wedge+we*24

0 5 10 15 20 25 30 35 40 45 strip

0

20

40

60

80

100

120

Entries 952

number of capids,ranges

0

5

10

15

20

25

30

CES strips bad channels

wedge+we*24

0 5 10 15 20 25 30 35 40 45 wire

0

10

20

30

40

50

60

Entries 729

number of capids,ranges

0

5

10

15

20

25

30

CES wires bad channels

wedge+we*24

0 5 10 15 20 25 30 35 40 45 wire

0

5

10

15

20

25

30

Entries 25

number of capids,ranges

0

5

10

15

20

25

30

CPR bad channels

wedge+we*24

0 5 10 15 20 25 30 35 40 45 pad

0 1 2 3 4 5 6 7 8 9 10 Entries 48

number of capids,ranges

0

5

10

15

20

25

30

CCR bad channels

Bad Channels for Run 187908