Phytoplankton Species Distributions

25 ml subsamples were taken from the CTD rosette sampler bottle fired nearest to the surface

(approximately 3m depth) and preserved in acidified Lugol’s iodine. Samples were stored for up to

two years before being counted.

Species identification and counting was undertaken on sedimented samples using optical microscopy.

Counting was undertaken by two individuals subcontracted to do the work.