file=1150 J.Balewski ,Wed Jul 2 09:39:26 2003

invm

Entries 0 Mean -0.2429 RMS 0.8368 Underflow 0 Overflow -1.758e+04 Integral 1.758e+04 / ndf

2χ 161.3 / 12 Constant 37.15±

2365 Mean 0.0007003 ± 0.1646 Sigma 0.0006136 ± 0.0351

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0

1000

2000

3000

4000

± ± ± ±

Difference Real-Mixed 0ener

Entries 19332 Mean 5.092 RMS 1.571 Underflow 0 Overflow -10 Integral 1.934e+04

0 2 4 6 8 10 12 14 16 18 20 0 1000

2000

3000

4000

5000

6000

7000

0ener

Difference Real-Mixed 0pt

Entries 19332 Mean 1.976 RMS 0.698 Underflow 0 Overflow -3 Integral 1.934e+04

0 1 2 3 4 5 6 7 8 9 10 0 500 1000

1500

2000

2500

3000

3500 0pt Difference Real-Mixed

0Z Entries 19332 Mean 0.5675 RMS 0.2154 Underflow 0 Overflow 0 Integral 1.933e+04

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 500 1000

1500

2000

2500

3000

3500

Difference Real-Mixed 0Ang

Entries 19332 Mean 0.09146 RMS 0.03412 Underflow 0 Overflow 0 Integral 1.933e+04

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

0

2000

4000

6000

8000

10000

Difference Real-Mixed 0eta

Entries 19332 Mean 1.596 RMS 0.2157 Underflow 0 Overflow 0 Integral 1.933e+04

0 0.5 1 1.5 2 2.5 0 1000

2000

3000

4000

5000

6000

7000

0eta

Difference Real-Mixed