This is TeX, Version 3.14159 (Web2C 7.3.1) (format=latex 2001.9.7)  3 JUL 2002 13:38
**paper
(paper.tex
LaTeX2e <2000/06/01>
Babel <v3.7h> and hyphenation patterns for american, french, german, ngerman, i
talian, nohyphenation, loaded.
(cimento.cls
Document Class: cimento 2001/06/19 v1.4g Il Nuovo Cimento
\c@section=\count79
\c@subsection=\count80
\c@subsubsection=\count81
\c@paragraph=\count82
\c@subparagraph=\count83
\c@instcnt=\count84
LaTeX Info: Redefining \MakeUppercase on input line 646.
LaTeX Info: Redefining \MakeLowercase on input line 653.
\@abstractbox@=\box26
\abovecaptionskip=\skip41
\belowcaptionskip=\skip42
\c@subequation=\count85
\eqnarraycolsep=\dimen102
\c@table=\count86
\c@figure=\count87
\@tochskip@a=\skip43
\@tochskip@b=\skip44
Class cimento Info: No configuration file on input line 1702.
Class cimento Info: No configuration file on input line 1707.
) (/usr/share/texmf/tex/latex/graphics/graphicx.sty
Package: graphicx 1999/02/16 v1.0f Enhanced LaTeX Graphics (DPC,SPQR)

(/usr/share/texmf/tex/latex/graphics/keyval.sty
Package: keyval 1999/03/16 v1.13 key=value parser (DPC)
\KV@toks@=\toks14
)
(/usr/share/texmf/tex/latex/graphics/graphics.sty
Package: graphics 1999/02/16 v1.0l Standard LaTeX Graphics (DPC,SPQR)

(/usr/share/texmf/tex/latex/graphics/trig.sty
Package: trig 1999/03/16 v1.09 sin cos tan (DPC)
)
(/usr/share/texmf/tex/latex/config/graphics.cfg)
Package graphics Info: Driver file: dvips.def on input line 80.

(/usr/share/texmf/tex/latex/graphics/dvips.def
File: dvips.def 1999/02/16 v3.0i Driver-dependant file (DPC,SPQR)
))
\Gin@req@height=\dimen103
\Gin@req@width=\dimen104
) (paper.aux)
\openout1 = `paper.aux'.

LaTeX Font Info:    Checking defaults for OML/cmm/m/it on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    Checking defaults for T1/cmr/m/n on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    Checking defaults for OT1/cmr/m/n on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    Checking defaults for OMS/cmsy/m/n on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    Checking defaults for OMX/cmex/m/n on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    Checking defaults for U/cmr/m/n on input line 38.
LaTeX Font Info:    ... okay on input line 38.
LaTeX Font Info:    External font `cmex10' loaded for size
(Font)              <7> on input line 40.
LaTeX Font Info:    External font `cmex10' loaded for size
(Font)              <5> on input line 40.
LaTeX Font Info:    External font `cmex10' loaded for size
(Font)              <9> on input line 40.
LaTeX Font Info:    External font `cmex10' loaded for size
(Font)              <6> on input line 40.


Class cimento Warning: Check-in missing.

LaTeX Font Info:    Try loading font information for OMS+cmr on input line 100.

(/usr/share/texmf/tex/latex/base/omscmr.fd
File: omscmr.fd 1999/05/25 v2.5h Standard LaTeX font definitions
)
LaTeX Font Info:    Font shape `OMS/cmr/m/n' in size <8> not available
(Font)              Font shape `OMS/cmsy/m/n' tried instead on input line 100.
 [1

]
File: dar_fluxes.eps Graphic file (type eps)
 <dar_fluxes.eps> [2]
File: detector.eps Graphic file (type eps)

<detector.eps> [3] [4]
File: ruld.eps Graphic file (type eps)
 <ruld.eps> [5]
File: r2_osc.eps Graphic file (type eps)
 <r2_osc.eps> [6]
File: elec_en_rcut.eps Graphic file (type eps)
 <elec_en_rcut.eps>
[7]
File: elec_space_rcut2.epsi Graphic file (type eps)
 <elec_space_rcut2.epsi>
File: elec_loe_rcut.eps Graphic file (type eps)
 <elec_loe_rcut.eps> [8]
File: final_result.epsi Graphic file (type eps)
 <final_result.epsi>
[9]
File: karmen_detector.epsi Graphic file (type eps)
 <karmen_detector.epsi> [10] [11]
File: karmen_data.eps Graphic file (type eps)
 <karmen_data.eps>
Underfull \vbox (badness 1168) has occurred while \output is active []

 [12]
[13]
File: lik_joint.eps Graphic file (type eps)
 <lik_joint.eps>
File: joint_plot.eps Graphic file (type eps)
 <joint_plot.eps> [14]
File: boone_tank_new.epsi Graphic file (type eps)
 <boone_tank_new.epsi> [15]
File: boone_horn.epsi Graphic file (type eps)

<boone_horn.epsi>
File: boone_fluxes.epsi Graphic file (type eps)
 <boone_fluxes.epsi> [16] [17]
File: BooNE_energy.eps Graphic file (type eps)
 <BooNE_energy.eps>
File: boone_sens0.eps Graphic file (type eps)

<boone_sens0.eps> [18] [19] [20] (paper.aux) ) 
Here is how much of TeX's memory you used:
 885 strings out of 20887
 9564 string characters out of 196275
 63645 words of memory out of 350001
 3853 multiletter control sequences out of 10000+15000
 8534 words of font info for 30 fonts, out of 400000 for 1000
 14 hyphenation exceptions out of 10000
 25i,9n,19p,685b,412s stack positions out of 3000i,100n,1500p,50000b,4000s

Output written on paper.dvi (20 pages, 58848 bytes).
