This is TeX, Version 3.14159 (Web2C 7.3.1) (format=latex 2001.12.12)  19 JUN 2002 14:35
**xicc_expect_yield2

! Emergency stop.
<*> xicc_expect_yield2
                      
End of file on the terminal!

 
Here is how much of TeX's memory you used:
 2 strings out of 20887
 28 string characters out of 196273
 44118 words of memory out of 350001
 3028 multiletter control sequences out of 10000+15000
 3640 words of font info for 14 fonts, out of 400000 for 1000
 14 hyphenation exceptions out of 10000
 0i,0n,0p,1b,6s stack positions out of 3000i,100n,1500p,50000b,4000s
No pages of output.
