This is TeX, Version 3.14159 (Web2C 7.3.1) (format=latex 2000.7.24)  12 AUG 2005 17:32
**./images.tex
(./images.tex
LaTeX2e <1999/12/01> patch level 1
Babel <v3.6Z> and hyphenation patterns for american, french, german, ngerman, n
ohyphenation, loaded.

(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/base/article.cls
Document Class: article 1999/09/10 v1.4a Standard LaTeX document class
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/base/size11.clo
File: size11.clo 1999/09/10 v1.4a Standard LaTeX file (size option)
)
\c@part=\count79
\c@section=\count80
\c@subsection=\count81
\c@subsubsection=\count82
\c@paragraph=\count83
\c@subparagraph=\count84
\c@figure=\count85
\c@table=\count86
\abovecaptionskip=\skip41
\belowcaptionskip=\skip42
\bibindent=\dimen102
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/base/ifthen.sty
Package: ifthen 1999/09/10 v1.1b Standard LaTeX ifthen package (DPC)
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/misc/doublespace.sty) (/usr/c
mm/opt/teTex-1.0.7/share/texmf/tex/generic/misc/psfig.sty
\@unused=\write3
\ps@stream=\read1
\p@intvaluex=\dimen103
\p@intvaluey=\dimen104
psfig/tex 1.10-dvips
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/plain/dvips/epsf.tex
This is `epsf.tex' v2.7k <10 July 1997>
\epsffilein=\read2
\epsfframemargin=\dimen105
\epsfframethickness=\dimen106
\epsfrsize=\dimen107
\epsftmp=\dimen108
\epsftsize=\dimen109
\epsfxsize=\dimen110
\epsfysize=\dimen111
\pspoints=\dimen112
\epsfnoopenhelp=\toks14
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/epsfig.sty
Package: epsfig 1999/02/16 v1.7a (e)psfig emulation (SPQR)
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/graphicx.sty
Package: graphicx 1999/02/16 v1.0f Enhanced LaTeX Graphics (DPC,SPQR)
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/keyval.sty
Package: keyval 1999/03/16 v1.13 key=value parser (DPC)
\KV@toks@=\toks15
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/graphics.sty
Package: graphics 1999/02/16 v1.0l Standard LaTeX Graphics (DPC,SPQR)
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/trig.sty
Package: trig 1999/03/16 v1.09 sin cos tan (DPC)
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/config/graphics.cfg)
Package graphics Info: Driver file: dvips.def on input line 80.
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/dvips.def
File: dvips.def 1999/02/16 v3.0i Driver-dependant file (DPC,SPQR)
))
\Gin@req@height=\dimen113
\Gin@req@width=\dimen114
)
\epsfxsize=\dimen115
\epsfysize=\dimen116
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/html/html.sty
Package: html 1999/07/19 v1.38 hypertext commands for latex2html (nd, hws, rrm)

\c@lpart=\count87
\c@lchapter=\count88
\c@chapter=\count89
\c@lsection=\count90
\c@lsubsection=\count91
\c@lsubsubsection=\count92
\c@lparagraph=\count93
\c@lsubparagraph=\count94
\c@lsubsubparagraph=\count95
\ptrfile=\write4
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/misc/rotating.sty
Package: rotating 1997/09/26, v2.13 Rotation package
\c@r@tfl@t=\count96
\rot@float@box=\box26
) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/html/html.sty) (/usr/cmm/opt/
teTex-1.0.7/share/texmf/tex/generic/misc/psfig.sty) (/usr/cmm/opt/teTex-1.0.7/s
hare/texmf/tex/latex/graphics/color.sty
Package: color 1999/02/16 v1.0i Standard LaTeX Color (DPC)
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/config/color.cfg)
Package color Info: Driver file: dvips.def on input line 125.
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/graphics/dvipsnam.def
File: dvipsnam.def 1999/02/16 v3.0i Driver-dependant file (DPC,SPQR)
)) (/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/base/inputenc.sty
Package: inputenc 1999/09/17 v0.992 Input encoding file 
(/usr/cmm/opt/teTex-1.0.7/share/texmf/tex/latex/base/latin1.def
File: latin1.def 1999/09/17 v0.992 Input encoding file 
))
\sizebox=\box27
\lthtmlwrite=\write5
(images.aux)
\openout1 = `images.aux'.

LaTeX Font Info:    Checking defaults for OML/cmm/m/it on input line 129.
LaTeX Font Info:    ... okay on input line 129.
LaTeX Font Info:    Checking defaults for T1/cmr/m/n on input line 129.
LaTeX Font Info:    ... okay on input line 129.
LaTeX Font Info:    Checking defaults for OT1/cmr/m/n on input line 129.
LaTeX Font Info:    ... okay on input line 129.
LaTeX Font Info:    Checking defaults for OMS/cmsy/m/n on input line 129.
LaTeX Font Info:    ... okay on input line 129.
LaTeX Font Info:    Checking defaults for OMX/cmex/m/n on input line 129.
LaTeX Font Info:    ... okay on input line 129.
LaTeX Font Info:    Checking defaults for U/cmr/m/n on input line 129.
LaTeX Font Info:    ... okay on input line 129.

latex2htmlLength hsize=349.0pt

latex2htmlLength vsize=695.74878pt

latex2htmlLength hoffset=0.0pt

latex2htmlLength voffset=0.0pt

latex2htmlLength topmargin=0.0pt

latex2htmlLength topskip=0.00003pt

latex2htmlLength headheight=0.0pt

latex2htmlLength headsep=0.0pt

latex2htmlLength parskip=4.71457pt

latex2htmlLength oddsidemargin=54.0pt

latex2htmlLength evensidemargin=54.0pt

File: intro_sim_gifs/ho_hatom.ps Graphic file (type eps)
<intro_sim_gifs/ho_hatom.ps>
Overfull \hbox (196.95447pt too wide) in paragraph at lines 154--154
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.154 ...tom.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.154 ...tom.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.154 ...tom.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.155 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure95:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.156 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[1



]
! Too many }'s.
l.156 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.163 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_psi2.ps,angle=...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.163 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_psi2.ps,angle=...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.163 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_psi2.ps,angle=...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/ho_psi2.ps Graphic file (type eps)
<intro_sim_gifs/ho_psi2.ps>
Overfull \hbox (196.95447pt too wide) in paragraph at lines 163--163
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.163 ...si2.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.163 ...si2.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.163 ...si2.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.164 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure202:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.165 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[2


]
! Too many }'s.
l.165 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.170 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_e.ps,angle=0,h...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.170 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_e.ps,angle=0,h...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.170 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_e.ps,angle=0,h...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/ho_e.ps Graphic file (type eps)
<intro_sim_gifs/ho_e.ps>
Overfull \hbox (196.95447pt too wide) in paragraph at lines 170--170
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.170 ...o_e.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.170 ...o_e.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.170 ...o_e.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.171 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure229:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.172 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[3


]
! Too many }'s.
l.172 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.176 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_cv_versus_freq...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.176 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_cv_versus_freq...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.176 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho_cv_versus_freq...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/ho_cv_versus_frequency.ps Graphic file (type eps)
<intro_sim_gifs/ho_cv_versus_frequency.ps>
Overfull \hbox (196.95447pt too wide) in paragraph at lines 176--176
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.176 ...ncy.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.176 ...ncy.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.176 ...ncy.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.177 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure238:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.178 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[4


]
! Too many }'s.
l.178 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.183 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho.ps,angle=0,hei...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.183 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho.ps,angle=0,hei...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.183 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/ho.ps,angle=0,hei...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/ho.ps Graphic file (type eps)
<intro_sim_gifs/ho.ps>
Overfull \hbox (196.95447pt too wide) in paragraph at lines 183--183
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.183 .../ho.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.183 .../ho.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.183 .../ho.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.184 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure261:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.185 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[5


]
! Too many }'s.
l.185 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.191 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/genborn.ps,angle=...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.191 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/genborn.ps,angle=...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.191 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/genborn.ps,angle=...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/genborn.ps Graphic file (type eps)
<intro_sim_gifs/genborn.ps>
Overfull \hbox (193.719pt too wide) in paragraph at lines 191--191
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.191 ...orn.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.191 ...orn.ps,angle=0,height=4.3in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.191 ...orn.ps,angle=0,height=4.3in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.192 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure426:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.193 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[6


]
! Too many }'s.
l.193 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.204 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/pe_print.ps,angle...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.204 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/pe_print.ps,angle...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.204 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/pe_print.ps,angle...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/pe_print.ps Graphic file (type eps)
<intro_sim_gifs/pe_print.ps>
Overfull \hbox (99.4992pt too wide) in paragraph at lines 204--204
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.204 ...int.ps,angle=0,height=8.0in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.204 ...int.ps,angle=0,height=8.0in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.204 ...int.ps,angle=0,height=8.0in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.205 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure561:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.206 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[7


]
! Too many }'s.
l.206 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.211 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/coul_mmig.ps,angl...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.211 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/coul_mmig.ps,angl...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.211 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/coul_mmig.ps,angl...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/coul_mmig.ps Graphic file (type eps)
<intro_sim_gifs/coul_mmig.ps>
Overfull \hbox (43.42139pt too wide) in paragraph at lines 211--211
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.211 ...mig.ps,angle=0,height=7.0in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.211 ...mig.ps,angle=0,height=7.0in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.211 ...mig.ps,angle=0,height=7.0in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.212 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure611:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.213 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[8


]
! Too many }'s.
l.213 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.223 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/landscape2.ps,ang...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.223 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/landscape2.ps,ang...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.223 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/landscape2.ps,ang...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/landscape2.ps Graphic file (type eps)
<intro_sim_gifs/landscape2.ps>
Overfull \hbox (53.50375pt too wide) in paragraph at lines 223--223
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.223 ..._gifs/landscape2.ps,angle=0} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.223 ..._gifs/landscape2.ps,angle=0} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.223 ..._gifs/landscape2.ps,angle=0} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.224 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure631:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.225 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[9


]
! Too many }'s.
l.225 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.232 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc1_print.ps,angl...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.232 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc1_print.ps,angl...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.232 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc1_print.ps,angl...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/mc1_print.ps Graphic file (type eps)
<intro_sim_gifs/mc1_print.ps>
Overfull \hbox (777.28955pt too wide) in paragraph at lines 232--232
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.232 ...int.ps,angle=0,height=2.5in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.232 ...int.ps,angle=0,height=2.5in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.232 ...int.ps,angle=0,height=2.5in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.233 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure700:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.234 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[10


]
! Too many }'s.
l.234 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.238 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc2_print.eps,ang...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.238 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc2_print.eps,ang...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.238 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/mc2_print.eps,ang...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/mc2_print.eps Graphic file (type eps)
<intro_sim_gifs/mc2_print.eps>
Overfull \hbox (93.079pt too wide) in paragraph at lines 238--238
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.238 ...nt.eps,angle=0,height=4.0in} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.238 ...nt.eps,angle=0,height=4.0in} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.238 ...nt.eps,angle=0,height=4.0in} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.239 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure714:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.240 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[11


]
! Too many }'s.
l.240 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.245 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/nm_print.ps,angle...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.245 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/nm_print.ps,angle...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.245 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/nm_print.ps,angle...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/nm_print.ps Graphic file (type eps)
<intro_sim_gifs/nm_print.ps>
Overfull \hbox (165.53159pt too wide) in paragraph at lines 245--246
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.247 \end{figure}
                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.247 \end{figure}
                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.247 \end{figure}
                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.248 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure736:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.249 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[12


]
! Too many }'s.
l.249 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.


! LaTeX Error: Too many unprocessed floats.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.254 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/anneal.ps,angle=0...

You've lost some text.  Try typing  <return>  to proceed.
If that doesn't work, type  X <return>  to quit.

! Undefined control sequence.
\@xfloat ...@fltovf \fi \global \setbox \@currbox 
                                                  \vbox \bgroup \def \baseli...
l.254 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/anneal.ps,angle=0...
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

! Missing number, treated as zero.
<to be read again> 
                   \vbox 
l.254 \begin{figure}\centering
                              \psfig{figure=intro_sim_gifs/anneal.ps,angle=0...
A number should have been here; I inserted `0'.
(If you can't figure out why I needed to see a number,
look up `weird error' in the index to The TeXbook.)

File: intro_sim_gifs/anneal.ps Graphic file (type eps)
<intro_sim_gifs/anneal.ps>
Overfull \hbox (59.52625pt too wide) in paragraph at lines 254--254
 [][] 
 []


! LaTeX Error: \begin{document} ended by \end{figure}.

See the LaTeX manual or LaTeX Companion for explanation.
Type  H <return>  for immediate help.
 ...                                              
                                                  
l.254 ..._sim_gifs/anneal.ps,angle=0} \end{figure}
                                                  %
Your command was ignored.
Type  I <command> <return>  to replace it with another command,
or  <return>  to continue without it.

! Missing } inserted.
<inserted text> 
                }
l.254 ..._sim_gifs/anneal.ps,angle=0} \end{figure}
                                                  %
I've inserted something that you may have forgotten.
(See the <inserted text> above.)
With luck, this will get me unwedged. But if you
really didn't forget anything, try typing `2' now; then
my insertion and my current dilemma will both disappear.

! Extra \endgroup.
<recently read> \endgroup 
                          
l.254 ..._sim_gifs/anneal.ps,angle=0} \end{figure}
                                                  %
Things are pretty mixed up, but I think the worst is over.

! Too many }'s.
\lthtmlboxmathZ ...expandafter \box \next \egroup 
                                                  
l.255 \lthtmlfigureZ
                    
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

l2hSize :figure745:0.0pt::0.0pt::0.0pt.
! Undefined control sequence.
\@makecol ...up }\fi \xdef \@freelist {\@freelist 
                                                  \@midlist }\global \let \@...
l.256 \lthtmlcheckvsize\clearpage
                                 }
The control sequence at the end of the top line
of your error message was never \def'ed. If you have
misspelled it (e.g., `\hobx'), type `I' and the correct
spelling (e.g., `I\hbox'). Otherwise just continue,
and I'll forget about whatever was undefined.

[13


]
! Too many }'s.
l.256 \lthtmlcheckvsize\clearpage}
                                  
You've closed more groups than you opened.
Such booboos are generally harmless, so keep going.

(images.aux) ) 
Here is how much of TeX's memory you used:
 1521 strings out of 10901
 18721 string characters out of 71932
 63382 words of memory out of 263001
 4466 multiletter control sequences out of 10000+0
 5463 words of font info for 20 fonts, out of 400000 for 1000
 14 hyphenation exceptions out of 1000
 32i,5n,21p,622b,321s stack positions out of 300i,100n,500p,50000b,4000s

Output written on images.dvi (13 pages, 2056 bytes).
