This is TeX, Version 3.14159 (Web2C 7.2) (format=latex 1998.9.9)  26 NOV 2003 14:02
**GeometricFactor

! Emergency stop.
<*> GeometricFactor
                   
End of file on the terminal!

 
Here is how much of TeX's memory you used:
 2 strings out of 10978
 25 string characters out of 73677
 42021 words of memory out of 263001
 2956 multiletter control sequences out of 10000+0
 3640 words of font info for 14 fonts, out of 200000 for 1000
 14 hyphenation exceptions out of 1000
 0i,0n,0p,1b,6s stack positions out of 300i,100n,500p,30000b,4000s
No pages of output.
