ObjectMon #92 MuonMonitor Slide Show

COSMICS DATA SHOULD NOT BE RUN WITH PHYSICS TCL!!!

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800 1000

Entries 41725

= 1.6 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 200 400 600 800 1000

1200

Entries 41725

Mean 0.779

= 4.9 (> 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

6000

Entries 41725 Mean -0.04769 RMS 9.159

= 2.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500

Entries 17322

= 1.6 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 1000

2000

3000

4000

5000

6000

Entries 51514 Mean 0.0033

= 2.1 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500

1000

1500

Entries 17322 Mean -0.03358 RMS 12.25

= 1.9 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 50 100 150 200 250

Entries 7118

= 1.1 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0

200 400

600

Entries 7118

Mean -0.1386

= 2.1 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

500

1000

1500

Entries 7118 Mean -0.1118 RMS 10.85

=0.78 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

COSMICS DATA SHOULD NOT BE RUN WITH PHYSICS TCL!!!

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60

Entries 1598

= 1.1 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0

50

100 150

Entries 1598

Mean -17.34

= 1.9 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 1598 Mean 0.3586 RMS 27.02

= 1.2 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 51514 Mean 2.217 RMS 1.479

= 32 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

COSMICS DATA SHOULD NOT BE RUN WITH PHYSICS TCL!!!

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800

Entries 41725 Mean 173.9 RMS 103.1

= 1.4 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 500 1000

1500

2000

2500

Entries 41725 Mean 0.003517 RMS 0.3628

= 2.3 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

6000

Entries 41725 Mean -0.04769 RMS 9.159

= 2.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 17322 Mean 173.2 RMS 102.8

= 1.6 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 200 400 600 800 1000

1200

Entries 17322 Mean 0.006462 RMS 0.3157

= 1.8 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

Entries 17322 Mean -0.03358 RMS 12.25

= 1.9 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 50 100 150 200

Entries 7118 Mean 161.4 RMS 106.6

=0.79 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300 400 500 600

Entries 7118 Mean 0.003319 RMS 0.8719

=0.87 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

500

1000

1500

Entries 7118 Mean -0.1118 RMS 10.85

=0.78 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

COSMICS DATA SHOULD NOT BE RUN WITH PHYSICS TCL!!!

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 51514 Mean 2.217 RMS 1.479

= 32 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 10 10^2

10^3

10^4

Entries 49034 Mean 1.05 RMS 1.002

= 11 (> 3) 2χ Number of Muons