2008/2002, 5-Hz SAratio w/2%PE50yr.

123˚W

122˚W

121˚W

37˚N

37˚N

38˚N

38˚N

GMT May 23 17:04 Probabilistic SA ratio in SF Bay region. Vs30 is 760m/s. 5 Hz 2%50 yr PE. CA Qfaults red lines. Dark blue: drop > 35%

0 20 40 km 0.65

0.75

0.83

0.87

0.90

0.94

0.98

1.00

1.02

1.06

1.10

1.30

1.70SAratio