman JT. Prognostic validity of brainstem

electric response audiometry in infants of a neonatal

intensive care unit. Audiology 1991;30(5):249-65.

Eggermont JJ. Development of auditory evoked

potentials. Acta Otolaryngol (Stockh) 1992;112(2):

197-200.

Eggermont JJ. The onset and development of auditory

function: contributions of evoked potential studies.

J Speech Lang Pathol Audiol 1989 Mar;13(1):5-16.

Comment in: J Speech Lang Pathol Audiol 1989

Mar;13(1):18-27.

Eggermont JJ, Ponton CW, Coupland SG, Winkelaar R.

Frequency dependent maturation of the cochlea and

brainstem evoked potentials. Acta Otolaryngol

(Stockh) 1991;111(2):220-4.

Eggermont JJ, Salamy A. Development of ABR

parameters in a preterm and a term born population.

Ear Hear 1988;9(5):283-9.

Esbjorner E, Larsson P, Leissner P, Wranne L. The

serum reserve albumin concentration for

monoacetyldiaminodiphenyl sulphone and auditory

evoked responses during neonatal

hyperbilirubinaemia. Acta Paediatr Scand 1991;

80(4):406-12.

Fifer RC, Novak MA. Myogenic influences on the

electrical auditory brainstem response (EABR) in

humans. Laryngoscope 1990 Nov;100(11):1180-4.

Fjermedal O. Hearing identification in difficult-to-test

children. A study of 142 infants and children. Scand

Audiol 1989;18(3):185-91.

Fjermedal O, Laukli E. [Hearing loss in children.

Diagnostic challenges]. Tidsskr Nor Laegeforen

1989 Aug 30;109(24):2414-8. (Nor).

Fjermedal O, Laukli E. Paediatric auditory brainstem

response and pure-tone audiometry: threshold comparisons. A study of 142 difficult-to-test

children. Scand Audiol 1989;18(2):105-11.

Fjermedal O, Laukli E. [Preventive health care. Early

detection of hearing loss in children. A challenge to

health services]. Fag Tidsskr Sykepleien 1990

Sep 20;78(6):23-7. (Nor).

Fjermedal O, Laukli E, Mair IW. Auditory brainstem

responses and extratympanic electrocochleography.

A threshold comparison in children. Scand Audiol

1988;17(4):231-5.

Fujita A, Hyde ML, Alberti PW. ABR latency in

infants: properties and applications of various

measures. Acta Otolaryngol (Stockh) 1991;111(1):

53-60.

Garrubba V, Grandori F, Lamoretti M, Nicolai P,

Zanetti D, Antonelli AR. Electric response

audiometry in infants and preschool children.

Long-term control of the results. Acta Otolaryngol

Suppl (Stockh) 1991;482:36-43; discussion 44.

Gautham KS, Narang A. Limitations of BERA as a

diagnostic tool [letter]. Indian Pediatr 1991 Nov;

28(11):1348-9. Comment on: Indian Pediatr 1990

Oct;27(10):1039-44.

Gersdorff M, Deggouj N, Dutillieux D, Mazy N. [Limits

of the study of early auditory brainstem responses in

the diagnoses of childhood deafness]. Rev Laryngol

Otol Rhinol (Bord) 1991;112(1):23-6. (Fre).

Goldie WD. The brainstem auditory evoked potential in

infants and children. J Clin Neurophysiol 1992 Jul;

9(3):394-407.

Goodman JT, Malizia KE, Durieux-Smith A,

MacMurray B, Bernard P. Bayley developmental

performance at two years of age of neonates at risk

for hearing loss. Dev Med Child Neurol 1990 Aug;

32(8):689-97.

Gorga MP, Kaminski JR, Beauchaine KA. Auditory

brain stem responses from graduates of an intensive

care nursery using an insert earphone. Ear Hear

1988;9(3):144-7.

Gorga MP, Kaminski JR, Beauchaine KL, Jesteadt W,

Neely ST. Auditory brainstem responses from

children three months to three years of age: normal

patterns of response. II. J Speech Hear Res 1989

Jun;32(2):281-8.

Gravel JS, Kurtzberg D, Stapells DR, Vaughan HG,

Wallace IF. Case studies. Semin Hear 1989;10(3):

272-87.

Greville A. High risk children with deafness [letter].

N Z Med J 1991 Aug 14;104(917):344.

Guidelines for the audiologic assessment of children

from birth through 36 months of age. Committee on

Infant Hearing American Speech-Language-Hearing

Association. ASHA Suppl 1991 Mar;33(5):37-43.

Guidelines for the identification of hearing impairment

in at risk infants age birth to 6 months. ASHA 1988

Apr;30(4):61-4.

Guinard C, Fawer CL, Despland PA, Calame A.

Auditory brainstem responses and ultrasound

changes in a high-risk infants population. Helv

Paediatr Acta 1989 Jun;43(5-6):377-88.

Gunnarson AD, Finitzo T. Conductive hearing loss

during infancy: effects on later auditory brain stem

electrophysiology. J Speech Hear Res 1991 Oct;

34(5):1207-15.

Gupta AK, Anand NK. Brainstem evoked response

audiometry in neonates [letter]. Indian Pediatr 1990

Sep;27(9):1007-9.

Gupta AK, Anand NK, Raj H. Evaluation of risk factors

for hearing impairment in at risk neonates by

brainstem evoked response audiometry (BERA).

Indian J Pediatr 1991 Nov-Dec;58(6):849-55.

Gupta AK, Raj H, Anand NK. Auditory brainstem

responses (ABR) in neonates with

hyperbilirubinemia. Indian J Pediatr 1990 Sep-Oct;

57(5):705-11.

Hall JW 3d. Auditory evoked responses in the

management of acutely brain injured children and

adults. Am J Otol 1988;9 Suppl:36-46.

Hall JW 3d, Kripal JP, Hepp T. Newborn hearing

screening with auditory brainstem response:

measurement problems and solutions. Semin Hear

1988;9(1):15-33.

Hall JW 3d, Tucker DA. Auditory brainstem response in

the evaluation of peripheral versus central nervous

system dysfunction in the pediatric intensive care

unit. Semin Hear 1988;9(1):47-60.

Helias J, Chobaut JC, Mourot M, Lafon JC. Early

detection of hearing loss in children with cleft

palates by brain-stem auditory response. Arch

Otolaryngol Head Neck Surg 1988 Feb;114(2):

154-6.

Hirsch A. Behavioural tests: applications and limitations

in comparison with brainstem response audiometry.

Acta Otolaryngol Suppl (Stockh) 1991;482:118-24;

discussion 125.

Hirsch JE, Margolis RH, Rykken JR. A comparison of

acoustic reflex and auditory brain stem response

screening of high-risk infants. Ear Hear 1992 Jun;

13(3):181-6.

Hyde ML, Malizia K, Riko K, Alberti PW. Audiometric

estimation error with the ABR in high risk infants.

Acta Otolaryngol (Stockh) 1991; 111(2):212-9.

Hyde ML, Riko K, Malizia K. Audiometric accuracy of

the click ABR in infants at risk for hearing loss.

J Am Acad Audiol 1990 Apr;1(2):59-66.

Jacobson CA, Jacobson JT. Follow-up services in

newborn hearing screening programs. J Am Acad

Audiol 1990 Oct;1(4):181-6.

Jacobson GP, Burtka MJ, Wharton JA, Newman CW,

Shepherd N, Turner RG. Infant hearing screening

1984 to 1989: the Henry Ford Hospital experience.

Henry Ford Hosp Med J 1990;38(1):39-43.

Jacobson JT, Jacobson CA, Spahr RC. Automated and

conventional ABR screening techniques in high-risk

infants. J Am Acad Audiol 1990 Oct;1(4):187-95.

Jerger J, Johnson K. Interactions of age, gender, and

sensorineural hearing loss on ABR latency. Ear Hear

1988 Aug;9(4):168-76.

Jiang ZD. Intensity effect on amplitude of auditory

brainstem responses in human. Scand Audiol 1991;

20(1):41-7.

Jiang ZD, Liu XY, Wu YY, Zheng MS, Liu HC.

Long-term impairments of brain and auditory

functions of children recovered from purulent

meningitis. Dev Med Child Neurol 1990 Jun;32(6):

473-80.

Jiang ZD, Wu YY, Liu XY. Early development of

brainstem auditory evoked potentials in Down’s

syndrome. Early Hum Dev 1990;23(1):41-51.

Johnson SE, Nelson PB. Real ear measures of auditory

brain stem response click spectra in infants and

adults. Ear Hear 1991 Jun;12(3):180-3.

Kaga M, Murakami T, Naitoh H, Nihei K. Studies on

pediatric patients with absent auditory brainstem

response (ABR) later components. Brain Dev 1990;

12(4):380-4.

Katoh Y. [A study of the auditory responses to

intra-uterine sound in the first few months after

birth]. Nippon Jibiinkoka Gakkai Kaiho 1990 Feb;

93(2):268-81. (Jpn).

Katona G, Farkas Z, Revai K, Szabo M. [Follow-up

studies of patients with neonatal icterus using

acoustic evoked potential audiometry]. Orv Hetil

1989 May 7;130(19):1001-4. (Hun).

Kauffmann G, Zimmermann G. [Value assessment of

the MIRA (multichannel infant reflex audiometry)

hearing evaluation with and without biofeedback. 3.

Diagnosis from curves or behavioral observation?]

Laryngorhinootologie 1990 Feb;69(2):111-3. (Ger).

Kavanagh KT, Domico WD, Crews PL, McCormick

VA. Comparison of the intrasubject repeatability of

auditory brain stem and middle latency responses

elicited in young children. Ann Otol Rhinol

Laryngol 1988;97(3 Pt 1):264-71.

Kavanagh KT, Gould H, McCormick G, Franks R.

Comparison of the identifiability of the low intensity

ABR and MLR in the mentally handicapped patient.

Ear Hear 1989;10(2):124-30.

Kileny PR. New insights on infant ABR hearing

screening. Scand Audiol Suppl 1988;30:81-8.

Kitamoto I, Kukita J, Kurokawa T, Chen YJ, Minami T,

Ueda K. Transient neurologic abnormalities and

BAEPs in high risk infants. Pediatr Neurol 1990;

6(5):319-25.

Kluba J, Kluba U, von Specht H, Mittler U. [Monitoring

hearing during ototoxic cisplatin therapy]. Padiatr

Grenzgeb 1990;29(1):19-23. (Ger).

Kramer SJ, Vertes DR, Condon M. Auditory brainstem

responses and clinical follow-up of high-risk infants.

Pediatrics 1989 Mar;83(3):385-92.

Laukli E, Fjermedal O, Mair IW. Low-frequency

auditory brainstem response threshold. Scand Audiol

1988;17(3):171-8.

Letko MD. Detecting and preventing infant hearing loss.

Neonatal Netw 1992 Aug;11(5):33-8.

Liu XY, Jiang ZD. Intensity effect on latency and

interval of human BAER. Acta Otolaryngol (Stockh)

1991;111(3):477-84.

Lopez Moya JJ, Alvarez Vicent JJ. [Follow-up and

evaluation by means of brain stem evoked potentials

of a pediatric population diagnosed as having had

fetal distress]. Acta Otorrinolaringol Esp 1989

Jan-Feb;40(1):1-12. (Spa).

Lopez Moya JJ, Alvarez Vicent JJ. [Follow-up and

evaluation using brain-stem evoked potentials of a

pediatric population diagnosed as premature]. Acta

Otorrinolaringol Esp 1989 Mar-Apr;40(2):115-20.

(Spa).

Majnemer A, Rosenblatt B, Riley P. Prognostic

significance of the auditory brainstem evoked

response in high risk neonates. Dev Med Child

Neurol 1988;30(1):43-52.

Mandal AK, Mehra YN, Narang A, Raghunathan M,

Walia BN. Brain stem evoked response audiometry

in neonates. Indian Pediatr 1989 Jun;26(6):566-70.

Marsh RR, Handler SD. Hearing impairment in

ventilator-dependent infants and children. Int J

Pediatr Otorhinolaryngol 1990 Dec;20(3):213-7.

Mason S, McCormick B, Wood S. Auditory brainstem

response in paediatric audiology. Arch Dis Child

1988;63(5):465-7.

Mason SM. Automated system for screening hearing

using the auditory brainstem response. Br J Audiol

1988;22(3):211-3.

McCall S, Ferraro JA. Pediatric ABR screening:

pass-fail rates in awake versus asleep neonates.

J Am Acad Audiol 1991 Jan;2(1):18-23.

McClelland RJ, Watson DR, Lawless V, Houston HG,

Adams D. Reliability and effectiveness of screening

for hearing loss in high risk neonates. BMJ 1992

Mar 28;304(6830):806-9.

McGee T, Wolters C, Stein L, Kraus N, Johnson D,

Boyer K, Mets M, Roizen N, Beckman J, Meier P,

et al. Absence of sensorineural hearing loss in

treated infants and children with congenital

toxoplasmosis. Otolaryngol Head Neck Surg 1992

Jan;106(1):75-80.

McPherson DL, Tures C, Starr A. Binaural interaction

of the auditory brain stem potentials and middle

latency auditory evoked potentials in infants and

adults. Electroencephalogr Clin Neurophysiol 1989;

74(2):124-30.

Moran LM, Durieux-Smith A, Malizia K. Brainstem

electric response audiometry (BERA) in the

evaluation of hearing loss in infants with cleft

palate. J Speech Lang Pathol Audiol 1989 Sep;

13(3):43-7.

Mosca F, Giustardi A, Orbinato F. [Evoked auditory

potentials in neonatal hyperbilirubinemia]. Acta

Otorhinolaryngol Ital 1990 Nov-Dec;10(6):549-58.

(Ita).

Murray AD. Newborn auditory brainstem evoked

responses (ABRs): longitudinal correlates in the first

year. Child Dev 1988 Dec;59(6):1542-54.

Mutton PE, Beckenham EJ, Gibson WP, Ditton JE,

Downes JE. When the diagnosis of deafness is

wrong. Med J Aust 1992 Oct 5;157(7):483-4.

Northern JL, Gerkin KP. New technology in infant

hearing screening. Otolaryngol Clin North Am 1989

Feb;22(1):75-87.

Oates P, Stapells DR. Interaction of click intensity and

cochlear hearing loss on auditory brain stem

response wave V latency. Ear Hear 1992;13(1):

28-34.

Oyler RF, Lauter JL, Matkin ND. Intrasubject variability

in the absolute latency of the auditory brainstem

response. J Am Acad Audiol 1991 Oct; 2(4):206-13.

Ozdamar O, Delgado RE, Eilers RE, Widen JE.

Computer methods for on-line hearing testing with

auditory brain stem responses. Ear Hear 1990 Dec;

11(6):417-29.

Pensak ML, Keity RW, St John Dignan P, Stowens DW,

Towbin RB, Katbamna B. Neuroaudiologic

abnormalities in patients with Type 1

neurofibromatosis. Laryngoscope 1989;99(7 Pt 1):

702-6.

Perlman M, Frank JW. Bilirubin beyond the blood brian

barrier. Pediatrics 1988;81(2):304-15.

Pettigrew AG, Edwards DA, Henderson-Smart DJ.

Perinatal risk factors in preterm infants with

moderate-to-profound hearing deficits. Med J Aust

1988 Feb 15;148(4):174-7.

Picton TW. Clinical usefulness of auditory evoked

potentials: a critical evaluation. J Speech Lang

Pathol Audiol 1991 Mar;15(1):3-18. Comment in: J

Speech Lang Pathol Audiol 1991 Mar;15(1): 19-29.

Picton TW, Durieux-Smith A. Auditory evoked

potentials in the assessment of hearing. Neurol Clin

1988 Nov;6(4):791-808.

Poland RL. In search of a ‘gold standard’ for bilirubin

toxicity. Pediatrics 1992;89(5):823-4.

Pool KD, Finitzo T. Evaluation of a computer-

automated program for clinical assessment of the

auditory brain stem response. Ear Hear 1989 Oct;

10(5):304-10.

Prijs VF. Evaluation of electrocochleographic audiogram

determination in infants. Acta Otolaryngol Suppl

(Stockh) 1991;482:27-33; discussion 34-5.

Pruszewicz A, Obrebowski A, Swidzinski P. [Objective

topographic diagnosis of damage of the organ of

hearing]. Otolaryngol Pol 1990;44(6):409-15. (Pol).

Purmessur MN, Singh RS. BERA in the diagnosis of

deafness in children. A retrospective survey of its

use in a district general hospital. J Laryngol Otol

1988 Nov;102(11):981-5.

Raj H, Gupta AK, Anand NK. Hearing assessment by

brainstem auditory evoked responses (BAER) in

neonates at risk. Indian Pediatr 1991 Oct;28(10):

1175-83.

Reron E. [Clinical and electrophysiological studies of

the organ of hearing of newborn infants. III.

Evaluation of the organ of hearing of newborn

infants from high risk pregnancy using brain stem

evoked response audiometry (ABR)]. Przegl Lek

1990;47(4):394-401. (Pol).

Reyes MP, Ostrea EM Jr, Cabinian AE, Schmitt C,

Rintelmann W. Vancomycin during pregnancy: does

it cause hearing loss or nephrotoxicity in the infant?

Am J Obstet Gynecol 1989 Oct;161(4):977-81.

Comment in: Am J Obstet Gynecol 1990 Oct;

163(4 Pt 1):1375-6.

Rodriguez J, Suarez Fernandez T. [Audiologic

evaluation of children by auditory responses of the

brainstem]. An Esp Pediatr 1989 Jan;30(1):32-6.

(Spa).

Rowe SJ. An evaluation of ABR audiometry for the

screening and detection of hearing loss in ex-SCBU

infants. Br J Audiol 1991 Aug;25(4):259-74.

Ryndina AM, Grachev KV, Slesarenko NP, Utianova

TA, Tsvyleva ID. [Comparative studies of hearing in

children by recording reflex reactions and

long-latency auditory evoked potentials]. Vestn

Otorinolaringol 1990 Mar-Apr;(2):18-21. (Rus).

Salamy A, Eldredge L, Tooley WH. Neonatal status and

hearing loss in high-risk infants. J Pediatr 1989

May;114(5):847-52. Comment in: J Pediatr 1990

Feb;116(2):316.

Samani F, Peschiulli G, Pastorini S, Fior R. An

evaluation of hearing maturation by means of

auditory brainstem response in very low birthweight

and preterm newborns. Int J Pediatr

Otorhinolaryngol 1990 Jun;19(2):121-7.

Sasama R. Hearing threshold investigations in infants

and children. Audiology 1990;29(2):76-84.

Schauseil-Zipf U, von Wedel H. [Hearing screening

using acoustically evoked brain stem potentials in

newborn infants and infants]. Klin Padiatr 1988

Jul-Aug;200(4):324-9. (Ger).

Schorn K, Stecker M. [Evoked response audiometry in

pediatric audiology]. Laryngol Rhinol Otol (Stuttg)

1988 Feb;67(2):78-83. (Ger).

Schwartz DM, Pratt RE Jr, Schwartz JA. Auditory brain

stem responses in preterm infants: evidence of

peripheral maturity. Ear Hear 1989;10(1):14-22.

Sejna I, Vydrova J, Cerna O, Kredba V, Votruba V.

[Hearing and treatment of neonates with

gentamycin]. Cesk Pediatr 1991 Jan;46(1):28-30.

(Cze).

Shih L, Cone-Wesson B, Reddix B. Effects of maternal

cocaine abuse on the neonatal auditory system. Int J

Pediatr Otorhinolaryngol 1988 Sep;15(3):245-51.

Sininger YS. Establishing clinical norms for auditory

brainstem response. Am J Audiol 1992 Jul;1(3):

16-8.

Sininger YS, Masuda A. Effect of click polarity on ABR

threshold. Ear Hear 1990 Jun;11(3):206-9.

Smith RJ, Zimmerman B, Connolly PK, Jerger SW,

Yelich A. Screening audiometry using the high-risk

register in a level III nursery. Arch Otolaryngol

Head Neck Surg 1992;118(12):1306-11.

Smyth V, Scott J, Tudehope D. Auditory brainstem

evoked response inter-peak latencies in very low

birthweight infants. Int J Pediatr Otorhinolaryngol

1988 Oct;16(1):69-76.

Smyth V, Scott J, Tudehope D. The utility of the

auditory brainstem response as a screening

procedure. Int J Pediatr Otorhinolaryngol 1990

Mar;19(1):45-55.

Srensen M, Christensen B, Parving A. Clinical

application of brain-stem audiometry. Scand Audiol

1988;17(4):223-9.

Stapells DR. Auditory brainstem response assessment of

infants and children. Semin Hear 1989;10(3):

229-51.

Stapells DR, Kurtzberg D. Evoked potential assessment

of auditory system integrity in infants. Clin Perinatol

1991 Sep;18(3):497-518.

Stapells DR, Mosseri M. Maturation of the

contralaterally recorded auditory brain stem

response. Ear Hear 1991;12(3):167-73.

Stapells DR, Picton TW, Durieux-Smith A, Edwards

CG, Moran LM. Thresholds for short-latency

auditory-evoked potentials to tones in notched noise

in normal-hearing and hearing-impaired subjects.

Audiology 1990;29(5):262-74.

Stapells DR, Ruben RJ. Auditory brain stem responses

to bone-conducted tones in infants. Ann Otol Rhinol

Laryngol 1989 Dec;98(12 Pt 1):941-9.

Starr A, McPherson D, Patterson J, Don M, Luxford W,

Shannon R, Sininger Y, Tonakawa L, Waring M.

Absence of both auditory evoked potentials and

auditory percepts dependent on timing cues. Brain

1991 Jun;114(Pt 3):1157-80.

Stein LK, Kraus N. Auditory evoked potentials with

special populations. Semin Hear 1988;9(1):35-45.

Stockard JE, Curran JS. Transient elevation of threshold

of the neonatal auditory brain stem response. Ear

Hear 1990 Feb;11(1):21-8.

Stuart A, Yang EY, Stenstrom R. Effect of temporal

area bone vibrator placement on auditory brain stem

response in newborn infants. Ear Hear 1990;11(5):

363-9.

Sturzebecher E, Werbs M. Influence of age, sex, and

hearing loss on auditory brain stem response (ABR)

latencies. Scand Audiol 1988;17(4):248-50.

Sukowski W. [Electrophysiologic studies of hearing:

current methods in clinical and occupational

audiology. I. Brain stem evoked response

audiometry (ABR)]. Med Pr 1988;39(5):347-58.

(Pol).

Swoboda-Brunner E, Swoboda H, Neuwirth-Riedl K,

Turk R. [Objective determination of auditory

threshold in the child]. HNO 1989 Mar;37(3):

104-8. (Ger).

Tandon OP, Krishna SV. Brainstem auditory evoked

potentials in children--a normative study. Indian

Pediatr 1990 Jul;27(7):737-40.

Tropper G, Moran L, Odell P, Durieux Smith A. The

contribution of brainstem electric response audiometry (BERA) to the evaluation and

management of infants with cleft palate.

J Otolaryngol 1988;17(2):103-10.

Tucci DL, Ruth RA, Lambert PR. Use of the bone

conduction ABR Wave I response in determination

of cochlear reserve. Am J Otol 1990;11(2):119-24.

Tudehope D, Smyth V, Scott J, Rogers Y. Audiological

evaluation of very low birthweight infants.

J Paediatr Child Health 1992 Apr;28(2):172-5.

Ueda H. Brain stem (ABR) and middle latency (MLR)

auditory evoked responses in infants. Scand Audiol

1990;19(3):171-4.

Van Der Drift JFC, Brocaar MP, Van Zanten GA.

Brainstem response audiometry. I. Its use in

distinguishing between conductive and cochlear

hearing loss. Audiology 1988;27(5):260-70.

Van Der Drift JFC, Brocaar MP, Van Zanten GA.

Brainstem response audiometry. II. Classification of

hearing loss by discriminant analysis. Audiology

1988;27(5):271-8.

Van Der Drift JFC, Van Zanten GA, Brocaar MP.

Brainstem electric response audiometry: estimation

of the amount of conductive hearing loss with and

without use of the response threshold. Audiology

1989;28(4):181-93.

Van Zanten GA, Brocaar MP, Fetter WP, Baerts W.

Brainstem electric response audiometry in preterm

infants. Scand Audiol Suppl 1988;30:91-7.

Von Wedel H, Schauseil Zipf U, Doring WH. [Hearing

screening in neonates and infants using brain stem

evoked acoustic potentials]. Laryngol Rhinol Otol

(Stuttg) 1988 Jun;67(6):307-11. (Ger).

Von Wedel H, Schauseil Zipf U, Von Wedel UC.

[Limits and possibilities of leading acoustic evoked

brain stem responses for hearing screening in

newborn and infants]. Sprache Stimme Gehor 1989;

13(2):76-9. (Ger).

Wallace IF, Gravel JS, McCarton CM, Stapells DR,

Bernstein RS, Ruben RJ. Otitis media, auditory

sensitivity, and language outcomes at one year.

Laryngoscope 1988 Jan;98(1):64-70.

Warren MP. The auditory brainstem response in

pediatrics. Otolaryngol Clin North Am 1989 Jun;

22(3):473-500.

Watkin PM, Baldwin M, McEnery G. Neonatal at risk

screening and the identification of deafness. Arch

Dis Child 1991 Oct;66(10 Spec No):1130-5.

Weatherly RA, Owens JJ, Catlin FI, Mahoney DH.

cis-platinum ototoxicity in children. Laryngoscope

1991 Sep;101(9):917-24.

Wild NJ, Sheppard S, Smithells RW, Holzel H, Jones G.

Delayed detection of congenital hearing loss in high

risk infants. BMJ 1990 Oct 20;301(6757): 903-5.

Comment in: BMJ 1990 Nov 17;301(6761): 1164-5,

and BMJ 1990 Dec 8;301(6764):1332-3.

Xing J. [Auditory brainstem response in ototoxic

deafness]. Chung Hua Erh Pi Yen Hou Ko Tsa Chih

1989;24(4):199-200, 253. (Chi).

Yamamoto N, Watanabe K, Sugiura J, Okada J, Nagae

H, Fujimoto Y. Marked latency change of auditory

brainstem response in preterm infants in the early

postnatal period. Brain Dev 1990;12(6):766-9.

Yang EY, Stuart A. A method of auditory brainstem

response testing of infants using bone-conducted

clicks. J Speech Lang Pathol Audiol 1990 Dec;

14(4):69-76.

Yang EY, Stuart A, Stenstrom R, Hollett S. Effect of

vibrator to head coupling force on the auditory brain

stem response to bone conducted clicks in newborn

infants. Ear Hear 1991;12(1):55-60.

Yoshida M, Noguchi A, Uemura T. Functional hearing

loss in children. Int J Pediatr Otorhinolaryngol 1989

Jul;17(3):287-95.

Zhang L, Jiang ZD. Development of the brainstem

auditory pathway in low birthweight and perinatally

asphyxiated children with neurological sequelae.

Early Hum Dev 1992 Aug;30(1):61-73.

Otoacoustic Emissions (OAE)

Baldwin M, Watkin P. The clinical application of

oto-acoustic emissions in paediatric audiological

assessment. J Laryngol Otol 1992;106(4):301-6.

Bonfils P. Spontaneous otoacoustic emissions: clinical

interest. Laryngoscope 1989 Jul;99(7 Pt 1):752-6.

Bonfils P, Avan P, Francois M, Marie P, Trotoux J,

Narcy P. Clinical significance of otoacoustic

emissions: a perspective. Ear Hear 1990 Apr;11(2):

155-8.

Bonfils P, Avan P, Francois M, Trotoux J, Narcy P.

Distortion-product otoacoustic emissions in

neonates: normative data. Acta Otolaryngol (Stockh)

1992;112(5):739-44.

Bonfils P, Bertrand Y, Uziel A. Evoked otoacoustic

emissions: normative data and presbycusis.

Audiology 1988;27(1):27-35.

Bonfils P, Dumont A, Marie P, Francois M, Narcy P.

Evoked otoacoustic emissions in newborn hearing

screening. Laryngoscope 1990 Feb;100(2 Pt 1):

186-9.

Bonfils P, Francois M, Avan P, Londero A, Trotoux J,

Narcy P. Spontaneous and evoked otoacoustic

emissions in preterm neonates. Laryngoscope 1992

Feb;102(2):182-6.

Bonfils P, Francois M, Avan P, Trotoux J, Narcy P.

[Deafness screening in children by otoacoustic

emissions. Current data]. Ann Pediatr (Paris) 1992

Oct;39(8):501-4. (Fre).

Bonfils P, Marie P, Narcy P. [What should be expected

of oto-acoustic emissions? A critical analysis of

clinical applications of oto-acoustic emissions]. Ann

Otolaryngol Chir Cervicofac 1989;106(6):290-3.

(Fre).

Bonfils P, Uziel A, Narcy P. [Contribution of cochlear

acoustic emissions in pediatric audiology]. Ann

Otolaryngol Chir Cervicofac 1988;105(2):109-13.

(Fre).

Bonfils P, Uziel A, Narcy P. The properties of

spontaneous and evoked acoustic emissions in

neonates and children: a preliminary report. Arch

Otorhinolaryngol 1989;246(5):249-51.

Bonfils P, Uziel A, Pujol R. Evoked oto-acoustic

emissions from adults and infants: clinical

applications. Acta Otolaryngol (Stockh) 1988

May-Jun;105(5-6):445-9.

Bonfils P, Uziel A, Pujol R. Evoked otoacoustic

emissions: a fundamental and clinical survey. ORL J

Otorhinolaryngol Relat Spec 1988;50(4):212-8.

Bonfils P, Uziel A, Pujol R. Screening for auditory

dysfunction in infants by evoked oto-acoustic

emissions. Arch Otolaryngol Head Neck Surg 1988

Aug;114(8):887-90.

Buki B, Katona G, Noszek L, Jancso G, Ribari O.

[Otoacoustic emission audiometry in neonates and

adults]. Orv Hetil 1992 Nov 15;133(46):2967-9.

(Hun).

Decreton S, Hanssens K, De Sloovere M. [Evoked

oto-acoustic potentials as auditory screening tool in

school health services]. Acta Otorhinolaryngol Belg

1992;46(1):53-61. (Dut).

Decreton SJ, Hanssens K, De Sloovere M. Evoked

otoacoustic emissions in infant hearing screening.

Int J Pediatr Otorhinolaryngol 1991 May;21(3):

235-47.

Dolhen P, Hennaux C, Chantry P, Hennebert D. The

occurrence of evoked oto-acoustic emissions in a

normal adult population and neonates. Scand Audiol

1991;20(3):203-4.

Erwig H, Blomer E, Bauer HH. [Evaluation of transitory

evoked otoacoustic emissions in children with

impaired tubal ventilation]. Laryngorhinootologie

1991 Nov;70(11):635-40. (Ger).

Francois M, van Haver K, van den Abbeele T, Bonfils

P, Narcy P. [Changes of the properties of provoked

oto-emissions in tubal dysfunctions]. Ann

Otolaryngol Chir Cervicofac 1991;108(7):389-92.

(Fre).

Glattke TJ, Kujawa SG. Otoacoustic emissions. Am J

Audiol 1991 Nov;1(1):29-40.

Hauser R, Lohle E, Pedersen P. [Clinical use of click

evoked oto-acoustic emissions at the Freiburg ENT

clinic]. Laryngorhinootologie 1989 Dec;68(12):

661-6. (Ger).

Johnsen NJ, Bagi P, Parbo J, Elberling C. Evoked

acoustic emissions from the human ear. IV. Final

results in 100 neonates. Scand Audiol 1988;17(1):

27-34.

Kemp DT, Ryan S. Otoacoustic emission tests in

neonatal screening programmes. Acta Otolaryngol

Suppl (Stockh) 1991;482:73-84.

Kennedy CR, Kimm L, Dees DC, Evans PI, Hunter M,

Lenton S, Thornton RD. Otoacoustic emissions and

auditory brainstem responses in the newborn. Arch

Dis Child 1991 Oct;66(10 Spec No):1124-9.

Lafreniere D, Jung MD, Smurzynski J, Leonard G, Kim

DO, Sasek J. Distortion product and click evoked

otoacoustic emissions in healthy newborns. Arch

Otolaryngol Head Neck Surg 1991;117(12): 1382-9.

Lamprecht A. [Evoked otoacoustic emissions in normal

and hearing impaired adults and children].

Laryngorhinootologie 1991 Jan;70(1):1-4. (Ger).

Lonsbury-Martin BL, Cutler WM, Martin GK. Evidence

for the influence of aging on distortion-product

otoacoustic emissions in humans. J Acoust Soc Am

1991 Apr;89(4 Pt 1):1749-59.

Lonsbury-Martin BL, Harris FP, Stagner BB, Hawkins

MD, Martin GK. Distortion product emissions in

humans. I. Basic properties in normally hearing

subjects. Ann Otol Rhinol Laryngol Suppl 1990

May;147:3-14.

Lonsbury-Martin BL, Harris FP, Stagner BB, Hawkins

MD, Martin GK. Distortion product emissions in

humans. II. Relations to acoustic immittance and

stimulus frequency and spontaneous otoacoustic

emissions in normally hearing subjects. Ann Otol

Rhinol Laryngol Suppl 1990 May;147:15-29.

Lonsbury-Martin BL, Martin GK. The clinical utility of

distortion-product otoacoustic emissions. Ear Hear

1990 Apr;11(2):144-54.

Lonsbury-Martin BL, Whitehead ML, Martin GK.

Clinical applications of otoacoustic emissions.

J Speech Hear Res 1991 Oct;34(5):964-81.

Lutman ME, Mason SM, Sheppard S, Gibbin KP.

Differential diagnostic potential of otoacoustic

emissions: a case study. Audiology 1989;28(4):

205-10.

Lutman ME, Sheppard S. Quality estimation of click

evoked oto acoustic emissions. Scand Audiol 1990;

19(1):3-7.

Martin GK, Ohlms LA, Franklin DJ, Harris FP,

Lonsbury-Martin BL. Distortion product emissions

in humans. III. Influence of sensorineural hearing

loss. Ann Otol Rhinol Laryngol Suppl 1990 May;

147:30-42.

Martin GK, Probst R, Lonsbury-Martin BL. Otoacoustic

emissions in human ears: normative findings. Ear

Hear 1990 Apr;11(2):106-20.

Mathis A, Probst R, De Min N, Hauser R. A child with

an unusually high level spontaneous otoacoustic

emission. Arch Otolaryngol Head Neck Surg

1991;117(6):674-6.

Molini E, Simoncelli C, Ricci G, Capolunghi B, Alunni

N, von Garrel C. [Evoked oto-acoustic emissions

(EOE) as screening method in infants].

Laryngorhinootologie 1991 Aug;70(8):412-6. (Ger).

Naeve SL, Margolis RH, Levine SC, Fournier EM.

Effect of ear-canal air pressure on evoked

otoacoustic emissions. J Acoust Soc Am 1992 Apr;

91(4 Pt 1):2091-5.

Norton SJ, Widen JE. Evoked otoacoustic emissions in

normal-hearing infants and children: emerging data

and issues. Ear Hear 1990 Apr;11(2):121-7.

Ohlms LA, Lonsbury-Martin BL, Martin GK.

Acoustic-distortion products: separation of sensory

from neural dysfunction in sensorineural hearing

loss in human beings and rabbits. Otolaryngol Head

Neck Surg 1991 Feb;104(2):159-74.

Ohlms LA, Lonsbury-Martin BL, Martin GK. The

clinical application of acoustic distortion products.

Otolaryngol Head Neck Surg 1990 Jul;103(1):52-9.

Plinkert PK, Arold R, Zenner HP. [Evoked otoacoustic

emissions for hearing screening in infants].

Laryngorhinootologie 1990 Feb;69(2):108-10.

(Ger).

Plinkert PK, Sesterhenn G, Arold R, Zenner HP.

Evaluation of otoacoustic emissions in high-risk

infants by using an easy and rapid objective

auditory screening method. Eur Arch

Otorhinolaryngol 1990;247(6):356-60.

Prieve BA. Otoacoustic emissions in infants and

children: basic characteristics and clinical

application. Semin Hear 1992;13(1):37-52.

Probst R, Lonsbury-Martin BL, Martin GK. A review of

otoacoustic emissions. J Acoust Soc Am 1991

May;89(5):2027-67.

Rossi G, Solero P, Rolando M, Olina M. Are delayed

evoked oto acoustic emissions (DEOE) solely the

outcome of an active intracochlear mechanism?

Scand Audiol 1989;18(2):99-104.

Satoh N. [A study of auditory screening in infant by

evoked otoacoustic emission (EOAE)]. Hokkaido

Igaku Zasshi 1992 Mar;67(2):259-71. (Jpn).

Sequi Canet JM, Mir Plana B, Paredes Cencillo C,

Brines Solanes J, Algarra JM. [Preliminary results of

evoked acoustic oto-emissions in the neonatal

period]. An Esp Pediatr 1992 Jan;36(1):73-5. (Spa).

Simoncelli C, Molini E, Capolunghi B, Ricci G, Alunni

N, Trabalza N. [Evoked oto-acoustic potentials in

the first 60 hours of life]. Acta Otorhinolaryngol

Belg 1992;46(1):63-6. (Fre).

Spektor Z, Leonard G, Kim DO, Jung MD, Smurzynski

J. Otoacoustic emissions in normal and

hearing-impaired children and normal adults.

Laryngoscope 1991 Sep;101(9):965-76.

Stevens JC, Webb HD, Hutchinson J, Connell J, Smith

MF, Buffin JT. Click evoked otoacoustic emissions

compared with brain stem electric response. Arch

Dis Child 1989 Aug;64(8):1105-11.

Stevens JC, Webb HD, Hutchinson J, Connell J, Smith

MF, Buffin JT. Click evoked otoacoustic emissions in neonatal screening. Ear Hear 1990 Apr;11(2):

128-33.

Stevens JC, Webb HD, Hutchinson J, Connell J, Smith

MF, Buffin JT. Evaluation of click-evoked

oto-acoustic emissions in the newborn. Br J Audiol

1991 Feb;25(1):11-4.

Stevens JC, Webb HD, Smith MF, Buffin JT. The effect

of stimulus level on click evoked oto-acoustic

emissions and brainstem responses in neonates

under intensive care. Br J Audiol 1990 Oct;24(5):

293-300.

Tanaka Y, Kodera K, Suzuki M, Suzuki J. Stimulated

otoacoustic emissions in children with sensorineural

hearing loss. Acta Otolaryngol (Stockh) 1989;

107(5-6):383-6.

Uppenkamp S, Jakel M, Talartschick B, Buschel J,

Kollmeier B. [Evoked otoacoustic emissions as a

screening test for hearing evaluation in newborn and

premature infants?] Laryngorhinootologie 1992 Oct;

71(10):525-9. (Ger).

Uziel A. [Acoustic oto-emissions]. Acta

Otorhinolaryngol Belg 1991;45(2):225-36. (Fre).

Uziel A, Piron JP. Evoked otoacoustic emissions from

normal newborns and babies admitted to an

intensive care baby unit. Acta Otolaryngol Suppl

(Stockh) 1991;482:85-91; discussion 92-3.

Webb HD, Stevens JC. Auditory screening in high risk

neonates: selection of a test protocol. Clin Phys

Physiol Meas 1991 Feb;12(1):75-86.

Zwicker E, Schorn K. Delayed evoked otoacoustic

emissions--an ideal screening test for excluding

hearing impairment in infants. Audiology 1990;

29(5):241-51.

High Risk Register/Other Risk Factors

Adelman C, Linder N, Levi H. Auditory nerve and brain

stem evoked response thresholds in infants treated

with gentamicin as neonates. Ann Otol Rhinol

Laryngol 1989 Apr;98(4 Pt 1):283-6.

Adler SP. Cytomegalovirus and pregnancy. Curr Opin

Obstet Gynecol 1992 Oct;4(5):670-5.

Albera R, Pia F, Morra B, Lacilla M, Bianco L, Gabutti

V, Piga A. Hearing loss and desferrioxamine in

homozygous beta thalassemia. Audiology

1988;27(4):207-14.

Allen MC, Capute AJ. Neonatal neurodevelopmental

examination as a predictor of neuromotor outcome

in premature infants. Pediatrics 1989 Apr;83(4):

498-506.

Anagnostakis D, Messaritakis J. Hearing loss in

high-risk neonates [letter]. J Pediatr 1990 Feb;

116(2):316. Comment on: J Pediatr 1989 May;

114(5):847-52.

Anand NK, Gupta AK, Raj H. Auditory brainstem

response in neonates with

hypoxic-ischemic-encephalopathy following

perinatal asphyxia. Indian Pediatr 1991 Aug;

28(8):901-7.

Anday EK, Cohen ME, Kelley NE, Leitner DS. Effect

of in utero cocaine exposure on startle and its

modification. Dev Pharmacol Ther 1989;12(3):

137-45.

Argiolu F, Diana G, Avignone A, Cao A, Di Ninni S.

Hearing impairment during deferoxamine therapy for

thalassemia major [letter]. J Pediatr 1991 May;

118(5):826-7. Comment on: J Pediatr 1990 Aug;

117(2 Pt 1):326-30.

Armas Ramos H, Hernandez Gonzalez R, Monserrat Gili

JR, Cardona Guerra P, Gonzalez Gonzalez NL.

[Neurosensory defects secondary to neonatal

hyperbilirubinemia]. An Esp Pediatr 1989 Mar;

30(3):166-70. (Spa).

Ashoor A, Baraka ME, Al Umran K, Al Fadel MS,

Dawodu AH, Badran O. Hearing screening of

infants at King Fahd Hospital of the University. Ann

Saudi Med 1992;12(4):377-80.

Astbury J, Orgill AA, Bajuk B, Yu VY.

Neurodevelopmental outcome, growth and health of

extremely low-birthweight survivors: how soon can

we tell? Dev Med Child Neurol 1990 Jul;32(7):

582-9.

Audiologic screening of newborn infants who are at risk

for hearing impairment. ASHA 1989 Mar;31(3):

89-92.

Aust G, Foll U, Lutt B, Schaffrath R. [Hearing handicap

in childhood--responsibilities of public health, early

diagnosis]. Off Gesundheitswes 1989 Jan;51(1):2-6.

(Ger).

Bakht FR, Gentry LO. Toxoplasmosis in pregnancy: an

emerging concern for family physicians. Am Fam

Physician 1992 Apr;45(4):1683-90.

Ballot DE, Rothberg AD, Katz BJ. Speech and hearing

problems in a high-risk population. S Afr Med J

1992 Jul;82(1):23-6.

Barnett ED, Klein JO, Pelton SI, Luginbuhl LM. Otitis

media in children born to human immunodeficiency

virus-infected mothers. Pediatr Infect Dis J 1992

May;11(5):360-4.

Bauchner H, Brown E, Peskin J. Premature graduates of

the newborn intensive care unit: a guide to

followup. Pediatr Clin North Am 1988;35(6):

1207-26.

Beckham RW, Mishoe SC. Sound levels inside

incubators and oxygen hoods used with nebulizers

and humidifiers... reprinted from 1982. Respir Care

1990 Dec;35(12):1272-9.

Begall K, Pethe J. [Systematic hearing diagnosis in the

premature infant. The magdeburg model]. HNO

1992 Oct;40(10):392-5. (Ger).

Bell WE. Bacterial meningitis in children: selected

aspects. Pediatr Clin North Am 1992;39(4):651-68.

Bendel J, Palti H, Winter S, Ornoy A. Prevalence of

disabilities in a national sample of 3-year-old Israeli

children. Isr J Med Sci 1989 May;25(5):264-70.

Bentur Y, Koren G, Tesoro A, Carley H, Olivieri N,

Freedman MH. Comparison of deferoxamine

pharmacokinetics between asymptomatic thalassemic

children and those exhibiting severe neurotoxicity.

Clin Pharmacol Ther 1990;47(4):478-82.

Bergner L. Medical evaluation of children adopted from

abroad [letter]. New Engl J Med 1992 Feb 6;

326(6):409; discussion 410.

Birkebaek NH, Tommerup BE. [Hearing loss among

premature and full-term infants in Rinkobing county.

Results of tone and speech audiometry]. Ugeskr

Laeger 1991 Jan 7;153(2):107-9. (Dan).

Boppana SB, Pass RF, Britt WJ, Stagno S, Alford CA.

Symptomatic congenital cytomegalovirus infection:

neonatal morbidity and mortality. Pediatr Infect

Dis J 1992;11(2):93-9.

Bregman J, Farrell EE. Neurodevelopmental outcome in

infants with bronchopulmonary dysplasia. Clin

Perinatol 1992;19(3):673-94.

Bresson K. [Hearing loss in premature infants (letter)].

Ugeskr Laeger 1991 Feb 25;153(9):668-9. (Dan).

Brock PR, Bellman SC, Yeomans EC, Pinkerton CR,

Pritchard J. Cisplatin ototoxicity in children: a

practical grading system. Med Pediatr Oncol 1991;

19(4):295-300.

Brock PR, Yeomans EC, Bellman SC, Pritchard J.

Cisplatin therapy in infants: short and long-term

morbidity. Br J Cancer 1992;66 Suppl 18:S36-S40.

Brookhouser PE, Auslander MC, Meskan ME. The

pattern and stability of postmeningitic hearing loss

in children. Laryngoscope 1988 Sep;98(9):940-8.

Brookhouser PE, Worthington DW, Kelly WJ.

Noise-induced hearing loss in children.

Laryngoscope 1992 Jun;102(6):645-55.

Brown DP. ABR audiometry in Cornelia de Lange

syndrome. Paper presented at: Annual Convention of

the American Speech-Language-Hearing

Association; 1990 Nov 16-19; Seattle, WA. 20 p.

Available from: ERIC, Arlington, VA.

Brown DR, Watchko JF, Sabo D. Neonatal sensorineural

hearing loss associated with furosemide: a

case-control study. Dev Med Child Neurol 1991

Sep;33(9):816-23.

Brown J, Watson E, Alberman E. Screening infants for

hearing loss. Arch Dis Child 1989 Oct;64(10):

1488-95.

Bruning-de Bruyn RB. [Mother knows best; the

diagnosis of prelingual deafness (letter)]. Ned

Tijdschr Geneeskd 1992 Sep 19;136(38):1878.

(Dut).

Bubalo FS, Davidson DD. Recent developments in

hereditary nephritis (Alport’s syndrome). Indiana

Med 1991 Dec;84(12):860-6.

Buhrer C, Weinel P, Sauter S, Reiter A, Riehm H,

Laszig R. Acute onset deafness in a 4-year-old girl

after a single infusion of cis-platinum. Pediatr

Hematol Oncol 1990;7(2):145-8.

Buren M, Solem BS, Laukli E. Threshold of hearing

(0.125 20 kHz) in children and youngsters. Br J

Audiol 1992;26(1):23-31.

Burkhart KK, Metcalf S, Shurnas E, O’Meara O, Brent

J, Kulig K, Rumack BH. Exchange transfusion and

multidose activated charcoal following vancomycin

overdose. J Toxicol Clin Toxicol 1992;30(2):

285-94.

Caldas A, Broyer M, Dechaux M, Kleinknecht C.

Primary distal tubular acidosis in childhood: clinical

study and long-term follow-up of 28 patients.

J Pediatr 1992;121(2):233-41.

Cantani A. Genetic causes of hearing loss in children.

Padiatr Padol 1989;24(4):321-30.

Capova L. [Present possibilities of early diagnosis of

hearing disorders in children belonging to the

youngest age groups]. Cesk Pediatr 1992 Aug;

47(8):471-4. (Slo).

Carter BS, Wilkening RB. Prevention of hearing

disorders: neonatal causes of hearing loss. Semin

Hear 1991;12(2):154-67.

Carzoli RP. Infant hearing impairment screening. Risk

factors and testing. J Fla Med Assoc 1991 Mar;

78(3):163-7.

Carzoli RP, Murphy SP, Hammer-Knisely J, Houy J.

Evaluation of auditory brain-stem response in

full-term infants of cocaine-abusing mothers. Am J

Dis Child 1991 Sep;145(9):1013-6.

Castello MA, Clerico A, Deb G, Dominici C, Fidani P,

Donfrancesco A. High-dose carboplatin in

combination with etoposide (JET regimen) for

childhood brain tumors. Am J Pediatr Hematol

Oncol 1990 Fall;12(3):297-300.

Castello MA, Clerico A, Jenkner A, Dominici C.

A pilot study of high-dose carboplatin and pulsed

etoposide in the treatment of childhood solid tumors.

Pediatr Hematol Oncol 1990;7(2):129-35.

Catterson J, Johnson A. Low birthweight babies:

monitoring child development. Nurs Times 1990 Oct

10-17;86(41):26-9.

Chaloupkova J, Kollar A. [Auditory function in children

and adolescents with diabetes mellitus]. Sb Lek

1990 Jul;92(6-7):219-23. (Cze).

Charuvanij A, Visudhiphan P, Chiemchanya S, Tawin C.

Sensorineural hearing loss in children recovered

from purulent meningitis: a study in Thai children at

Ramathibodi Hospital. J Med Assoc Thai 1990

May;73(5):253-7.

Church MW, Gerkin KP. Hearing disorders in children

with fetal alcohol syndrome: findings from case

reports. Pediatrics 1988 Aug;82(2):147-54.

Clark DA. Neonates and infants at risk for hearing and

speech-language disorders. Top Lang Disord 1989

Dec;10(1):1-12.

Coakley JC, Keir EH, Connelly JF. The association of

thyroid dyshormonogenesis and deafness (Pendred

syndrome): experience of the Victorian Neonatal

Thyroid Screening Programme. J Paediatr Child

Health 1992 Oct;28(5):398-401.

Cockrell JL, Gregory SA. Audiological deficits in

brain-injured children and adolescents. Brain Inj

1992 May-Jun;6(3):261-6.

Cohen BA, Schenk VA, Sweeney DB.

Meningitis-related hearing loss evaluated with

evoked potentials. Pediatr Neurol 1988 Jan-Feb;

4(1):18-22.

Cohen BH, Zweidler P, Goldwein JW, Molloy J, Packer

RJ. Ototoxic effect of cisplatin in children with

brain tumors. Pediatr Neurosurg 1990-91;

16(6):292-6.

Colding H, Andersen EA, Prytz S, Wulffsberg H,

Andersen GE. Auditory function after continuous

infusion of gentamicin to high risk newborns. Acta

Paediatr Scand 1989;78(6):840-3.

Connolly PK, Jerger S, Williamson WD, Smith RJ,

Demmler G. Evaluation of higher-level auditory

function in children with asymptomatic congenital

cytomegalovirus infection. Am J Otol 1992 Mar;

13(2):185-93.

Coupland SG, Ponton CW, Eggermont JJ, Bowen TJ,

Grant RM. Assessment of cisplatin-induced

ototoxicity using derived-band ABRs. Int J Pediatr

Otorhinolaryngol 1991 Oct;22(3):237-48.

Cox C, Hack M, Aram D, Borawski E. Neonatal

auditory brainstem response failure of very low birth

weight infants: 8-year outcome. Pediatr Res 1992

Jan;31(1):68-72.

Cremers CW, van Rijn PM. Acquired causes of deafness

in childhood. Ann N Y Acad Sci 1991;

630:197-202.

Cremers CW, van Rijn PM, Admiraal RJ. [Meningitis as

cause of prelingual deafness (letter)]. Ned Tijdschr

Geneeskd 1989 Aug 5;133(31):1562-3. (Dut).

Cremers CW, van Rijn PM, Hageman MJ. Prevention of

serious hearing impairment of deafness in the young

child. J R Soc Med 1989 Aug;82(8):484-7.

Dahle AJ, McCollister FP. Audiological findings in

children with neonatal herpes. Ear Hear 1988 Oct;

9(5):256-8.

Daly K, Giebink GS, Le CT, Lindgren B, Batalden PB,

Anderson RS, Russ JN. Determining risk for chronic

otitis media with effusion. Pediatr Infect Dis J

1988;7(7):471-5.

Das VK. Adverse perinatal factors in the causation of

sensorineural hearing impairment in young children.

Int J Pediatr Otorhinolaryngol 1991 Apr;21(2):

121-5.

Das VK. Aetiology of bilateral sensorineural deafness in

children. J Laryngol Otol 1988 Nov;102(11):

975-80.

Davies B. Auditory disorders in Down’s syndrome.

Scand Audiol Suppl 1988;30:65-8.

Davies EG, Gibb D, Kroll S, Levin M, Rudd P, Tarlow

MJ, Thomson A. Should we use dexamethasone in

meningitis? Arch Dis Child 1992; 67(11):1398-401.

Davis A, Wood S. The epidemiology of childhood

hearing impairment: factor relevant to planning of

services. Br J Audiol 1992 Apr;26(2):77-90.

Dawson JA, Wardle R. Detection and prevalence of

hearing loss in a cohort of children following

serogroup B, meningococcal infection 1983-1987.

Public Health 1990 Mar;104(2):99-102.

Dawson KP, Abbott GD, Mogridge N. Bacterial

meningitis in childhood: a 13 year review. N Z Med

J 1988 Nov 9;101(857):758-60.

De Louvois J, Harvey D. Antibiotic therapy of the

newborn. Clin Perinatol 1988 Jun;15(2):365-88.

Deka RC. Auditory brainstem evoked responses in

infants and children. Indian J Pediatr 1992

May-Jun;59(3):361-6.

Deliac PH, Demarquez JL, Barberot JP, Sandler B, Paty

J. Brainstem auditory evoked potentials in icteric

fullterm newborns: alterations after exchange

transfusion. Neuropediatrics 1990;21(3):115-8.

Devilat M, Tosso M, Espinoza N, Mellado L, Thick E,

Rimasa A. [Auditory brainstem evoked potentials in

hearing loss after bacterial meningitis]. Rev Chil

Pediatr 1990 Sep-Oct;61(5):258-61. (Spa).

Dexamethasone for bacterial meningitis in children.

Nurses Drug Alert 1990 Oct;14(10):76-7.

Diefendorf AO, Renshaw JJ, Cox JB, Reitz PS. Infant

hearing screening. Ear Nose Throat J 1992 Oct;

71(10):503-7.

Dietrich KN, Succop PA, Berger OG, Keith RW. Lead

exposure and the central auditory processing

abilities and cognitive development of urban

children: the Cincinnati Lead Study cohort at age 5

years. Neurotoxicol Teratol 1992 Jan-Feb;14(1):

51-6.

Dixit A, Govil S, Patel NV. Culture appropriate

indicators for monitoring growth and development

of urban and rural children below 6 years. Indian

Pediatr 1992 Mar;29(3):291-9.

Donald PR, Doherty E, Van Zyl FJ. Hearing loss in the

child following streptomycin administration during

pregnancy. Cent Afr J Med 1991 Aug;37(8): 268-71.

Doyle LW, Keir E, Kitchen WH, Ford GW, Rickards

AL, Kelly EA. Audiologic assessment of extremely

low birth weight infants: a preliminary report.

Pediatrics 1992 Nov;90(5):744-9.

D’Souza SW. Outcome of modern intensive care for low

birthweight infants. Midwife Health Visit

Community Nurse 1988 Nov;24(11):484-8.

Duncan NO 3d, Miller RH, Catlin FI. Choanal atresia

and associated anomalies: the CHARGE association.

Int J Pediatr Otorhinolaryngol 1988; 15(2):129-35.

Durieux-Smith A, Picton TW, Bernard P, MacMurray B,

Goodman JT. Prognostic validity of brainstem

electric response audiometry in infants of a neonatal

intensive care unit. Audiology 1991;30(5):249-65.

Eight-year outcome in infants with birth weight of 500

to 999 grams: continuing regional study of 1979 and

1980 births. Victorian Infant Collaborative Study

Group. J Pediatr 1991 May;118(5):761-7.

Ellison PH, Petersen MB, Gorman WA, Sharpsteen D.

A comparison of neurological assessment scores

from two cohorts of low-birthweight children

evaluated at age four years: Dublin and

Copenhagen. Neuropediatrics 1992 Apr;23(2):

68-71.

Erythromycin and hearing loss. Emerg Med 1992

Jun 15;24(8):232, 234.

Esbjorner E, Larsson P, Leissner P, Wranne L. The

serum reserve albumin concentration for

monoacetyldiaminodiphenyl sulphone and auditory

evoked responses during neonatal

hyperbilirubinaemia. Acta Paediatr Scand 1991;

80(4):406-12.

Figueras Aloy J, Botet Mussons F, Jimenez Gonzalez R.

[Pattern of survival and sequelae in very low birth

weight infants]. An Esp Pediatr 1990 Dec;

33(6):542-8. (Spa).

Fjermedal O. Hearing identification in difficult-to-test

children. A study of 142 infants and children. Scand

Audiol 1989;18(3):185-91.

Fjermedal O, Laukli E. [Preventive health care. Early

detection of hearing loss in children. A challenge to

health services]. Fag Tidsskr Sykepleien 1990

Sep 20;78(6):23-7. (Nor).

Fortnum HM. Hearing impairment after bacterial

meningitis: a review. Arch Dis Child 1992 Sep;

67(9):1128-33.

Fortnum HM, Hull D. Is hearing assessed after bacterial

meningitis? Arch Dis Child 1992 Sep; 67(9):1111-2.

Fowler KB, Stagno S, Pass RF, Britt WJ, Boll TJ,

Alford CA. The outcome of congenital

cytomegalovirus infection in relation to maternal

antibody status. N Engl J Med 1992 Mar 5;326(10):

663-7. Comment in: N Engl J Med 1992 Mar 5;

326(10):702-3.

Francois M. [Detection of deafness in children]. Rev

Infirm 1989 Jan;39(2):31-4. (Fre).

Freij BJ, South MA, Sever JL. Maternal rubella and the

congenital rubella syndrome. Clin Perinatol 1988

Jun;15(2):247-57.

Froom J, Culpepper L. Otitis media in day-care children.

A report from the International Primary Care

Network. J Fam Pract 1991 Mar;32(3): 289-94.

Ganga N, Rajagopal B, Rajendran S, Padmanabhan AS.

Deafness in children--an analysis. Indian Pediatr

1991 Mar;28(3):273-6.

Gerber SE. Review of a high risk register for congenital

or early-onset deafness. Br J Audiol 1990

Oct;24(5):347-56.

Gerhardt KJ. Prenatal and perinatal risks of hearing loss.

Semin Perinatol 1990 Aug;14(4):299-304.

Girgis NI, Farid Z, Mikhail IA, Farrag I, Sultan Y,

Kilpatrick ME. Dexamethasone treatment for

bacterial meningitis in children and adults. Pediatr

Infect Dis J 1989;8(12):848-51.

Goodman JT, Malizia KE, Durieux-Smith A,

MacMurray B, Bernard P. Bayley developmental

performance at two years of age of neonates at risk

for hearing loss. Dev Med Child Neurol 1990 Aug;

32(8):689-97.

Gorga MP, Kaminski JR, Beauchaine KA. Auditory

brain stem responses from graduates of an intensive

care nursery using an insert earphone. Ear Hear

1988;9(3):144-7.

Gravel JS, McCarton CM, Ruben RJ. Otitis media in

neonatal intensive care unit graduates: a 1-year

prospective study. Pediatrics 1988 Jul;82(1):44-9.

Gravel JS, McCarton CM, Ruben RJ. A prospective

study of otitis media in infants born at very-low

birthweight. Acta Otolaryngol (Stockh) 1988

May-Jun;105(5-6):516-21.

Greville A. High risk children with deafness [letter].

N Z Med J 1991 Aug 14;104(917):344.

Grogaard JB, Lindstrom DP, Parker RA, Culley B,

Stahlman MT. Increased survival rate in very low

birth weight infants (1500 grams or less): no

association with increased incidence of handicaps.

J Pediatr 1990 Jul;117(1 Pt 1):139-46. Comment in:

J Pediatr 1991 Feb;118(2):322-3.

Guidelines for the audiologic assessment of children

from birth through 36 months of age. Committee on

Infant Hearing American Speech-Language-Hearing

Association. ASHA Suppl 1991 Mar;33(5):37-43.

Guidelines for the identification of hearing impairment

in at risk infants age birth to 6 months. ASHA 1988

Apr;30(4):61-4.

Gupta AK, Anand NK, Raj H. Evaluation of risk factors

for hearing impairment in at risk neonates by

brainstem evoked response audiometry (BERA).

Indian J Pediatr 1991 Nov-Dec;58(6):849-55.

Gupta AK, Raj H, Anand NK. Auditory brainstem

responses (ABR) in neonates with

hyperbilirubinemia. Indian J Pediatr 1990 Sep-Oct;

57(5):705-11.

Hadjilaskari P, Fengler R, Hartmann R, Henze G.

[Ototoxicity of cisplatin in children with malignant

diseases]. Klin Padiatr 1989 Jul-Aug;201(4):316-21.

(Ger).

Hall JW 3d. Auditory evoked responses in the

management of acutely brain injured children and

adults. Am J Otol 1988;9 Suppl:36-46.

Hall JW 3d, Tucker DA. Auditory brainstem response in

the evaluation of peripheral versus central nervous

system dysfunction in the pediatric intensive care

unit. Semin Hear 1988;9(1):47-60.

Handrick W, Schille R, Jaeger HD, Tauchnitz C.

[Ototoxicity of neomycin]. Kinderarztl Prax 1988

Jun;56(6):283-7. (Ger).

Handzic J, Subotic R, Sprem N, Bagatin M. [Hearing

disorders in patients with cleft lip and palate]. Chir

Maxillofac Plast 1989;19(1-3):19-23. (Scr).

Hanna JN, Wild BE. Bacterial meningitis in children

under five years of age in Western Australia. Med J

Aust 1991 Aug 5;155(3):160-4.

Hartmann O, Pinkerton CR, Philip T, Zucker JM,

Breatnach F. Very-high-dose cisplatin and etoposide

in children with untreated advanced neuroblastoma.

J Clin Oncol 1988 Jan;6(1):44-50.

Havens PL, Wendelberger KJ, Hoffman GM, Lee MB,

Chusid MJ. Corticosteroids as adjunctive therapy in

bacterial meningitis. A meta analysis of clinical

trials. Am J Dis Child 1989;143(9):1051-5.

Helias J, Chobaut JC, Mourot M, Lafon JC. Early

detection of hearing loss in children with cleft

palates by brain-stem auditory response. Arch

Otolaryngol Head Neck Surg 1988 Feb;114(2):

154-6.

Hellmund S, Begall K, Preibisch-Effenberger R.

[Meningitis and hearing damage in children]. Padiatr

Grenzgeb 1990;29(1):13-7. (Ger).

Hellstrom PA, Dengerink HA, Axelsson A. Noise levels

from toys and recreational articles for children and

teenagers. Br J Audiol 1992;26(5): 267-70.

Helm K, Lane AT, Orosz J, Metlay L. Systemic

cytomegalovirus in a patient with the keratitis,

ichthyosis, and deafness (KID) syndrome. Pediatr

Dermatol 1990 Mar;7(1):54-6.

Hendricks-Munoz KD, Walton JP. Hearing loss in

infants with persistent fetal circulation. Pediatrics

1988 May;81(5):650-6. Comment in: Pediatrics 1989

May;83(5):807-8.

Hickson LM, Alcock D. Progressive hearing loss in

children with congenital cytomegalovirus. J Paediatr

Child Health 1991 Apr;27(2):105-7. Comment in:

J Paediatr Child Health 1991 Apr;27(2):74-5.

Hinton AE, Buckley G. Parental smoking and middle

ear effusions in children. J Laryngol Otol 1988;

102(11):992-6.

Hirsch JE, Margolis RH, Rykken JR. A comparison of

acoustic reflex and auditory brain stem response

screening of high-risk infants. Ear Hear 1992 Jun;

13(3):181-6.

Hoing R. [Inner ear changes in fetal asphyxia].

Laryngorhinootologie 1991 Feb;70(2):72-7. (Ger).

Holst K, Andersen E, Philip J, Henningsen I. Antenatal

and perinatal conditions correlated to handicap

among 4-year-old children. Am J Perinatol 1989

Apr;6(2):258-67.

Hulseman ML, Norman LA. The neonatal ICU graduate:

Part I. Common problems. Am Fam Physician 1992

Mar;45(3):1301-5.

Hyde ML, Malizia K, Riko K, Alberti PW. Audiometric

estimation error with the ABR in high risk infants.

Acta Otolaryngol (Stockh) 1991; 111(2):212-9.

Hyde ML, Riko K, Malizia K. Audiometric accuracy of

the click ABR in infants at risk for hearing loss.

J Am Acad Audiol 1990 Apr;1(2):59-66.

Hydzik CA. Late effects of chemotherapy: implications

for patient management and rehabilitation. Nurs Clin

North Am 1990 Jun;25(2):423-46.

Ikeda K, Kobayashi T, Itoh Z, Kusakari J, Takasaka T.

Evaluation of vitamin D metabolism in patients with

bilateral sensorineural hearing loss. Am J Otol

1989;10(1):11-3.

Improvement of outcome for infants of birth weight

under 1000 g. The Victorian Infant Collaborative

Study Group. Arch Dis Child 1991 Jul;

66(7 Spec No):765-9.

Jacobson CA, Jacobson JT. Follow-up services in

newborn hearing screening programs. J Am Acad

Audiol 1990 Oct;1(4):181-6.

Jacobson GP, Burtka MJ, Wharton JA, Newman CW,

Shepherd N, Turner RG. Infant hearing screening

1984 to 1989: the Henry Ford Hospital experience.

Henry Ford Hosp Med J 1990;38(1):39-43.

Jacobson JT, Jacobson CA, Spahr RC. Automated and

conventional ABR screening techniques in high-risk

infants. J Am Acad Audiol 1990 Oct;1(4):187-95.

Jahrsdoerfer RA, Aguilar EA, Yeakley JW, Cole RR.

Treacher Collings syndrome: an otologic challenge.

Ann Otol Rhinol Laryngol 1989;98(10):807-12.

Jiang ZD, Liu XY, Wu YY, Zheng MS, Liu HC.

Long-term impairments of brain and auditory

functions of children recovered from purulent

meningitis. Dev Med Child Neurol 1990 Jun;

32(6):473-80.

Jiang ZD, Wu YY, Liu XY. Early development of

brainstem auditory evoked potentials in Down’s

syndrome. Early Hum Dev 1990;23(1):41-51.

Johnson A, Ashurst H. Screening for sensorineural

deafness by health visitors. The Steering Committee,

Oxford Region Child Development Project. Arch

Dis Child 1990 Aug;65(8):841-5.

Joint Committee on Infant Hearing 1990 position

statement. ASHA Suppl 1991 Mar;33(5):3-6.

Jure R, Rapin I, Tuchman RF. Hearing-impaired autistic

children. Dev Med Child Neurol 1991 Dec;

33(12):1062-72.

Kaga M, Murakami T, Naitoh H, Nihei K. Studies on

pediatric patients with absent auditory brainstem

response (ABR) later components. Brain Dev 1990;

12(4):380-4.

Katona G, Farkas Z, Revai K, Szabo M. [Follow-up

studies of patients with neonatal icterus using

acoustic evoked potential audiometry]. Orv Hetil

1989 May 7;130(19):1001-4. (Hun).

Kayan A, Bellman H. Bilateral sensorineural hearing

loss due to mumps. Br J Clin Pract 1990 Dec;

44(12):757-9.

Keith CG. Congenital rubella infection from reinfection

of previously immunised mothers. Aust N Z J

Ophthalmol 1991 Nov;19(4):291-3. Comment in:

Aust N Z J Ophthalmol 1991 Nov;19(4):257.

Kennedy WA, Hoyt MJ, McCracken GH Jr. The role of

corticosteroid therapy in children with

pneumococcal meningitis. Am J Dis Child 1991;

145(12):1374-8.

Kirkbride P, Plowman PN. Platinum chemotherapy,

radiotherapy and the inner ear: implications for

‘standard’ radiation portals. Br J Radiol 1989;

62(737):457-62.

Kitamoto I, Kukita J, Kurokawa T, Chen YJ, Minami T,

Ueda K. Transient neurologic abnormalities and

BAEPs in high risk infants. Pediatr Neurol 1990;

6(5):319-25.

Kitchen WH, Rickards AL, Doyle LW, Ford GW, Kelly

EA, Callanan C. Improvement in outcome for very

low birthweight children: apparent or real? Med J

Aust 1992 Aug 3;156(3):154-8.

Kluba J, Kluba U, von Specht H, Mittler U. [Monitoring

hearing during ototoxic cisplatin therapy]. Padiatr

Grenzgeb 1990;29(1):19-23. (Ger).

Koehn D, Morgan K, Fraser FC. Recurrence risks for

near relatives of children with sensori neural

deafness. Genet Couns 1990;1(2):127-32.

Koga K, Kawashiro N, Nakayama T, Makino S.

Immunological study on association between mumps and infantile unilateral deafness. Acta Otolaryngol

Suppl (Stockh) 1988;456:55-60.

Koltai PJ, Maisel BO, Seskin F, Arenson E. Otitis media

in the immunosuppressed child. Ear Nose Throat J

1988;67(2):88-98.

Kraft E, Zorowka P, Heinemann M. [Diagnosis and

therapy of Pendred syndrome]. Sprache Stimme

Gehor 1991;15(2):45-7. (Ger).

Kramer SJ, Vertes DR, Condon M. Auditory brainstem

responses and clinical follow-up of high-risk infants.

Pediatrics 1989 Mar;83(3):385-92.

Kretschmar CS, Warren MP, Lavally BL, Dyer S,

Tarbell NJ. Ototoxicity of preradiation cisplatin for

children with central nervous system tumors. J Clin

Oncol 1990 Jul;8(7):1191-8.

Lefebvre F, Bard H, Veilleux A, Martel C. Outcome at

school age of children with birthweights of 1000

grams or less. Dev Med Child Neurol 1988;30(2):

170-80.

Lenzi A, Zaghis A. Incidence of genetic factors in the

causation of deafness in childhood. Scand Audiol

Suppl 1988;30:37-41.

Levine BA, Shelton C, Berliner KI, Sheehy JL.

Sensorineural loss in chronic otitis media. Is it

clinically significant? Arch Otolaryngol Head Neck

Surg 1989;115(7):814-6.

Liu Z, Wang E, Taylor W, Yu H, Wu T, Wan Z, Huang

Y, Ni Z, Sackett D. Prevalence survey of

cytomegalovirus infection in children in Chengdu.

Am J Epidemiol 1990 Jan;131(1):143-50.

Lobovska A, Sejna J, Kouba K, Kulkova H. [The role of

cytomegaloviruses in childhood deafness]. Cas Lek

Cesk 1990 May 25;129(21):654-6. (Cze).

Lokman S, Loh T, Said H, Omar I. Incidence and

management of middle ear effusion in cleft palate

patients. Med J Malaysia 1992 Mar;47(1):51-5.

Lopez Moya JJ, Alvarez Vicent JJ. [Follow-up and

evaluation by means of brain stem evoked potentials

of a pediatric population diagnosed as having had

fetal distress]. Acta Otorrinolaringol Esp 1989

Jan-Feb;40(1):1-12. (Spa).

Lopez Moya JJ, Alvarez Vicent JJ. [Follow-up and

evaluation using brain-stem evoked potentials of a

pediatric population diagnosed as premature]. Acta

Otorrinolaringol Esp 1989 Mar-Apr;40(2):115-20.

(Spa).

Lopponen H, Sorri M, Serlo W, von Wendt L.

Audiological findings of shunt-treated hydrocephalus

in children. Int J Pediatr Otorhinolaryngol 1989

Sep;18(1):21-30.

Ma KH, Tang PS, Chan KW. Aural tuberculosis. Am J

Otol 1990 May;11(3):174-7.

Mace AL, Wallace KL, Whan MQ, Stelmachowicz PG.

Relevant factors in the identification of hearing loss.

Ear Hear 1991 Aug;12(4):287-93.

Madell JR, Sculerati N. Noncongenital hereditary

hearing loss in children. Prospective documentation.

Arch Otolaryngol Head Neck Surg 1991 Mar;

117(3):332-5.

Majnemer A, Rosenblatt B, Riley P. Prognostic

significance of the auditory brainstem evoked

response in high risk neonates. Dev Med Child

Neurol 1988;30(1):43-52.

Mali M, Tyler P, Brookfield DS. Developmental

outcome of high-risk neonates in North

Staffordshire. Child Care Health Dev 1989

Mar-Apr;15(2):137-45.

Marlow N, Chiswick ML. Neurodevelopmental outcome

of babies weighing less than 2001 g at birth:

influence of perinatal transfer and mechanical

ventilation. Arch Dis Child 1988 Sep;63(9):

1069-74.

Marres HA, Cremers CW. Autosomal recessive

nonsyndromal profound childhood deafness in a

large pedigree. Audiometric features of the affected

persons and the obligate carriers. Arch Otolaryngol

Head Neck Surg 1989;115(5):591-5.

Marres HA, Cremers CW. Congenital conductive or

mixed deafness, preauricular sinus, external ear

anomaly, and commissural lip pits: an autosomal

dominant inherited syndrome. Ann Otol Rhinol

Laryngol 1991;100(11):928-32.

Marron MJ, Crisafi MA, Driscoll JM Jr, Wung JT,

Driscoll YT, Fay TH. Hearing and

neurodevelopmental outcome in survivors of

persistent pulmonary hypertension of the newborn.

Pediatrics 1992;90(3 Pt 1):392-6.

Marsh RR, Handler SD. Hearing impairment in

ventilator-dependent infants and children. Int J

Pediatr Otorhinolaryngol 1990 Dec;20(3):213-7.

Matz GJ. Clinical perspectives on ototoxic drugs. Ann

Otol Rhinol Laryngol Suppl 1990 Jun;148:39-41.

Mauk GW, White KR, Mortensen LB, Behrens TR. The

effectiveness of screening programs based on

high-risk characteristics in early identification of

hearing impairment. Ear Hear 1991 Oct;12(5):

312-9.

Mazer B, Piper M, Ramsay M. Developmental outcome

in very low birth weight infants 6 to 36 months old.

J Dev Behav Pediatr 1988 Oct;9(5):293-7.

McCall S, Ferraro JA. Pediatric ABR screening:

pass-fail rates in awake versus asleep neonates.

J Am Acad Audiol 1991 Jan;2(1):18-23.

McClelland RJ, Watson DR, Lawless V, Houston HG,

Adams D. Reliability and effectiveness of screening

for hearing loss in high risk neonates. BMJ 1992

Mar 28;304(6830):806-9.

McGee T, Wolters C, Stein L, Kraus N, Johnson D,

Boyer K, Mets M, Roizen N, Beckman J, Meier P,

et al. Absence of sensorineural hearing loss in

treated infants and children with congenital

toxoplasmosis. Otolaryngol Head Neck Surg 1992

Jan;106(1):75-80.

McGuirt WF Jr, Stool SE. Temporal bone fractures in

children: a review with emphasis on long-term

sequelae. Clin Pediatr 1992;31(1):12-8.

McRorie TI, Bosso J, Randolph L. Aminoglycoside

ototoxicity in cystic fibrosis. Evaluation by high

frequency audiometry. Am J Dis Child 1989;

143(11):1328-32.

Moatti L, Garabedian EN, Lacombe H, Spir-Jacob C.

[Congenital sensorineural deafness and associated

syndromes]. Ann Otolaryngol Chir Cervicofac

1990;107(3):181-6. (Fre).

Moore JM, Thompson G, Folsom RC. Auditory

responsiveness of premature infants utilizing visual

reinforcement audiometry (VRA). Ear Hear 1992

Jun;13(3):187-94.

Moore WG, Josephson JA, Mauk GW. Identification of

children with hearing impairments: a baseline

survey. Volta Rev 1991 May;93(4):187-96.

Moran LM, Durieux-Smith A, Malizia K. Brainstem

electric response audiometry (BERA) in the

evaluation of hearing loss in infants with cleft

palate. J Speech Lang Pathol Audiol 1989 Sep;

13(3):43-7.

Morgenstern C, Scheidt A, Kau R, Niessen A.

[Cytomegalovirus infection and inner ear deafness].

Laryngorhinootologie 1989 Sep;68(9):503-5. (Ger).

Mosca F, Giustardi A, Orbinato F. [Evoked auditory

potentials in neonatal hyperbilirubinemia]. Acta

Otorhinolaryngol Ital 1990 Nov-Dec;10(6):549-58.

(Ita).

Murakami T, Inoue S, Sasaki K, Fujimoto T. Studies on

age-dependent plasma platinum pharmacokinetics

and ototoxicity of cisplatin. Sel Cancer Ther 1990

Fall;6(3):145-51.

Murray AD. Newborn auditory brainstem evoked

responses (ABRs): longitudinal correlates in the first

year. Child Dev 1988 Dec;59(6):1542-54.

Mutton PE, Beckenham EJ, Gibson WP, Ditton JE,

Downes JE. When the diagnosis of deafness is

wrong. Med J Aust 1992 Oct 5;157(7):483-4.

Nabe Nielsen J, Walter B. Unilateral total deafness as a

complication of the measles mumps rubella

vaccination. Scand Audiol Suppl 1988;30:69-70.

Newman TB, Maisels MJ. Does hyperbilirubinemia

damage the brain of healthy full-term infants? Clin

Perinatol 1990 Jun;17(2):331-58.

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. I.

Methods and process of the mass screening

examination for hearing]. Nippon Koshu Eisei

Zasshi 1992 Feb;39(2):101-4. (Jpn).

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. II.

Screening items and risk factors of hearing

impairment]. Nippon Koshu Eisei Zasshi 1992

Mar;39(3):153-7. (Jpn).

Northern JL, Gerkin KP. New technology in infant

hearing screening. Otolaryngol Clin North Am 1989

Feb;22(1):75-87.

Oliveira CA, Pinheiro LC, Gomes MR. External and

middle ear malformations: autosomal dominant

genetic transmission. Ann Otol Rhinol Laryngol

1989;98(10):772-6.

O’Shea S, Best J, Banatvala JE. A lymphocyte

transformation assay for the diagnosis of congenital

rubella. J Virol Methods 1992 May;37(2):139-47.

Parker L. Discharge planning and follow-up care: the

asphyxiated infant. NAACOGS Clin Issu Perinat

Womens Health Nurs 1991;2(1):111-59.

Parving A. Detection of the infant with congenital/early

acquired hearing disability. Acta Otolaryngol Suppl

(Stockh) 1991;482:111-6; discussion 117.

Parving A. Hearing disabled children--epidemiology and

identification. Scand Audiol Suppl 1988;30: 21-3.

Parving A, Christensen B. Children younger than 4

years of age, referred to an audiological department.

Int J Pediatr Otorhinolaryngol 1992

Mar;23(2):161-70.

Pasic TR, Dobie RA. Cis platinum ototoxicity in

children. Laryngoscope 1991;101(9):985-91.

Pearce PS, Saunders MA, Creighton DE, Sauve RS.

Hearing and verbal-cognitive abilities in high-risk

preterm infants prone to otitis media with effusion. J

Dev Behav Pediatr 1988 Dec;9(6):346-51.

Peckham CS. Cytomegalovirus in the neonate.

J Antimicrob Chemother 1989 Jun;23 Suppl E:

17-21.

Perez H, Vilchez J, Sevilla T, Martinez L. Audiologic

evaluation in Charcot Marie Tooth disease. Scand

Audiol Suppl 1988;30:211-3.

Perlman M, Frank JW. Bilirubin beyond the blood-

brain barrier. Pediatrics 1988 Feb;81(2):304-15.

Perry-Marion T. Hearing loss and persistent fetal

circulation [letter]. Pediatrics 1989 Apr;83(4 Pt 2):

655.

Pettigrew AG, Edwards DA, Henderson-Smart DJ.

Perinatal risk factors in preterm infants with

moderate-to-profound hearing deficits. Med J Aust

1988 Feb 15;148(4):174-7.

Pinkerton CR, Zucker JM, Hartmann O, Pritchard J,

Broadbent V, Morris Jones P, Breatnach F, Craft

AE, Pearson AD, Wallendszus KR, Philip T. Short

duration, high dose, alternating chemotherapy in

metastatic neuroblastoma. (ENSG 3C induction

regimen). Br J Cancer 1990;62(2):319-23.

Piper MC, Mazer B, Silver KM, Ramsay M. Resolution

of neurological symptoms in high-risk infants during

the first two years of life. Dev Med Child Neurol

1988 Feb;30(1):26-35.

Podoshin L, Fradis M, Ben David J. Ototoxicity of ear

drops in patients suffering from chronic otitis media.

J Laryngol Otol 1989;103(1):46-50.

Poland RL. In search of a ‘gold standard’ for bilirubin

toxicity. Pediatrics 1992;89(5):823-4.

Prijs VF. Evaluation of electrocochleographic audiogram

determination in infants. Acta Otolaryngol Suppl

(Stockh) 1991;482:27-33; discussion 34-5.

Raj H, Gupta AK, Anand NK. Hearing assessment by

brainstem auditory evoked responses (BAER) in

neonates at risk. Indian Pediatr 1991 Oct;28(10):

1175-83.

Ramsay ME, Miller E, Peckham CS. Outcome of

confirmed symptomatic congenital cytomegalovirus

infection. Arch Dis Child 1991 Sep;66(9):1068-9.

Rasmussen N, Johnsen NJ, Bohr VA. Otologic sequelae

after pneumococcal meningitis: a survey of 164

consecutive cases with a follow-up of 94 survivors.

Laryngoscope 1991 Aug;101(8):876-82.

Reed BD, Lutz LJ. Household smoking

exposure--association with middle ear effusions.

Fam Med 1988 Nov-Dec;20(6):426-30.

Reron E. [Clinical and electrophysiological studies of

the organ of hearing of newborn infants. III.

Evaluation of the organ of hearing of newborn

infants from high risk pregnancy using brain stem

evoked response audiometry (ABR)]. Przegl Lek

1990;47(4):394-401. (Pol).

Reyes MP, Ostrea EM Jr, Cabinian AE, Schmitt C,

Rintelmann W. Vancomycin during pregnancy: does

it cause hearing loss or nephrotoxicity in the infant?

Am J Obstet Gynecol 1989 Oct;161(4):977-81.

Comment in: Am J Obstet Gynecol 1990 Oct;

163(4 Pt 1):1375-6.

Richardson MA. Upper airway complications of

cigarette smoking. J Allergy Clin Immunol 1988

May;81(5 Pt 2):1032-5.

Robertson CM, Etches PC. Decreased incidence of

neurologic disability among neonates at high risk

born between 1975 and 1984 in Alberta. Can Med

Assoc J 1988;139(3):225-9.

Robertson CM, Hrynchyshyn GJ, Etches PC, Pain KS.

Population-based study of the incidence, complexity,

and severity of neurologic disability among

survivors weighing 500 through 1250 grams at birth:

a comparison of two birth cohorts. Pediatrics 1992

Nov;90(5):750-5.

Robillard T, Gersdorff M. [Cytomegalovirus and

acquired congenital deafness]. Acta

Otorhinolaryngol Belg 1988;42(1):76-83. (Fre).

Rowe SJ. An evaluation of ABR audiometry for the

screening and detection of hearing loss in ex-SCBU

infants. Br J Audiol 1991 Aug;25(4):259-74.

Rynnel Dagoo B, Lindberg K, Bagger Sjoback D,

Larson O. Middle ear disease in cleft palate children

at three years of age. Int J Pediatr Otorhinolaryngol

1992;23(3):201-9.

Salamy A, Davis S, Eldredge L, Wakeley A, Tooley

WH. Neonatal status: an objective scoring method

for identifying infants at risk for poor outcome.

Early Hum Dev 1988 Aug-Sep;17(2-3):233-43.

Salamy A, Eldredge L, Tooley WH. Neonatal status and

hearing loss in high-risk infants. J Pediatr 1989

May;114(5):847-52. Comment in: J Pediatr 1990

Feb;116(2):316.

Samani F, Peschiulli G, Pastorini S, Fior R. An

evaluation of hearing maturation by means of

auditory brainstem response in very low birthweight

and preterm newborns. Int J Pediatr

Otorhinolaryngol 1990 Jun;19(2):121-7.

Schell MJ, McHaney VA, Green AA, Kun LE, Hayes

FA, Horowitz M, Meyer WH. Hearing loss in

children and young adults receiving cisplatin with or

without prior cranial irradiation. J Clin Oncol 1989

Jun;7(6):754-60. Comment in: J Clin Oncol 1990

Jan;8(1):179-80.

Schwartz J, Otto D. Lead and minor hearing

impairment. Arch Environ Health 1991;46(5): 300-5.

Sculerati N, Ledesma Medina J, Finegold DN, Stool SE.

Otitis media and hearing loss in Turner syndrome.

Arch Otolaryngol Head Neck Surg

1990;116(6):704-7.

Sehlin P, Holmgren G, Zakrisson J. Incidence,

prevalence and etiology of hearing impairment in

children in the county of Vasterbotten, Sweden.

Scand Audiol 1990;19(4):193-200.

Sejna I, Vydrova J, Cerna O, Kredba V, Votruba V.

[Hearing and treatment of neonates with

gentamycin]. Cesk Pediatr 1991 Jan;46(1):28-30.

(Cze).

Sever JL, Ellenberg JH, Ley AC, Madden DL, Fuccillo

DA, Tzan NR, Edmonds DM. Perinatal ‘torch’

infections identified by serology: correlation with

abnormalities in the children through 7 years of age.

Int J Epidemiol 1992 Apr;21(2):285-92.

Sever JL, Ellenberg JH, Ley AC, Madden DL, Fuccillo

DA, Tzan NR, Edmonds DM. Toxoplasmosis:

maternal and pediatric findings in 23,000

pregnancies. Pediatrics 1988 Aug;82(2):181-92.

Shih L, Cone-Wesson B, Reddix B. Effects of maternal

cocaine abuse on the neonatal auditory system. Int J

Pediatr Otorhinolaryngol 1988 Sep;15(3):245-51.

Siebert GW. Hazardous noise at a child care center. Am

Ind Hyg Assoc J 1989 Nov;50(11):A809.

Smith D. Vaccine may reduce incidence of

meningitis-related hearing impairment. Perspect

Teach Hear Impair 1988 Mar-Apr;6(4):11-2.

Smith RJ, Zimmerman B, Connolly PK, Jerger SW,

Yelich A. Screening audiometry using the high-risk

register in a level III nursery. Arch Otolaryngol

Head Neck Surg 1992;118(12):1306-11.

Smyth V, Scott J, Tudehope D. Auditory brainstem

evoked response inter-peak latencies in very low

birthweight infants. Int J Pediatr Otorhinolaryngol

1988 Oct;16(1):69-76.

Smyth V, Scott J, Tudehope D. The utility of the

auditory brainstem response as a screening

procedure. Int J Pediatr Otorhinolaryngol 1990

Mar;19(1):45-55.

Steen J, Gallefoss K, Nordahl T, Rnning Arnesen A,

Bechensteen AG. [Hearing loss among children in

Oslo]. Tidsskr Nor Laegeforen 1989 Feb 28;109(6):

672-6. (Nor).

Stein LK, Jabaley T, Spitz R, Stoakley D, McGee T.

The hearing-impaired infant: patterns of

identification and habilitation revisited. Ear Hear

1990 Jun;11(3):201-5.

Stewart AL, Costello AM, Hamilton PA, Baudin J,

Townsend J, Bradford BC, Reynolds EO.

Relationship between neurodevelopmental status of

very preterm infants at one and four years. Dev Med

Child Neurol 1989 Dec;31(6):756-65.

Stockard JE, Curran JS. Transient elevation of threshold

of the neonatal auditory brain stem response. Ear

Hear 1990 Feb;11(1):21-8.

Strachan DP. Impedance tympanometry and the home

environment in seven year old children. J Laryngol

Otol 1990;104(1):4-8.

Sundel RP, Cleveland SS, Beiser AS, Newburger JW,

McGill T, Baker AL, Koren G, Novak RE, Harris

JP, Burns JC. Audiologic profiles of children with

Kawasaki disease. Am J Otol 1992 Nov;13(6):

512-5.

Sutherland SJ, Olsen RD, Michels V, Schmidt MA,

O’Brien JF. Screening for biotinidase deficiency in

children with unexplained neurologic or

developmental abnormalities. Clin Pediatr (Phila)

1991 Feb;30(2):81-4.

Taylor HG, Mills EL, Ciampi A, Du Berger R, Watters

GV, Gold R, MacDonald N, Michaels RH. The

sequelae of Haemophilus influenzae meningitis in

school age children. N Engl J Med 1990;323(24):

1657-63.

Teele DW, Klein JO, Rosner B. Epidemiology of otitis

media during the first seven years of life in children

in greater Boston: a prospective, cohort study.

J Infect Dis 1989 Jul;160(1):83-94. Comment in:

J Infect Dis 1990 Apr;161(4):806-7.

Thomas DG. Outcome of paediatric bacterial meningitis

1979-1989. Med J Aust 1992;157(8):519-20.

Thomas KA. How the NICU environment sounds to a

preterm infant. MCN Am J Matern Child Nurs 1989

Jul-Aug;14(4):249-51.

Thompson MD, Thompson G. Early identification of

hearing loss: listen to parents. Clin Pediatr (Phila)

1991 Feb;30(2):77-80.

Tomblin JB, Hardy JC, Hein HA. Predicting

poor-communication status in preschool children

using risk factors present at birth. J Speech Hear

Res 1991 Oct;34(5):1096-105.

Tropper G, Moran L, Odell P, Durieux Smith A. The

contribution of brainstem electric response

audiometry (BERA) to the evaluation and

management of infants with cleft palate.

J Otolaryngol 1988;17(2):103-10.

Tudehope D, Smyth V, Scott J, Rogers Y. Audiological

evaluation of very low birthweight infants.

J Paediatr Child Health 1992 Apr;28(2):172-5.

Ueda H. Brain stem (ABR) and middle latency (MLR)

auditory evoked responses in infants. Scand Audiol

1990;19(3):171-4.

Ueda K, Tokugawa K, Kusuhara K. Perinatal viral

infections. Early Hum Dev 1992 Jun-Jul;29(1-3):

131-5.

Upfold LJ. Rubella-related deafness [letter]. Med J Aust

1988 Dec 5-19;149(11-12):723.

van Dijk JH. [Meningitis as cause of prelingual

deafness]. Ned Tijdschr Geneeskd 1989 Jun 3;

133(22):1125-7. (Dut).

Van Zanten GA, Brocaar MP, Fetter WP, Baerts W.

Brainstem electric response audiometry in preterm

infants. Scand Audiol Suppl 1988;30:91-7.

van Zeben-van der Aa TM, Verloove-Vanhorick SP,

Brand R, Ruys JH. Morbidity of very low

birthweight infants at corrected age of two years in

a geographically defined population. Report from

project on preterm and small for gestational age

infants in the Netherlands. Lancet 1989 Feb 4;

1(8632):253-5. Comment in: Lancet 1989 Mar 4;

1(8636):499-500, and Lancet 1989 Apr 22;1(8643):

900.

Vazquez-Gomez P, Fernandez-Carrocera LA,

Bravo-Cabrera Z, Venta-Sobero JA, Montiel-Garcia

G, Lozano-Gonzalez CH. [Hearing and language

sequelae in survivors of a neonatal intensive care

unit]. Bol Med Hosp Infant Mex 1990 Jun;47(6):

385-9. (Spa).

Von Wedel H, Schauseil Zipf U, Doring WH. [Hearing

screening in neonates and infants using brain stem

evoked acoustic potentials]. Laryngol Rhinol Otol

(Stuttg) 1988 Jun;67(6):307-11. (Ger).

Von Wedel H, Schauseil Zipf U, Von Wedel UC.

[Limits and possibilities of leading acoustic evoked

brain stem responses for hearing screening in

newborn and infants]. Sprache Stimme Gehor 1989;

13(2):76-9. (Ger).

Walker CH. Neonatology--then and now. Deafness in

children of very low birth weight (1964). Arch Dis

Child 1989 Nov;64(11):1646.

Walton JP, Hendricks-Munoz K. Profile and stability of

sensorineural hearing loss in persistent pulmonary

hypertension of the newborn. J Speech Hear Res

1991 Dec;34(6):1362-70.

Watkin PM, Baldwin M, Laoide S. Parental suspicion

and identification of hearing impairment. Arch Dis

Child 1990 Aug;65(8):846-50.

Watkin PM, Baldwin M, McEnery G. Neonatal at risk

screening and the identification of deafness. Arch

Dis Child 1991 Oct;66(10 Spec No):1130-5.

Weatherly RA, Owens JJ, Catlin FI, Mahoney DH.

Cis-platinum ototoxicity in children. Laryngoscope

1991 Sep;101(9):917-24.

Weir W, Camerson M, Cochrane M, Paterson M,

Thomson A, Bonn G, Fleming L. The Scottish low

birthweight study: I. Survival, growth, neuromotor

and sensory impairment. Arch Dis Child 1992;

67(6):675-81.

Widen JE. Behavioral screening of high risk infants

using visual reinforcement audiometry. Semin Hear

1990;11(4):342-56.

Wild NJ, Sheppard S, Smithells RW, Holzel H, Jones G.

Delayed detection of congenital hearing loss in high

risk infants. BMJ 1990 Oct 20;301(6757): 903-5.

Comment in: BMJ 1990 Nov 17;301(6761): 1164-5,

and BMJ 1990 Dec 8;301(6764):1332-3.

Wild NJ, Sheppard S, Smithells RW, Holzel H, Jones G.

Onset and severity of hearing loss due to congenital

rubella infection. Arch Dis Child 1989

Sep;64(9):1280-3.

Williams WT, Ghorayeb BY, Yeakley JW. Pediatric

temporal bone fractures. Laryngoscope 1992;

102(6):600-3.

Williamson WD, Demmler GJ, Percy AK, Catlin FI.

Progressive hearing loss in infants with

asymptomatic congenital cytomegalovirus infection.

Pediatrics 1992 Dec;90(6):862-6.

Williamson WD, Percy AK, Yow MD, Gerson P, Catlin

FI, Koppelman ML, Thurber S. Asymptomatic

congenital cytomegalovirus infection. Audiologic,

neuroradiologic, and neurodevelopmental

abnormalities during the first year. Am J Dis Child

1990 Dec;144(12):1365-8.

Wolfenden K, McKenzie A, Sanson Fisher RW.

Identifying hazards and risk opportunity in child

farm injury. Aust J Public Health 1992;16(2):122-8.

Wong VC, Ng TH, Yeung CY. Electrophysiologic study

in acute lead poisoning. Pediatr Neurol 1991;

7(2):133-6.

Wynne MK, Molloy T, Bloom BT. The high-risk

register for hearing loss in Kansas: some

preliminary data. Kans Med 1992 Jun;93(6):

198-202.

Xing J. [Auditory brainstem response in ototoxic

deafness]. Chung Hua Erh Pi Yen Hou Ko Tsa Chih

1989;24(4):199-200, 253. (Chi).

Yamamoto N, Watanabe K, Sugiura J, Okada J, Nagae

H, Fujimoto Y. Marked latency change of auditory

brainstem response in preterm infants in the early

postnatal period. Brain Dev 1990;12(6):766-9.

Yang EY, Stuart A. A method of auditory brainstem

response testing of infants using bone-conducted

clicks. J Speech Lang Pathol Audiol 1990 Dec;

14(4):69-76.

Yokoyama T, Okada I. Hearing screening in health

examination services for young children at health

centers in Japan. Eur Arch Otorhinolaryngol 1990;

247(5):305-11.

Yoshimi K. [Early hearing screening for brain

impairment baby--Crib-O-Gram]. Nippon Jibiinkoka

Gakkai Kaiho 1989 Sep;92(9):1436-44. (Jpn).

Young JA. Antenatal and perinatal causes of handicap:

definitions and size of the problem. Baillieres Clin

Obstet Gynaecol 1988 Mar;2(1):1-7.

Young SL, Vosper HJ, Phillips SA. Cocaine: its effects

on maternal and child health. Pharmacotherapy

1992;12(1):2-17.

Yow MD. CMV infection in young women. Hosp Pract

(Off Ed) 1990 Mar 30;25(3A):61-5, 69, 72-9.

Yow MD, Williamson DW, Leeds LJ, Thompson P,

Woodward RM, Walmus BF, Lester JW, Six HR,

Griffiths PD. Epidemiologic characteristics of

cytomegalovirus infection in mothers and their

infants. Am J Obstet Gynecol 1988 May;158(5):

1189-95.

Yu VY, Manlapaz ML, Tobin J, Carse EA, Charlton

MP, Gore JR. Improving health status in extremely

low birthweight children between two and five

years. Early Hum Dev 1992;30(3):229-39.

Zakzouk SM, El Sayed Y. Bacterial meningitis and

hearing impairment: a prospective study. Ann Saudi

Med 1992;12(5):480-3.

Zhang L, Jiang ZD. Development of the brainstem

auditory pathway in low birthweight and perinatally

asphyxiated children with neurological sequelae.

Early Hum Dev 1992 Aug;30(1):61-73.

Zorowka P, Jennerjahn B, Kraft E. [Labyrinthitis

ossificans after pneumococcal meningitis]. HNO

1991 Jan;39(1):37-40. (Ger).

Other (e.g. Behavioral Methods, Immittance

Measures, Developmental Measures)

Anday EK, Cohen ME, Hoffman HS. Comparison of

reflex modification procedures and auditory

brainstem response in high-risk neonates. Dev Med

Child Neurol 1991 Feb;33(2):130-7.

Anday EK, Cohen ME, Kelley NE, Leitner DS. Effect

of in utero cocaine exposure on startle and its

modification. Dev Pharmacol Ther 1989;12(3):

137-45.

Ashoor A, Baraka ME, Al Umran K, Al Fadel MS,

Dawodu AH, Badran O. Hearing screening of

infants at King Fahd Hospital of the University. Ann

Saudi Med 1992;12(4):377-80.

Augustsson I, Nilson C, Engstrand I. [Is auditory

screening of 4-year old children a good method for

locating serous otitis which demands treatment?]

Lakartidningen 1988 Mar 30;85(13):1134-7. (Swe).

Baart de la Faille LM. Validity of large scale

standardised behavioural screening. Acta

Otolaryngol Suppl (Stockh) 1991;482:94-101;

discussion 102.

Ballot DE, Rothberg AD, Katz BJ. Speech and hearing

problems in a high-risk population. S Afr Med J

1992 Jul;82(1):23-6.

Barajas JJ, Exposito M, Fernandez R, Martin LJ. Middle

latency response to a 500 Hz tone pip in normal

hearing and in hearing impaired subjects. Scand

Audiol 1988;17(1):21-6.

Begall K, Pethe J. [Systematic hearing diagnosis in the

premature infant. The magdeburg model]. HNO

1992 Oct;40(10):392-5. (Ger).

Bernstein RS, Gravel JS. A method for determining

hearing sensitivity in infants: the interweaving

staircase procedure (ISP). J Am Acad Audiol 1990

Jul;1(3):138-45.

Biering-Srensen M, Biering-Srensen K, Kaufmann B.

[Follow-up of children screened at 4 years of age

through school age with particular attention the

evaluation of speech function]. Ugeskr Laeger 1989

May 15;151(20):1240-4. (Dan).

Birkebaek NH, Tommerup BE. [Hearing loss among

premature and full-term infants in Rinkobing county.

Results of tone and speech audiometry]. Ugeskr

Laeger 1991 Jan 7;153(2):107-9. (Dan).

Blasco PA. Pitfalls in developmental diagnosis. Pediatr

Clin North Am 1991 Dec;38(6):1425-38.

Bonny IC. Five years’ experience of combined

impedance and audiometric screening at school

entry. Public Health 1989 Nov;103(6):427-31.

Brown J, Watson E, Alberman E. Screening infants for

hearing loss. Arch Dis Child 1989 Oct;64(10):

1488-95.

Buren M, Solem BS, Laukli E. Threshold of hearing

(0.125 20 kHz) in children and youngsters. Br J

Audiol 1992;26(1):23-31.

Burgess LP, Frankel SF, Lepore ML, Yim DW. Tuning

fork screening for sudden hearing loss. Mil Med

1988;153(9):456-8.

Byers VW, Bristow DC. Audiological evaluation of

nonspeaking, physically challenged populations. Ear

Hear 1990;11(5):382-6.

Cadman D, Walter SD, Chambers LW, Ferguson R,

Szatmari P, Johnson N, McNamee J. Predicting

problems in school performance from preschool

health, developmental and behavioural assessments.

Can Med Assoc J 1988 Jul 1;139(1):31-6.

Charuvanij A, Visudhiphan P, Chiemchanya S, Tawin C.

Sensorineural hearing loss in children recovered

from purulent meningitis: a study in Thai children at

Ramathibodi Hospital. J Med Assoc Thai 1990

May;73(5):253-7.

Checking your child for hearing loss. Patient Care 1989

Mar 15;23(5):198.

Colding H, Andersen EA, Prytz S, Wulffsberg H,

Andersen GE. Auditory function after continuous

infusion of gentamicin to high risk newborns. Acta

Paediatr Scand 1989;78(6):840-3.

Combs JT. Precision of acoustic reflectometry with

recorder in acute otitis media. Pediatr Infect Dis J

1988 May;7(5):329-30.

Combs JT. Single vs. double acoustic reflectometry

tracings. Pediatr Infect Dis J 1989 Sep;8(9):616-20.

Conijn EA, Van der Drift JF, Brocaar MP, Van Zanten

GA. Conductive hearing loss assessment in children

with otitis media with effusion. A comparison of

pure tone and BERA results. Clin Otolaryngol 1989

Apr;14(2):115-20.

Cox LC. Screening the high-risk newborn for hearing

loss: the crib-o-gram v the auditory brainstem

response. Infants Young Child 1988 Jul;1(1):71-81.

Dahle AJ, McCollister FP. Audiological findings in

children with neonatal herpes. Ear Hear 1988 Oct;

9(5):256-8.

Das VK. Adverse perinatal factors in the causation of

sensorineural hearing impairment in young children.

Int J Pediatr Otorhinolaryngol 1991 Apr;21(2):

121-5.

Dauman R. Electrocochleography: applications and

limitations in young children. Acta Otolaryngol

Suppl (Stockh) 1991;482:14-26.

Dauman R, Daubech Q, Delaroche M. [Role of

electrophysiology in the current diagnosis of deaf

children]. Rev Laryngol Otol Rhinol (Bord) 1990;

111(1):37-40. (Fre).

Davis AC, Wharrad HJ, Sancho J, Marshall DH. Early

detection of hearing impairment: what role is there

for behavioural methods in the neonatal period?

Acta Otolaryngol Suppl (Stockh) 1991;482:103-9;

discussion 110.

de Melker RA. Diagnostic value of microtympanometry

in primary care. BMJ 1992 Jan 11;304(6819):96-8.

Dempster JH, MacKenzie K. Tympanometry in the

detection of hearing impairments associated with

otitis media with effusion. Clin Otolaryngol 1991

Apr;16(2):157-9.

Deriglazov MA, Volynskii MB, Volkov DV.

[Neurosensory hearing loss in children with acute

and chronic otitis media diagnosed by the

measurement of short-latency auditory evoked

potentials]. Vestn Otorinolaringol 1990 Jul-Aug;

(4):23-7. (Rus).

Dhont G, Blontrock J. [Results of screening for hearing

disorders using the Ewing test]. Acta

Otorhinolaryngol Belg 1988;42(3):319-26. (Dut).

Dias O, Andrea M. Childhood deafness in

Portugal--aetiological factors and diagnosis of

hearing loss. Int J Pediatr Otorhinolaryngol 1990

Jan;18(3):247-55.

Dirksen WJ. [Results of Ewing screening and the chance

of otitis media with effusion in early childhood

(letter)]. Ned Tijdschr Geneeskd 1989 Sep

30;133(39):1950. (Dut).

Doyle LW, Keir E, Kitchen WH, Ford GW, Rickards

AL, Kelly EA. Audiologic assessment of extremely

low birth weight infants: a preliminary report.

Pediatrics 1992 Nov;90(5):744-9.

Durieux-Smith A, Picton TW, Bernard P, MacMurray B,

Goodman JT. Prognostic validity of brainstem

electric response audiometry in infants of a neonatal

intensive care unit. Audiology 1991;30(5):249-65.

Eilers RE, Miskiel E, Ozdamar O, Urbano R, Widen JE.

Optimization of automated hearing test algorithms:

simulations using an infant response model. Ear

Hear 1991 Jun;12(3):191-8.

Eilers RE, Widen JE, Urbano R, Hudson T, Gonzales L.

Optimization of automated hearing test algorithms: a

comparison of data from simulations and young

children. Ear Hear 1991 Jun;12(3): 199-204.

Finitzo T, Friel-Patti S, Chinn K, Brown O.

Tympanometry and otoscopy prior to myringotomy:

issues in diagnosis of otitis media. Int J Pediatr

Otorhinolaryngol 1992 Sep;24(2):101-10.

Fjermedal O. Hearing identification in difficult-to-test

children. A study of 142 infants and children. Scand

Audiol 1989;18(3):185-91.

Fjermedal O, Laukli E. [Hearing loss in children.

Diagnostic challenges]. Tidsskr Nor Laegeforen

1989 Aug 30;109(24):2414-8. (Nor).

Fjermedal O, Laukli E. Paediatric auditory brainstem

response and pure-tone audiometry: threshold

comparisons. A study of 142 difficult-to-test

children. Scand Audiol 1989;18(2):105-11.

Fjermedal O, Laukli E, Mair IW. Auditory brainstem

responses and extratympanic electrocochleography.

A threshold comparison in children. Scand Audiol

1988;17(4):231-5.

Francois M. [Detection of deafness in children]. Rev

Infirm 1989 Jan;39(2):31-4. (Fre).

Francois M, Marie P, Narcy P. [Detection and treatment

of deafness in children]. Rev Prat 1990 Sep

1;40(19):1733-7. (Fre).

Fujikake M, Ninomija SP, Fujita H. Statistical

approaches to nonstationary EEGs for the detection

of slow vertex responses. J Med Syst 1989 Jun;

13(3):111-29.

Gannon M. Which children fail hearing tests? Midwife

Health Visit Community Nurse 1988 May;24(5):

184-8.

Garrubba V, Grandori F, Lamoretti M, Nicolai P,

Zanetti D, Antonelli AR. Electric response

audiometry in infants and preschool children.

Long-term control of the results. Acta Otolaryngol

Suppl (Stockh) 1991;482:36-43; discussion 44.

Gerber SE, Davis TK, Mastrini KM. Inter stimulus

interval in audiometry for neonates. Int J Pediatr

Otorhinolaryngol 1988;15(2):173-8.

Gjerlingen D, Thornton A, Eavey RD. An open letter to

the pediatrician: hearing loss in children [letter].

Clin Pediatr (Phila) 1992 Jan;31(1):23-4.

Goodman JT, Malizia KE, Durieux-Smith A,

MacMurray B, Bernard P. Bayley developmental

performance at two years of age of neonates at risk

for hearing loss. Dev Med Child Neurol 1990 Aug;

32(8):689-97.

Gravel JS. Behavioral assessment of auditory function.

Semin Hear 1989;10(3):216-28.

Gravel JS, Kurtzberg D, Stapells DR, Vaughan HG,

Wallace IF. Case studies. Semin Hear 1989;10(3):

272-87.

Gravel JS, McCarton CM, Ruben RJ. Otitis media in

neonatal intensive care unit graduates: a 1-year

prospective study. Pediatrics 1988 Jul;82(1):44-9.

Gravel JS, McCarton CM, Ruben RJ. A prospective

study of otitis media in infants born at very-low

birthweight. Acta Otolaryngol (Stockh) 1988

May-Jun;105(5-6):516-21.

Gravel JS, Traquina DN. Experience with the audiologic

assessment of infants and toddlers. Int J Pediatr

Otorhinolaryngol 1992 Jan;23(1):59-71.

Grisanti G, Ciulla L, Casuccio LM. [Diagnostic

methods: questionnaires]. Otorinolaringol Pediatr

1992;3(3):283-90. (Ita).

Guidelines for the audiologic assessment of children

from birth through 36 months of age. Committee on

Infant Hearing American Speech-Language-Hearing

Association. ASHA Suppl 1991 Mar;33(5):37-43.

Guidelines for the identification of hearing impairment

in at risk infants age birth to 6 months. ASHA 1988

Apr;30(4):61-4.

Haggard MP, Lutman ME. Appropriate attitudes to

tympanometry [letter]. J Laryngol Otol 1990 Feb;

104(2):172-3. Comment on: J Laryngol Otol 1989

Jul;103(7):657-8.

Hall DM, Garner J. Feasibility of screening all neonates

for hearing loss. Arch Dis Child 1988 Jun;63(6):

652-3.

Hamill B. Comparing two methods of preschool and

kindergarten hearing screening. J Sch Health 1988

Mar;58(3):95-7.

Hansen JG, Schmidt H. [Measurement of the middle ear

pressure in preventive examinations of children].

Ugeskr Laeger 1991 Jan 14;153(3):186-8. (Dan).

Hattori H. Two level screening audiometry in public

school. Auris Nasus Larynx 1989;16 Suppl 1:

S15-S21.

Hinton AE, Buckley G. Parental smoking and middle

ear effusions in children. J Laryngol Otol 1988;

102(11):992-6.

Hirsch A. Behavioural tests: applications and limitations

in comparison with brainstem response audiometry.

Acta Otolaryngol Suppl (Stockh) 1991;482:118-24;

discussion 125.

Hirsch JE, Margolis RH, Rykken JR. A comparison of

acoustic reflex and auditory brain stem response

screening of high-risk infants. Ear Hear 1992 Jun;

13(3):181-6.

Holmes AE, Muir KC, Kemker FJ. Acoustic

reflectometry versus tympanometry in pediatric

middle ear screenings. Lang Speech Hear Serv Sch

1989 Jan;20(1):41-9.

Holsgrove G. Testing hearing in childhood. Practitioner

1991 Oct;235(1507):724, 726, 728-9.

Holtby I. Screening for hearing loss in children.

Midwife Health Visit Community Nurse 1988 Jun;

24(6):218-9.

Holtby I, Forster DP. Evaluation of pure tone

audiometry and impedance screening in infant

schoolchildren. J Epidemiol Commun Health 1992;

46(1):21-5.

Holte L, Margolis RH, Cavanaugh RM Jr.

Developmental changes in multifrequency

tympanograms. Audiology 1991;30(1):1-24.

Hunter LL, Margolis RH. Multifrequency

tympanometry: current clinical application. Am J

Audiol 1992 Jul;1(3):33-43.

Hutchison T, Nicoll A. Developmental screening and

surveillance. Br J Hosp Med 1988 Jan;39(1):22-4,

28-9.

Hyde ML, Malizia K, Riko K, Alberti PW. Audiometric

estimation error with the ABR in high risk infants.

Acta Otolaryngol (Stockh) 1991; 111(2):212-9.

Hyde ML, Riko K, Malizia K. Audiometric accuracy of

the click ABR in infants at risk for hearing loss.

J Am Acad Audiol 1990 Apr;1(2):59-66.

Jacobson CA, Jacobson JT. Follow-up services in

newborn hearing screening programs. J Am Acad

Audiol 1990 Oct;1(4):181-6.

Jacobson GP, Burtka MJ, Wharton JA, Newman CW,

Shepherd N, Turner RG. Infant hearing screening

1984 to 1989: the Henry Ford Hospital experience.

Henry Ford Hosp Med J 1990;38(1):39-43.

Jardine A. Diagnosing glue ear. Practitioner 1989 Jul 8;

233(1472):985-6.

Jehle D, Cottington E. Acoustic otoscopy in the

diagnosis of otitis media. Ann Emerg Med 1989

Apr;18(4):396-400.

Jerger J, Oliver T, Chmiel R. Auditory middle latency

response: a perspective. Semin Hear 1988;9(1):

75-85.

Jiang ZD, Liu XY, Wu YY, Zheng MS, Liu HC.

Long-term impairments of brain and auditory

functions of children recovered from purulent

meningitis. Dev Med Child Neurol 1990 Jun;

32(6):473-80.

Johnson A, Ashurst H. Screening for sensorineural

deafness by health visitors. The Steering Committee,

Oxford Region Child Development Project. Arch

Dis Child 1990 Aug;65(8):841-5.

Jonathan DA. Sonotubometry: its role in childhood glue

ear. Clin Otolaryngol 1989 Apr;14(2):151-4.

Kaleida PH, Stool SE. Assessment of otoscopists’

accuracy regarding middle-ear effusion. Otoscopic

validation. Am J Dis Child 1992 Apr;146(4):433-5.

Kaplan SL, Fishman MA. Update on bacterial

meningitis. J Child Neurol 1988;3(2):82-93.

Karma PH, Penttila MA, Sipila MM, Kataja MJ.

Otoscopic diagnosis of middle ear effusion in acute

and non-acute otitis media. I. The value of different

otoscopic findings. Int J Pediatr Otorhinolaryngol

1989 Feb;17(1):37-49.

Karzon RG. Validity and reliability of tympanometric

measures for pediatric patients. J Speech Hear Res

1991 Apr;34(2):386-90.

Katoh Y. [A study of the auditory responses to

intra-uterine sound in the first few months after

birth]. Nippon Jibiinkoka Gakkai Kaiho 1990 Feb;

93(2):268-81. (Jpn).

Kauffmann G, Zimmermann G. [Value assessment of

the MIRA (multichannel infant reflex audiometry)

hearing evaluation with and without biofeedback. 3.

Diagnosis from curves or behavioral observation?]

Laryngorhinootologie 1990 Feb;69(2):111-3. (Ger).

Kileny PR. New insights on infant ABR hearing

screening. Scand Audiol Suppl 1988;30:81-8.

Klein JO. Otitis media: diagnosis and epidemiology.

Clin Ther 1988;10 Suppl B:2-7.

Kluba J, Kluba U, von Specht H, Mittler U. [Monitoring

hearing during ototoxic cisplatin therapy]. Padiatr

Grenzgeb 1990;29(1):19-23. (Ger).

Kraft PT. [Mother knows best; diagnosis of prelingual

deafness (letter)]. Ned Tijdschr Geneeskd 1992

Oct 31;136(44):2199-200. (Dut).

Kraus N, McGee T, Comperatore C. MLRs in children

are consistently present during wakefulness, stage 1,

and REM sleep. Ear Hear 1989;10(6):339-45.

Kretschmar CS, Warren MP, Lavally BL, Dyer S,

Tarbell NJ. Ototoxicity of preradiation cisplatin for

children with central nervous system tumors. J Clin

Oncol 1990 Jul;8(7):1191-8.

Lampe RM, Schwartz RH. Diagnostic value of acoustic

reflectometry in children with acute otitis media.

Pediatr Infect Dis J 1989 Jan;8(1):59-61.

Lancioni GE, Coninx F, Smeets PM. A classical

conditioning procedure for the hearing assessment of

multiply handicapped persons. J Speech Hear Disord

1989 Feb;54(1):88-93.

Letowski T, Hergenreder P, Tang H. Relationships

between speech recognition threshold, average

hearing level, and speech importance noise detection

threshold. J Speech Hear Res 1992 Oct;

35(5):1131-6.

Lildholdt T, Felding JU, Eriksen EW, Pedersen LV.

[Diagnosis and treatment of ear diseases in general

practice. A controlled trial of the effect of the

introduction of middle ear measurement

(tympanometry)]. Ugeskr Laeger 1991 Oct 21;

153(43):3004-7. (Dan).

Lopponen H, Sorri M, Serlo W, von Wendt L.

Audiological findings of shunt-treated hydrocephalus

in children. Int J Pediatr Otorhinolaryngol 1989

Sep;18(1):21-30.

Mackenzie K, Dempster JH. External ear resonance in

children with otitis media with effusion. Clin

Otolaryngol 1990 Oct;15(5):415-20.

Mair IWS, Fjermedal O, Laukli E. Air conduction

thresholds and secretory otitis media: a conventional

and extra high frequency audiometric comparison.

Ann Otol Rhinol Laryngol 1989;98(10):767-71.

Margolis RH, Hunter LL. Audiologic evaluation of the

otitis media patient. Otolaryngol Clin North Am

1991 Aug;24(4):877-99.

Maurizi M, Almadori G, Paludetti G, Ottaviani F,

Rosignoli M, Luciano R. 40 Hz steady state

responses in newborns and in children. Audiology

1990;29(6):322-8.

Maw AR, Tiwari RS. Children with glue ear: how do

they present? Clin Otolaryngol 1988 Jun;13(3):

171-7.

McPherson B, Knox E. Test-retest variability using the

Liverpool screening audiometer in a field

environment. Br J Audiol 1992 Apr;26(2):139-41.

McRorie TI, Bosso J, Randolph L. Aminoglycoside

ototoxicity in cystic fibrosis. Evaluation by high

frequency audiometry. Am J Dis Child 1989;

143(11):1328-32.

Mertens H, Schwenk B. [Diagnosis and incidence of

recurrence of chronic tubal secretory otitis media in

childhood]. HNO 1988 Dec;36(12):507-10. (Ger).

Meyer S, Hugo R, Louw B, Grimbeek RJ. Screening for

middle-ear disease in schools for hearing-impaired

children. Int J Pediatr Otorhinolaryngol 1989

May;17(2):163-70.

Mitchell DB, Ford GR, Albert D, Waldron J. Acoustic

reflectometry as an aid to the diagnosis of glue ear.

Br J Clin Pract 1990 Dec;44(12):557-9.

Moller H, Tos M. Daily impedance audiometric

screening of children. Scand Audiol 1992;21(1):

9-14.

Molteno CD, Hollingshead J, Moodie AD, Bradshaw D,

Bowie MD, Willoughby W. Preschool development

of coloured children in Cape Town. S Afr Med

J 1991 Jun 1;79(11):665-70.

Moore JM. Hearing assessment of deaf blind children

using behavioral conditioning. Semin Hear 1990;

11(4):385-92.

Moore JM, Thompson G, Folsom RC. Auditory

responsiveness of premature infants utilizing visual

reinforcement audiometry (VRA). Ear Hear 1992

Jun;13(3):187-94.

Mora JA, Exposito M, Solis C, Barajas JJ. Filter effects

and low stimulation rate on the middle latency

response in newborns. Audiology 1990;

29(6):329-35.

Mrazek J. [Predictive value of tympanometry and

impedance audiometry in children up to 3 years of

age]. Cesk Otolaryngol 1988 May;37(3):198-205.

(Cze).

Mrazek J, Mullerova M. [Indications and significance of

impedance audiometry, tympanometry and BERA

(brainstem evoked response audiometry) in

screening for hearing defects in very young children

and handicapped children]. Cesk Otolaryngol 1988

Mar;37(2):88-95. (Cze).

Mutton PE, Beckenham EJ, Gibson WP, Ditton JE,

Downes JE. When the diagnosis of deafness is

wrong. Med J Aust 1992 Oct 5;157(7):483-4.

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. I.

Methods and process of the mass screening

examination for hearing]. Nippon Koshu Eisei

Zasshi 1992 Feb;39(2):101-4. (Jpn).

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. II.

Screening items and risk factors of hearing

impairment]. Nippon Koshu Eisei Zasshi 1992 Mar;

39(3):153-7. (Jpn).

Nishioka K, Naito Y, Okano K, Kiguchi M, Saito C,

Maeta M, Masuda Y, Ogura Y, Ohsaki K, Aoyama

H. [Studies on screening for hard-of-hearing

children by questionnaire. 1. Screening of 1-year-6-

month-old children in conjunction with the physical

examination of the Ministry of Health and Welfare].

Nippon Jibiinkoka Gakkai Kaiho 1988 Jun;91(6):

856-64. (Jpn).

Northern JL, Gerkin KP. New technology in infant

hearing screening. Otolaryngol Clin North Am 1989

Feb;22(1):75-87.

Ogisi FO. Impedance screening for otitis media with

effusion in Nigerian children. J Laryngol Otol

1988;102(11):986-8.

Painton SW. Automatic immittance audiometry on

children with transtympanic ventilation tubes. Ear

Hear 1989;10(3):209-10.

Park IY, Shim YJ, Kim HN, Kim YM. Test-retest

differences and assistive function in detecting conductive hearing loss of impedance audiometry.

Yonsei Med J 1988;29(2):124-8.

Parving A. Paediatric audiological medicine - a survey

from a regional department. J Audiol Med 1992;

1(2):99-111.

Parving A, Christensen B. Children younger than 4

years of age, referred to an audiological department.

Int J Pediatr Otorhinolaryngol 1992

Mar;23(2):161-70.

Pearce PS, Saunders MA, Creighton DE, Sauve RS.

Hearing and verbal-cognitive abilities in high-risk

preterm infants prone to otitis media with effusion. J

Dev Behav Pediatr 1988 Dec;9(6):346-51.

Penaloza-Lopez Y, Reyna-Lopez V, Poblano-Luna A.

[Early detection of pre-linguistic deafness]. Bol Med

Hosp Infant Mex 1988 Mar;45(3):155-60. (Spa).

Pensak ML, Keity RW, St John Dignan P, Stowens DW,

Towbin RB, Katbamna B. Neuroaudiologic

abnormalities in patients with Type 1

neurofibromatosis. Laryngoscope 1989;99(7 Pt 1):

702-6.

Portmann C, Delaroche M. [On infantile audiometry: the

Bordeaux strategy]. Rev Laryngol Otol Rhinol

(Bord) 1991;112(1):27-31. (Fre).

Precerutti G. [Diagnostic method: the crib-o-gram].

Otorinolaringol Pediatr 1992;3(3):275-82. (Ita).

Prijs VF. Evaluation of electrocochleographic audiogram

determination in infants. Acta Otolaryngol Suppl

(Stockh) 1991;482:27-33; discussion 34-5.

Primus MA. Infant thresholds with enhanced attention to

the signal in visual reinforcement audiometry. J

Speech Hear Res 1988 Sep;31(3):480-4.

Primus MA. Repeated infant thresholds in operant and

nonoperant audiometric procedures. Ear Hear 1991;

12(2):119-22.

Primus MA. The role of localization in visual

reinforcement audiometry. J Speech Hear Res 1992;

35(5):1137-41.

Pruszewicz A, Obrebowski A, Swidzinski P. [Objective

topographic diagnosis of damage of the organ of

hearing]. Otolaryngol Pol 1990;44(6):409-15. (Pol).

Rahko T, Karma P. Pure tone hearing thresholds in

otologically healthy 5 year old children in Finland.

Arch Otorhinolaryngol 1989;246(3):137-41.

Reed BD, Lutz LJ. Household smoking

exposure--association with middle ear effusions.

Fam Med 1988 Nov-Dec;20(6):426-30.

Robinson DO, et al. Infant tympanometry: differential

results by race. J Speech Hear Disord 1988 Aug;

53(3):341-6.

Rodriguez J, Suarez Fernandez T. [Audiologic

evaluation of children by auditory responses of the

brainstem]. An Esp Pediatr 1989 Jan;30(1):32-6.

(Spa).

Romagnoli M, Tessitore E, Doyno MG. [Otitis media in

the neonatal period: tympanometric diagnosis in

relation to otoscopy]. Acta Otorhinolaryngol Ital

1988;8 Suppl 19:79-86. (Ita).

Roush J, Drake A, Sexton JE. Identification of middle

ear dysfunction in young children: a comparison of

tympanometric screening procedures. Ear Hear 1992

Apr;13(2):63-9.

Ryndina AM, Grachev KV, Slesarenko NP, Utianova

TA, Tsvyleva ID. [Comparative studies of hearing in

children by recording reflex reactions and

long-latency auditory evoked potentials]. Vestn

Otorinolaringol 1990 Mar-Apr;(2):18-21. (Rus).

Sagalovich BM, Shimanskaia EI. [Age-related

characteristics of dynamic indicators of acoustic

impedance of the middle ear in children]. Vestn

Otorinolaringol 1992 May-Jun;(3):9-13. (Rus).

Salamy A, Eldredge L, Tooley WH. Neonatal status and

hearing loss in high-risk infants. J Pediatr 1989

May;114(5):847-52. Comment in: J Pediatr 1990

Feb;116(2):316.

Sasama R. Hearing threshold investigations in infants

and children. Audiology 1990;29(2):76-84.

Savinova TV, Tarasova GD, Solov’eva GV, Danilova

OI. [Acoustic impedance measurement in the

diagnosis of hypoacusis in children]. Vestn

Otorinolaringol 1990 Sep-Oct;(5):72-4. (Rus).

Schmidt PH. [Mother knows best; diagnosis of

prelingual deafness]. Ned Tijdschr Geneeskd 1992

Jul 18;136(29):1388-9. (Dut).

Schwartz J, Otto D. Lead and minor hearing

impairment. Arch Environ Health 1991;46(5): 300-5.

Sejna I, Vydrova J, Cerna O, Kredba V, Votruba V.

[Hearing and treatment of neonates with

gentamycin]. Cesk Pediatr 1991 Jan;46(1):28-30.

(Cze).

Silman S, Silverman CA, Arick DS.

Acoustic-immittance screening for detection of

middle-ear effusion in children. J Am Acad Audiol

1992 Jul;3(4):262-8.

Smyth V, Scott J, Tudehope D. The utility of the

auditory brainstem response as a screening

procedure. Int J Pediatr Otorhinolaryngol 1990

Mar;19(1):45-55.

Stapells DR, Galambos R, Costello JA, Makeig S.

Inconsistency of auditory middle latency and steady

state responses in infants. Electroencephalogr Clin

Neurophysiol 1988;71(4):289-95.

Stapells DR, Kurtzberg D. Evoked potential assessment

of auditory system integrity in infants. Clin Perinatol

1991 Sep;18(3):497-518.

Stein LK, Kraus N. Auditory evoked potentials with

special populations. Semin Hear 1988;9(1):35-45.

Strachan DP. Impedance tympanometry and the home

environment in seven year old children. J Laryngol

Otol 1990;104(1):4-8.

Stuart A, Durieux Smith A, Stenstrom R. Critical

differences in aided sound field thresholds in

children. J Speech Hear Res 1990;33(3):612-5.

Szyfter W. [Determining the low-frequency auditory

threshold by studying the auditory response evoked

by acoustic stimulation with 40 Hz (40 Hz MLR)].

Otolaryngol Pol 1988;42(5):350-5. (Pol).

Teele DW, Stewart IA, Teele JH, Smith DK,

Tregonning SJ. Acoustic reflectometry for

assessment of hearing loss in children with middle

ear effusion. Pediatr Infect Dis J 1990 Dec;9(12):

870-2.

Therien F. Otitis and hearing loss among northern

Quebec Inuit. Arctic Med Res 1988;47 Suppl 1:

657-8.

Thompson M, Thompson G, Vethivelu S.

A comparison of audiometric test methods for 2

year old children. J Speech Hear Disord 1989;

54(2):174-9.

Thompson MD, Thompson G. Early identification of

hearing loss: listen to parents. Clin Pediatr (Phila)

1991 Feb;30(2):77-80.

Trehub SE, et al. Observational measures of auditory

sensitivity in early infancy. Dev Psychol 1991 Jan;

27(1):40-9.

Tucker SM, Bhattacharya J. Screening of hearing

impairment in the newborn using the auditory

response cradle. Arch Dis Child 1992 Jul;67(7):

911-9.

Tudehope D, Smyth V, Scott J, Rogers Y. Audiological

evaluation of very low birthweight infants.

J Paediatr Child Health 1992 Apr;28(2):172-5.

Van Den Broek P, Rach GH, Zielhuis GA. [Is otitis

media with effusion harmful for language

development in young children]. Ned Tijdschr

Geneeskd 1988 Oct 8;132(41):1885-8. (Dut).

Wallace IF. Role of developmental evaluations in

assessing auditory system integrity. Semin Hear

1989;10(3):262-71.

Ward S. The predictive validity and accuracy of a

screening test for language delay and auditory

perceptual disorder. Eur J Disord Commun 1992;

27(1):55-72.

Weatherly RA, Owens JJ, Catlin FI, Mahoney DH.

Cis-platinum ototoxicity in children. Laryngoscope

1991 Sep;101(9):917-24.

Westwood GF, Bamford JM. Probe-tube microphone

measurements with very young infants. Br J Audiol

1992;26(3):143-51.

Widen JE. Behavioral screening of high risk infants

using visual reinforcement audiometry. Semin Hear

1990;11(4):342-56.

Wild NJ, Sheppard S, Smithells RW, Holzel H, Jones G.

Delayed detection of congenital hearing loss in high

risk infants. BMJ 1990 Oct 20;301(6757): 903-5.

Comment in: BMJ 1990 Nov 17;301(6761): 1164-5,

and BMJ 1990 Dec 8;301(6764):1332-3.

Wilmot JF, Cable HR. Persistent effusion following

acute otitis media: tympanometry and pneumatic

otoscopy in diagnosis. J R Coll Gen Pract 1988

Apr;38(309):149-52.

Wilson WR, Richardson MA. Behavioral audiometry.

Otolaryngol Clin North Am 1991 Apr;24(2): 285-97.

Wolthers OD. Tympanometric screening in children on

admission to a paediatric ward: a preliminary study.

Int J Pediatr Otorhinolaryngol 1990;19(3):251-7.

Yokoyama T, Okada I. Hearing screening in health

examination services for young children at health

centers in Japan. Eur Arch Otorhinolaryngol 1990;

247(5):305-11.

Yoshimi K. [Early hearing screening for brain

impairment baby--Crib-O-Gram]. Nippon Jibiinkoka

Gakkai Kaiho 1989 Sep;92(9):1436-44. (Jpn).

Zielhuis GA, Bootsma-Knippenbergh W,

Groenendijk-Bemelmans H, Van Den Broek P.

[Results of the Ewing screening test and the risk of

otitis media with effusion in children of preschool

age]. Ned Tijdschr Geneeskd 1989 May 20;133(20):

1030-3. (Dut).

Zielhuis GA, Rach GH, Van Den Broek P. Screening

for otitis media with effusion in preschool children.

Lancet 1989;1(8633):311-4.

MODELS/PROGRAMS FOR EARLY

IDENTIFICATION AND FOLLOW-UP

Augustsson I, Nilson C, Engstrand I. The preventive

value of audiometric screening of preschool and

young school-children. Int J Pediatr

Otorhinolaryngol 1990 Sep;20(1):51-62.

Aust G, Foll U, Lutt B, Schaffrath R. [Hearing handicap

in childhood--responsibilities of public health, early

diagnosis]. Off Gesundheitswes 1989 Jan;51(1):2-6.

(Ger).

Baart de la Faille LM. Validity of large scale

standardised behavioural screening. Acta

Otolaryngol Suppl (Stockh) 1991;482:94-101;

discussion 102.

Bock GR, Iurato S. EEC hearing impairment

programme: collaboration in Europe, 1974-1988.

ORL J Otorhinolaryngol Relat Spec 1988;50(6):

349-54.

Bonny IC. Five years’ experience of combined

impedance and audiometric screening at school

entry. Public Health 1989 Nov;103(6):427-31.

Brown J. Screening infants for hearing loss--an

economic evaluation. J Epidemiol Community

Health 1992 Aug;46(4):350-6.

Cluver LP, Hodges A. Comprehensive public school

hearing health plan: screening, follow-up, teacher

inservice. Paper presented at: Annual Meeting of the

American Speech-Language-Hearing Association;

1990 Nov 16-19; Seattle, WA. 13 p. Available

from: ERIC, Arlington, VA.

Colver AF. Health surveillance of preschool children:

four years’ experience. BMJ 1990 May 12;

300(6734):1246-8.

Dhont G, Blontrock J. [Results of screening for hearing

disorders using the Ewing test]. Acta

Otorhinolaryngol Belg 1988;42(3):319-26. (Dut).

Diamond KE, Le Furgy WG. Screening for

developmental handicaps: outcomes from an early

childhood screening program. Phys Occup Ther

Pediatr 1988;8(1):43-59.

Diefendorf AO, Renshaw JJ, Cox JB, Reitz PS. Infant

hearing screening. Ear Nose Throat J 1992 Oct;

71(10):503-7.

Filipo R, De Seta E, Orlando MP. [Auditory screening

strategy]. Otorinolaringol Pediatr 1992;3(3):169-91.

(Ita).

Gannon M. Which children fail hearing tests? Midwife

Health Visit Community Nurse 1988 May;24(5):

184-8.

Gottlieb B. [Health visiting. Hearing loss in young

children can easily be overlooked]. Sygeplejersken

1991 Oct 16;91(42):14-5. (Dan).

Grundy-Wheeler NJ, Manners TD, Sharples PE. The

introduction of a formal paediatric screening

programme into an army general practice. J R Army

Med Corps 1988 Jun;134(2):76-8.

Gustason G. Early identification of hearing-impaired

infants: a review of Israeli and American progress.

Volta Rev 1989 Oct-Nov;91(6):291-5.

Haggard M. Screening children’s hearing [editorial].

Br J Audiol 1992 Aug;26(4):209-15.

Haggard MP. Hearing screening in children--state of the

art(s). Arch Dis Child 1990 Nov;65(11):1193-5.

Comment in: Arch Dis Child 1991 Apr;66(4):558.

Haggard MP, McCormick B, Gannon MM, Spencer H.

The paediatric otological caseload resulting from

improved screening in the first year of life. Clin

Otolaryngol 1992 Feb;17(1):34-43.

Hall DM, Garner J. Feasibility of screening all neonates

for hearing loss. Arch Dis Child 1988 Jun;63(6):

652-3.

Holsgrove G. Testing hearing in childhood. Practitioner

1991 Oct;235(1507):724, 726, 728-9.

Holtby I. Screening for hearing loss in children.

Midwife Health Visit Community Nurse 1988 Jun;

24(6):218-9.

Hutchison T, Nicoll A. Developmental screening and

surveillance. Br J Hosp Med 1988 Jan;39(1):22-4,

28-9.

Jacobson CA, Jacobson JT. Follow-up services in

newborn hearing screening programs. J Am Acad

Audiol 1990 Oct;1(4):181-6.

Jacobson GP, Burtka MJ, Wharton JA, Newman CW,

Shepherd N, Turner RG. Infant hearing screening

1984 to 1989: the Henry Ford Hospital experience.

Henry Ford Hosp Med J 1990;38(1):39-43.

Johnson A. Screening tests for sensorineural deafness.

Nurs Times 1990 Oct 31-Nov 6;86(44):52-3.

Johnson A, Ashurst H. Screening for sensorineural

deafness by health visitors. The Steering Committee,

Oxford Region Child Development Project. Arch

Dis Child 1990 Aug;65(8):841-5.

Malphurs O Jr. Infant hearing screening in Mississippi. J

Miss State Med Assoc 1989 Aug;30(8):245-8.

Mauk GW, White KR, Mortensen LB, Behrens TR. The

effectiveness of screening programs based on

high-risk characteristics in early identification of

hearing impairment. Ear Hear 1991 Oct;12(5):

312-9.

Molteno CD, Hollingshead J, Moodie AD, Bradshaw D,

Bowie MD, Willoughby W. Preschool development

of coloured children in Cape Town. S Afr Med

J 1991 Jun 1;79(11):665-70.

Moore WG, Josephson JA, Mauk GW. Identification of

children with hearing impairments: a baseline

survey. Volta Rev 1991 May;93(4):187-96.

Myer CM 3d. The role of a hearing impaired clinic in

pediatric otology. Scand Audiol Suppl 1988;30:

133-4.

Nishi M, Hamajima I, Uemura T. [Mass screening for

detection of infants with hearing impairment. I.

Methods and process of the mass screening

examination for hearing]. Nippon Koshu Eisei

Zasshi 1992 Feb;39(2):101-4. (Jpn).

Nishioka K, Naito Y, Okano K, Kiguchi M, Saito C,

Maeta M, Masuda Y, Ogura Y, Ohsaki K, Aoyama

H. [Studies on screening for hard-of-hearing

children by questionnaire. 1. Screening of 1-year-6-

month-old children in conjunction with the physical

examination of the Ministry of Health and Welfare].

Nippon Jibiinkoka Gakkai Kaiho 1988 Jun;91(6):

856-64. (Jpn).

Palti H, Haustein D, Gofin R, Knishkowy B, Adler B.

Process and outcome evaluation of preventive care

for infants in two types of practices. J Community

Health 1989 Winter;14(4):243-54.

Parker L. Discharge planning and follow-up care: the

asphyxiated infant. NAACOGS Clin Issu Perinat

Womens Health Nurs 1991;2(1):111-59.

Parving A, Christensen B. On criteria for hearing

impairment in children. Int J Pediatr

Otorhinolaryngol 1992 Jul;24(1):1-9.

Periodic health examination, 1989 update: 3. Preschool

examination for developmental, visual and hearing

problems. Canadian Task Force on the Periodic

Health Examination. Can Med Assoc J 1989 Dec 1;

141(11):1136-40.

[Periodic medical examination: update 1989. 3.

Diagnostic examination of the problems of

development and visual and hearing deficits in

preschool age children. The Canadian Study Group

on Periodic Medical Examination]. Union Med Can

1990 Sep-Oct;119(5):248-53. (Fre).

Radu HJ. [Screening tests in childhood. Hearing

screening--a necessity?] Laryngol Rhinol Otol

(Stuttg) 1988 Jun;67(6):304-6. (Ger).

Rasmussen NH, Lee KD. [Screening of preschool

children. A multidisciplinary assessment of the

development and rehabilitation needs]. Ugeskr

Laeger 1990 Nov 26;152(48):3616-9. (Dan).

Rice B. Study on preschool vision, hearing and

developmental screening [letter]. Pediatr Nurs 1988

Nov-Dec;14(6):537.

Robins DS. New approaches to infant hearing screening.

Neonatal Intensive Care 1991 Jan-Feb; 4(1):38-40,

46, 50.

Rona RJ, Reynolds A, Allsop M, Morris RW, Morgan

M, Mandalia S. Audit from preschool developmental

surveillance of vision, hearing, and language

referrals. Arch Dis Child 1991 Aug; 66(8):921-6.

Ruppert ES, Buhrer K. Ohio’s infant hearing screening

and assessment program. A decade in development.

Clin Pediatr (Phila) 1992 Jan;31(1):19-22.

Scanlon PE, Bamford JM. Early identification of hearing

loss: screening and surveillance methods. Arch Dis

Child 1990 May;65(5):479-84; discussion 484-5.

Comment in: Arch Dis Child 1990 Oct;

65(10):1183.

Smith GC, Powell A, Reynolds K, Campbell CA. The

five year school medical--time for change. Arch Dis

Child 1990 Feb;65(2):225-7. Comment in: Arch Dis

Child 1990 Aug;65(8):912.

Stata K. Improving hearing screening programs in the

elementary school. Sch Nurse 1988 Sep-Oct;

4(3):16-9.

Thorburn M, Desai P, Paul TJ, Malcolm L, Durkin M,

Davidson L. Identification of childhood disability in

Jamaica: evaluation of the ten question screen. Int J

Rehabil Res 1992;15(3):262-70.

Thorburn MJ, Desai P, Paul TJ. Service needs of

children with disabilities in Jamaica. Int J Rehabil

Res 1992;15(1):31-8.

Tucker SM, Bhattacharya J. Screening of hearing

impairment in the newborn using the auditory

response cradle. Arch Dis Child 1992 Jul;67(7):

911-9.

Tuke JW. Screening and surveillance of school aged

children. BMJ 1990 May 5;300(6733):1180-2.

Comment in: BMJ 1990 Jun 9;300(6738):1528.

Watkin PM. The age of identification of childhood

deafness--improvements since the 1970s. Public

Health 1991 Jul;105(4):303-12.

Watkin PM, Baldwin M, McEnery G. Neonatal at risk

screening and the identification of deafness. Arch

Dis Child 1991 Oct;66(10 Spec No):1130-5.

Woodroffe C, Abra A. A special conditions register.

Arch Dis Child 1991;66(8):927-30.

Wynne MK, Molloy T, Bloom BT. The high-risk

register for hearing loss in Kansas: some

preliminary data. Kans Med 1992 Jun;93(6):

198-202.

Yeargin Allsopp M, Murphy CC, Oakley GP, Sikes RK,

Billings S, Bradley G, CoLeman T, Doernberg N,

Hudgins R, Edmonds B, Maloney K, Sever S,

Trevathan E. A multiple source method for studying

the prevalence of developmental disabilities in

children: the Metropolitan Atlanta Developmental

Disabilities Study. Pediatrics 1992;89(4):624-30.

Yokoyama T, Okada I. Hearing screening in health

examination services for young children at health

centers in Japan. Eur Arch Otorhinolaryngol 1990;

247(5):305-11.

Zehmisch H, Oertel G, Zehmisch S. [The early detection

of hearing disorders in infancy as a result of

interdisciplinary cooperation]. Padiatr Grenzgeb

1989;28(2):113-4. (Ger).

Zielhuis GA, Bootsma-Knippenbergh W,

Groenendijk-Bemelmans H, Van Den Broek P.

[Results of the Ewing screening test and the risk of

otitis media with effusion in children of preschool

age]. Ned Tijdschr Geneeskd 1989 May 20;133(20):

1030-3. (Dut).

OTHER

Bibliography of developmental medicine and child

neurology: selected books and articles received in

1990. Dev Med Child Neurol 1991 Apr;

33(4 Suppl 63):1-166.

Bigglestone S. Testing babies’ hearing. Nurs Times

1988 Mar 16-22;84(11):55.

Blake PE, Hall JW 3d. The status of state-wide policies

for neonatal hearing screening. J Am Acad Audiol

1990 Apr;1(2):67-74.

Brown MA, Waybrant KM. Health promotion,

education, counseling, and coordination in primary

health care nursing... nurse practitioners. Public

Health Nurs 1988 Mar;5(1):16-23.

Burns C. Health for all children. Midwife Health Visit

Community Nurse 1989 Sep;25(9):368-9.

Cotton RT, Farrer SM, Grundfast KM, Stool SE.

Detecting childhood hearing loss. Patient Care 1989

Mar 15;23(5):55-60, 63-5, 69-70 passim.

Crago MB, Hurteau AM, Ayukawa H. Culturally based

audiological services for hearing impaired Inuit in

northern Quebec. J Speech Lang Pathol Audiol 1990

Jun;14(2):33-46.

Curnock DA. The senses of the newborn. BMJ 1989

Dec 16;299(6714):1478-9.

Grundfast KM, Berkowitz RG, Conners CK, Belman P.

Complete evaluation of the child identified as a poor

listener. Int J Pediatr Otorhinolaryngol 1991

Feb;21(1):65-78.

Hood D, Frankel BG, Hood N, Younger R. Hearing

health care: will we succeed? J Otolaryngol 1990

Dec;19(6):391-5.

Jacobson JT. Issues in newborn ABR screening. J Am

Acad Audiol 1990 Jul;1(3):121-4.

Kenworthy OT. Screening for hearing impairment in

infants and young children. Semin Hear 1990;11(4):

315-32.

Kile JE, Beauchaine KL. Procedures for audiologic

assessment of infants and toddlers. Hear Instrum

1991 Jul;42(7):13-4.

Koop CE. Former Surgeon General advocates early ID

of hearing loss. ASHA 1989 Nov;31(11):53.

Madell JR. Identification and treatment of very young

children with hearing loss. Infants Young Child

1988 Oct;1(2):20-30.

Marge M. Guidelines for the prevention of

communication disorders: concepts, principles, and

models. Semin Hear 1991;12(2):93-115.

Marwick C. Seeking to detect hearing loss at earlier age

[news]. JAMA 1991 Oct 23-30;266(16):2193.

McClymont A. Patterns of prevention: an exploration of

patterns of prevention in the broad sense as they

have developed. Recent Adv Nurs 1988;22:11-32.

Morgan DE, Canalis RF. Auditory screening of infants.

Otolaryngol Clin North Am 1991 Apr;24(2): 277-84.

Morrongiello BA. Infants’ localization of sounds along

two spatial dimensions: horizontal and vertical axes.

Infant Behav Dev 1988;11(2):127-43.

Olsho LW, Koch EG, Carter EA. Nonsensory factors in

infant frequency discrimination. Infant Behav Dev

1988;11(2):205-22.

Papso CF, Blood IM. Word recognition skills of

children and adults in background noise. Ear Hear

1989;10(4):235-6.

Parving A. [Children referred to an audiology

department. Who-- why--when?] Ugeskr Laeger

1990 Dec 31;153(1):22-5. (Dan).

Phillips RR, Phelps PD. Hearing screening in

children--state of the art(s) [letter]. Arch Dis Child

1991 Apr;66(4):558. Comment on: Arch Dis Child

1990 Nov;65(11):1193-5, and Arch Dis Child 1990

Nov;65(11):1196-7.

Pirila T, Jounio-Ervasti K, Sorri M. Hearing asymmetry

among left-handed and right-handed persons in a

random population. Scand Audiol 1991;20(4):223-6.

Position statements, guidelines, definitions, reports.

ASHA 1989 Mar;31(3):83-118.

Radcliffe D. Probing the horizons of hearing: the

implications for clinicians. Hear J 1989 Apr;42(4):

9, 12-4, 16.

Riedner ED. Implications of audiologic success? [letter].

J Am Acad Audiol 1992 Jul;3(4):295-6.

Roeser RJ. Roeser disagrees with validity of VASC

screening technique [letter]. J Sch Health 1988 Sep;

58(7):266.

Roeser RJ, Adams RM, Watkins S. Cerumen

management in hearing conservation: the Dallas

(Texas) Independent School District program. J Sch

Health 1991 Jan;61(1):47-9.

Roush J, McWilliam RA. A new challenge for pediatric

audiology: Public Law 99-457. J Am Acad Audiol

1990 Oct;1(4):196-208.

Ruben RJ. Effectiveness and efficacy of early detection

of hearing impairment in children. Acta Otolaryngol

Suppl (Stockh) 1991;482:127-31; discussion 132-5.

Ruben RJ. The ontogeny of human hearing. Acta

Otolaryngol (Stockh) 1992;112(2):192-6.

Ruben RJ, Bagger-Sjoback D, Downs MP, Gravel JS,

Karakashian M, Klein JO, Morizono T, Paparella

MM. Recent advances in otitis media. Complications

and sequelae. Ann Otol Rhinol Laryngol Suppl 1989

Apr;139:46-55.

Sass-Lehrer M, Bodner-Johnson B. Public Law 99-457:

a new challenge to early intervention. Am Ann Deaf

1989;134(2):71-7.

Scanlon P. Early identification of hearing loss. Midwife

Health Visit Community Nurse 1989 Sep;25(9):362,

364, 366.

Schultz CM. Nursing roles: optimizing premature infant

outcomes. Neonatal Netw 1992 Apr;11(3):9-13.

Sullivan L. How effective is preschool vision, hearing,

and developmental screening? Pediatr Nurs 1988

May-Jun;14(3):181-3, 204.

Tate M. Deafness in babies. Midwives Chron 1989

Nov;102(1222):382-3.

Tate M. Deafness in children. Midwife Health Visit

Community Nurse 1989 Oct;25(10):438, 440-1.

Trehub SE, Schneider BA, Morrongiello BA, Thorpe

LA. Developmental changes in high-frequency

sensitivity. Audiology 1989;28(5):241-9.

Trinder J, Newman NM, Le Grande M, Whitworth F,

Kay A, Pirkis J, Jordan K. Behavioural and EEG

responses to auditory stimuli during sleep in

newborn infants and in infants aged 3 months. Biol

Psychol 1990;31(3):213-27.

Turner RG. Comparison of four hearing screening

protocols. J Am Acad Audiol 1992 May;3(3):200-7.

Turner RG. Factors that determine the cost and

performance of early identification protocols. J Am

Acad Audiol 1992 Jul;3(4):233-41.

Turner RG. Modeling the cost and performance of early

identification protocols. J Am Acad Audiol 1991

Oct;2(4):195-205. Comment in: J Am Acad Audiol

1991 Oct;2(4):193.

Turner RG. Recommended guidelines for infant hearing

screening: analysis. ASHA 1990 Sep;32(9):57-66,

70.

Werner LA, Marean GC, Halpin CF, Spetner NB,

Gillenwater JM. Infant auditory temporal acuity: gap

detection. Child Dev 1992 Apr;63(2):260-72.

Yan C. [Progress in pediatric otolaryngology]. Chung

Hua Erh Pi Yen Hou Ko Tsa Chih 1989;24(5):

294-5. (Chi).

Zorowka P, Heinemann M. [Diagnostic evaluation of

hearing disorders in childhood]. Fortschr Med

1990;108(21):25-30. (Ger).

BOOKS AND BOOK CHAPTERS

Abramovich, Solomon; Thornton, A.R.D. Electric

response audiometry in clinical practice. New York:

Churchill Livingstone; c1990. 240 p.

Arlinger, Stig., editor and translator. Manual of practical

audiometry. Vol 1. New York: Taylor & Francis;

1989. Chapter 4, Audiometry with children; p.

133-52.

Aust, Christa; Aust, Gottfried; Lutt, Barbara. Hearing in

children with metabolic diseases. In: Claussen,

Claus Frenz; Kirtane, Milind V.; Schlitter, Klaus.,

editors. Vertigo, nausea, tinnitus, and hypoacusia in

metabolic disorders. Proceedings of the 15th

Scientific Meeting of the Neurootological and

Equilibriometric Society; 1988 Mar 17-20; Bad

Kissingen, Germany. New York: Elsevier Science

Pub. Co.; 1988. p. 223-7. (International congress

series; 791).

Ballantyne, Deborah. Handbook of audiological

techniques. Troisio, Rita, illustrator. Boston:

Butterworth-Heinemann; 1990. Chapter 6,

Evaluation of hearing in children; p. 86-99.

Barajas, Jose J.; Borg, Erik, editors. Overview and

evaluation of the hearing impaired child: imaging

and audiology. 4th International Symposium on

Audiological Medicine; 1987 Nov 8-13; Puerto de la

Cruz, Canary Islands, Spain. Stockholm: Almqvist

& Wiksell Periodical Co.; [1988]. 238 p.

(Scandinavian audiology. Supplementum; 30).

Bausch, Karl Heinz. Spracherwerb und Sprachunterricht

fur Geh: orlose: Zielsetzungen und Probleme.

Tubinger (Germany): Niemeyer; 1989. 140 p.

(Reihe Germanistische Linguistik; 94). (Ger).

Bess, Fred H., editor. Hearing impairment in children.

3rd International Symposium on Childhood

Deafness; 1986 Jul 28-30; Nashville, TN. Parkton

(MD): York Press; c1988. 450 p.

Bess, Fred H.; Hall, James W., editors. Screening

children for auditory function. Nashville (TN): Bill

Wilkerson Center Press; c1992. 539 p.

Blagoveshchenskaia, Nataliia S. Otonevrologicheskie

simptomy i sindromy. Izd. 2nd ed. dop. i perer.

Moscow: Meditsina; 1990. 430 p. (Rus).

Bouillon, Jean Pierre. La surdite chez l’enfant en

France. Paris: Direction de l’Action Sociale,

Ministere de la Solidarite, de la Sante et de la

Protection Sociale; [1990?]. 336 p. (Flash

informations, numero hors serie; 177). (Fre).

Bullis, Michael, editor (Teaching Research Div., Oregon

State System of Higher Education, Monmouth, OR).

Research on the communication development of

young children with deaf-blindness. Washington:

Office of Special Education and Rehabilitative

Services; 1989. Contract No.: 300-83-0237. 175 p.

Available from: ERIC, Arlington, VA; ED328007.

Bullis, Michael; Fielding, Glen, editors (Teaching

Research Div., Oregon State System of Higher

Education, Monmouth, OR). Communication

development in young children with deaf-blindness:

literature review. Washington: Office of Special

Education and Rehabilitative Services; 1988.

Contract No.: 300-83-0237. 266 p. Available from:

ERIC, Arlington, VA; ED331214.

Dumont, Annie. L’orthophoniste et l’enfant sourd. Paris:

Masson; 1988. 163 p. (Fre).

Feagans, Lynne V., et al., editors. Attention to language

in day care attending children: a mediating factor in

the developmental effects of otitis media. Poster

presented at: 7th International Conference on Infant

Studies; 1990 Apr 19-22; Montreal, Canada. 15 p.

Available from: ERIC, Arlington, VA: ED319511.

Fritsch, Michael H.; Sommer, Annemarie. Handbook of

congenital and early onset hearing loss. New York:

Igaku-Shoin; c1991. 170 p.

Frye-Osier, John, et al. The 1985-86 Wisconsin School

District Hearing Screening Survey. Bulletin No.

8441. Madison (WI): Wisconsin Dept. of Public

Instruction, Bureau for Children with Physical

Needs; 1988. 26 p. Available from: ERIC,

Arlington, VA; ED310586.

Gans, D.P.; Gans, K.D. (School of Speech, Pathology

and Audiology, Kent State Univ., OH). Improving

auditory testing of multihandicapped children. Final

report. 1 Oct 86-30 Sep 88. Rockville (MD): Bureau

of Health Care Delivery and Assistance, Maternal

and Child Health and Crippled Children’s Services;

1989 Jan. Report No.: MCHCCS8909. Grant No.:

PHSMCJ390548. 240 p. Available from: NTIS,

Springfield, VA.; PB90147471.

Griefahn, Barbara. Audiometrie: Grundlagen, Praxis,

arbeitsmedizinische Vorsorge (G 20). Stuttgart:

Enke; 1988. 109 p. (Ger).

Guillory, Joseph A. Improving speech pathologists’

identification of conductive pathologies in preschool

and school age children through inservice training.

Fort Lauderdale (FL): Nova University; 1989.

74 p. Available from: ERIC, Arlington, VA;

ED335835. Ed. D. Practicum Report, Nova

University.

Hall, James W. Handbook of auditory evoked responses.

Boston: Allyn and Bacon; c1992. Chapter 14,

Newborn auditory screening; p. 475-508.

Hall, James W. Handbook of auditory evoked responses.

Boston: Allyn and Bacon; c1992. Chapter 19,

Pediatric case reports; p. 665-715.

Hamann, Karl-Friedrich, editor. Leitfaden der

Audiometrie f:ur Arzthelferinnen: mit Anhang

"H:orger:ateversorgung". 2nd ed., new and revised.

Zulpich (Germany): Biermann; [1991?]. 116 p.

(Ger).

Hoke, M. (Inst. fuer Experimentelle Audiologie,

Muenster Univ., Germany). Fruehdiagnostik von

entwicklungsstoerungen (verzoegerte reifung) des

auditorischen systems. Schlussbericht. [Early

diagnosis of development disturbances (delayed

maturation) of the auditory system. Final report].

Bonn (Germany): Bundesministerium fuer

Forschung und Technologie; 1991. Contract No.:

BMFT0709229. 77 p. Available from: NTIS,

Springfield, VA.; TIBA9200519. (Ger).

Homer, C.J. (Massachusetts General Hospital, Boston).

Evaluation of the evidence on the effectiveness of

well child care services for children. Washington:

Office of Technology Assessment; 1988 Jul. 95 p.

Available from: NTIS, Springfield, VA.;

PB88247176.

Kamehameha Schools (Honolulu, HI). Native Hawaiian

Hearing and Speech Project. Counteracting the

negative educational effects of otitis media in native

Hawaiian preschoolers. Final report. Washington:

National Institute on Disability and Rehabilitation

Research; 1991. Contract No.: HI33A90001. 81 p.

Available from: ERIC, Arlington, VA; ED345408.

Kamehameha Schools (Honolulu, HI). Native Hawaiian

hearing and speech project. Counteracting the

negative educational effects of otitis media in native

Hawaiian preschoolers. Attachments. October 1991.

Honolulu: Kamehameha Schools; 1991. 60 p.

Kamehameha Schools (Honolulu, HI). Native Hawaiian

hearing and speech project: counteracting the

negative educational effects of otitis media in native

Hawaiian preschoolers: final report, Oct 1991.

Honolulu: Kamehameha Schools; 1991. 58 p.

Kammerer, Emil. Kinderpsychiatrische Aspekte der

schweren Horschadigung. Stuttgart: Enke; 1988.

223 p. (Ger).

Katona, Gabor; Timar, Tibor; Farkas, Zsolt. ABR in

high risk neonates. In: Claussen, Claus Frenz;

Kirtane, Milind V., editors. Vertigo, nausea, tinnitus,

and hypoacusia due to head and neck trauma.

Proceedings of the 17th Scientific Meeting of the

Neurootological and Equilibriometric Society; 1990

Mar 22-25; Bad Kissingen, Germany. New York:

Elsevier Science Pub. Co.; c1991. p. 295-7.

(International congress series; 929).

Konkle, Dan F.; Jacobson, John T. Hearing loss in

newborns, infants, and young children. In:

Rintelmann, William F., editor. Hearing assessment.

2nd ed. Austin (TX): PRO-ED; c1991. p. 477- 509.

Kozlov, Mikhail IAkovlevich. Detskaia surdoaudiologiia.

Leningrad: Meditsina, Leningradskoe otd-nie; 1989.

221 p. (Rus).

Kurtzberg, Diane; Stapells, David R.; Wallace, Ina F.

Event-related potential assessment of auditory

system integrity: implications for language

development. In: Vietz, Peter M.; Vaughan, Herbert

G. Jr., editors. Early identification of infants with

developmental disabilities. Philadelphia: Grune &

Stratton; 1988. p. 160-80.

Lass, Norman J., et al., editors. Handbook of

speech-language pathology and audiology.

St. Louis: C.V. Mosby; 1988. 1399 p.

Ling, Daniel. Foundations of spoken language for

hearing-impaired children. Washington: Alexander

Graham Bell Association for the Deaf; 1988.

447 p.

Lowe, Armin. Horprufungen in der Kinderarztlichen

Praxis: eine Einfuhrung fur kinderarzte,

medizinisch-technische Assistentinnen,

Arzthelferinnen und Logopadinnen. Heidelberg:

Schindele; c1989. 135 p. (Ger).

Markowitz, Joy; Larson, John C. A longitudinal study

of children in preschool special education programs.

Rockville (MD): Montgomery County Public

Schools, Dept. of Educational Accountability; 1988.

150 p. Available from: ERIC, Arlington, VA;

ED314903.

Marschark, Marc. Psychological development of deaf

children. New York: Oxford University Press;

1993.

Martin, Frederick N. Introduction to audiology. 4th ed.

Englewood Cliffs (NJ): Prentice Hall; c1991.

Chapter 11, The pediatric patient; p. 385-423.

Martinez, Isabel, editor. El desafio de la integracion: un

centro de recursos especifico de la deficiencia

auditiva. [Spain?]: Ediciones Milan; [1990?].

184 p. (Disenos de integracion; 3). (Spa).

Maxon, Antonia; Brackett, Diane. The hearing-impaired

child: infancy through high school years. Boston:

Andover Medical Publishers; c1992. 183 p.

McCormick, Barry, editor. Paediatric audiology: 0-5

years. New York: Taylor & Francis; c1988. 354 p.

McCormick, Barry. Screening for hearing impairment in

young children. Dobbs Ferry (NY): Sheridan House;

c1988. 110 p.

Meadow, Orlans K.P.; MacTurk, R.H.; Spencer, P.E.;

Koester, L.S. (Gallaudet Univ., Washington, DC).

Interaction and support: mothers and deaf infants.

Volume 1. Chapters 1-10. Volume 2. Appendices

A-H. Final report. 1 Oct 87-31 Mar 91. Rockville

(MD): Maternal and Child Health Bureau; 1991 Jun.

Report No.: MCHCCS9107. Grant No.:

PHSMCJ110563. 266 p. Available from: NTIS,

Springfield, VA.; PB92136241.

Mergner, Thomas. Akustisch evozierte Potentiale (AEP)

in Klinik und Praxis. New York: Springer-Verlag;

c1989. 58 p. (Ger).

Newby, Hayes A.; Popelka, Gerald R. Audiology. 6th

ed. Englewood Cliffs (NJ): Prentice Hall; c1992.

Chapter 8, Pediatric audiology; p. 278-333.

Northern, Jerry L.; Downs, Marion P. Hearing in

children. 4th ed. Baltimore: Williams & Wilkins;

c1991. 418 p.

Odom, Samuel L.; McConnell, Scott R.; McEvoy, Mary

A., editors. Social competence of young children

with disabilities. Issues and strategies for

intervention. Baltimore: Paul H. Brooks Publishing

Co.; 1992. 352 p.

Peters, Herman F.M.; Starkweather, C.W., editors.

Preventie en vroege interventie bij spraak-, taal- en

hoorstoornissen. Amsterdam: Swets & Zeitlinger;

c1991. 274 p. (Dut).

Pigliacampo, Renato. Sociopsicopedagogia del bambino

sordo: una riposta protagonistica sull’educazione e

riabilitazione sino a sei anni. Urbino (Italy):

Quattroventi; c1991. 387 p. (Ita).

Resor, Louise D. The brainstem auditory revoked

response in pediatric neurologic practice. In: Owen,

Jeffrey H.; Donohoe, Charles D., editors. Clinical

atlas of auditory evoked potentials. Orlando: Grune

& Stratton; c1988. p. 63-71.

Roeser, Ross J.; Downs, Marion P., editors. Auditory

disorders in school children: identification,

remediation. 2nd ed. New York: Thieme Medical

Publishers; 1988. 371 p.

Ruben, Robert J.; Van de Water, Thomas R.; Steel,

Karen P., editors. Genetics of hearing impairment.

International Symposium on the Genetics of Hearing

Impairment; 1990 Sep 24-26; New York, N.Y. New

York: New York Academy of Sciences; 1991. 331

p. (Annals of the New York Academy of Sciences;

630).

Scherg, Michael. Akustisch evozierte Potentiale:

Grundlagen, Entstehungsmechanismen,

Quellenmodell. Stuttgart: Kohlhammer; c1991.

110 p. (Ger).

Schirmer, Barbara R. Language and cognitive

development of deaf and hearing twin sisters. In:

Martin, David S., editor. Advances in cognition,

education, and deafness. Washington: Gallaudet

University Press; 1991. [19 p.]

Schwartz, Daniel M.; Schwartz, Jamie A. Auditory

evoked potentials in clinical pediatrics. In:

Rintelmann, William F., editor. Hearing assessment.

2nd ed. Austin (TX): PRO-ED; c1991. p. 429-76.

Sparks, Shirley N., et al. Infants at risk for

communication disorders: the professional’s role in the home or center. The professional’s role with the

newborn. Leader’s guide (and) participant’s guide.

Tuscon (AZ): Communication Skill Builders; 1990.

235 p.

Strong, Carol J.; Clark, Thomas C. (Dept. of

Communicative Disorders, Utah State Univ., Logan,

UT). Project SKI*HI Outreach Programming for

Hearing Impaired Infants and Families:

recertification statement, questions, responses, and

approval. Washington: U.S. Department of

Education; 1990. 42 p. Available from: ERIC,

Arlington, VA; ED335809.

Strong, Michael, editor. Language learning and deafness.

New York: Cambridge University Press; 1988. 301

p.

Uziel, Alain; Pujol, Remy; Bock, Gregory R., editors.

Early detection of hearing impairment in children:

proceedings of a workshop held in Montpellier,

France on 21-22 November 1988. Stockholm:

Almqvist & Wiksell International; [1991]. 135 p.

(Acta oto-laryngologica. Supplement; 482).

Uzunova M; Stamatova L. Auditory blink reflex in

children with cerebral palsy. In: Claussen, Claus

Frenz; Kirtane, Milind V., editors. Vertigo, nausea,

tinnitus, and hypoacusia due to head and neck

trauma. Proceedings of the 17th Scientific Meeting

of the Neurootological and Equilibriometric Society;

1990 Mar 22-25; Bad Kissingen, Germany. New

York: Elsevier Science Pub. Co.; c1991. p. 53-6.

(International congress series; 929).

Vester, Marianne. Fysioterapi, funktion, ndvendighed:

fysioterapi til dvblinde brn og unge og till brn og

unge p~a et tidligt udviklingstrin. Dronninglund:

Forlaget Nord-Press; 1988. 79 p. (Nordisk

vejleder; 4). (Dan).

Virole, Beno it. Figures du silence: essais cliniques

autour de la surdite. Paris: Editions Universitaires;

c1990. 89 p. (Fre).

Volterra, Virginia; Erting, Carol, editors. From gesture

to language in hearing and deaf children. New York:

Springer-Verlag; c1990. 335 p. (Springer series in

language and communication; 27).

Wilson, O. J. (Southampton Univ, England). Recent

developments in frequency specific threshold

estimation in pre-school children. Technical report.

England: Inst. of Sound and Vibration Research;

1988. Report No.: ISVRTR168. 97 p. Available

from: NTIS, Springfield, VA.; PB89183826.

Wilson, Stephanie; Shaughnessy, Michael F. Neonatal

audiologic screening and test procedures.

[unpublished paper?]; 1989. 20 p. Available from:

ERIC, Arlington, VA; ED307983.

Wirth, Gunter. Sprachstorungen, Sprechstorungen,

kindliche Horstorungen: Lehrbuch fur Arzte,

Logopaden und Sprachheilpadagogen. 3rd ed.,

completely new. Cologne (Germany): Deutscher

Arzte-Verlag; 1990. 677 p. (Ger).

Wisconsin State Dept. of Public Instruction, Madison.

State Superintendent’s audiology services in the

schools. Study Committee final report and

recommendations. Bulletin No. 91374. Madison

(WI): Wisconsin Dept. of Public Instruction; 1990.

30 p. Available from: ERIC, Arlington, VA:

ED334791.

AUDIOVISUALS

Alberti P. Prognostic validity of brain stem electric

response audiometry (BERA) in children. Audio Dig

Otolaryngol Head Neck Surg [audiocassette] 1989

Oct 26;22(20):Side A [presentation 1, 7 min.]. 1

audiocassette: 1 7/8 ips.

Bess FH. Early identification of hearing loss in children.

Audio Dig Pediatr [audiocassette] 1990 Jan

23;36(2):Side B [presentation 2, 17 min.]. 1

audiocassette: 1 7/8 ips.

Brookhouser PE. Young child with hearing impairment.

Audio Dig Fam Pract [audiocassette] 1990 Dec 24;

38(48):Side A [presentation 1, 30 min].

1 audiocassette: 1 7/8 ips.

DeBartolo H Jr. Sensorineural loss in children with

vascular anomalies. Audio Dig Otolaryngol Head

Neck Surg [audiocassette] 1988 Jul 14;21(13):

Side B [presentation 2, 6 min.]. 1 audiocassette:

1 7/8 ips.

Simpson LC. Fistula in the hearing impaired child: a

common occurrence? Audio Dig Otolaryngol Head

Neck Surg [audiocassette] 1988 Jul 14;21(13):

Side A [presentation 1, 9 min.]. 1 audiocassette:

1 7/8 ips.