Turkey Point

GREEN ISLAND

73 30’

42 30’

U.S. Geological Survey Hudson River Salt Front study area.

ALBANY

KINGSTON

Rogers Point

POUGHKEEPSIE

West Point

Tellers Point

NEW YORK

CITY

NEW YORK

ALBANY

Nassau Cty

Putnam Cty

Dutchess Cty

Ulster Cty

Orange Cty

Rockland Cty

Westchester Cty

RM 0

Wallkill River

Esopus Creek Wappinger Creek

Moordener

Kill

RM 20

RM 80

RM 120

RM 140

RM 60

74 30’ 74 00’

42 00’

41 30’

41 00’

Base from U.S. Army Corps of Engineers, 1962 o

o o o o o o

Hudson River

Croton River

0 5 10 20 MILES

0 5 10 20 30 KILOMETERS

TROY

HYDE PARK

NEW HAMBURG

OSSINING

75 00’^o

RM = river miles, above the Battery

NEWBURGH

NEW YORK CITY

LLOYD

Great Sacandaga Lake

Federal Dam < RM 153 .7

CASTLETON-ON-HUDSON

RM 100

MOUNT MARION

ROSENDALE

GARDINER Clinton Point

Chelsea Pump Station

Battery

Manhattan Island LONG ISLAND

HASTINGS-ON-HUDSON

RM 40 Bowline Point

= Gage Station

HAVERSTRAW

ORANGE CO

PUTNAM CO

WESTCHESTER CO

WAPPINGER FALLS

ROCKLAND CO NEW JERSEY

CONNECTICUT

MASSACHUSETTS

ULSTER CO

Rondout Creek

SAUGERTIES

IBM

DUTCHESS CO