ObjectMon #92 MuonMonitor Slide Show

Run:185634 Event: 15806888 # of Events:175908 Time: Wed Jul 28 18:19:14 2004 Ref.Run:1852017

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 500 1000

1500

2000

2500

Entries 108622

=0.99 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0

1000

2000

3000

Entries 108622

Mean 0.5401

= 1.3 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

5000

10000

15000

Entries 108622 Mean -0.02351 RMS 8.729

=0.89 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 500 1000

1500

Entries 51585

=0.92 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0

5000

10000

15000

Entries 140255

Mean 0.0048

= 1 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

Entries 51585 Mean -0.01014 RMS 12.42

=0.56 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500 600 Entries 18617

=0.96 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0

500

1000

1500

Entries 18617 Mean 15.38

=0.94 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 1000

2000

3000

4000

Entries 18617 Mean 0.03911 RMS 12.5

= 1 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:185634 Event: 15806888 # of Events:175908 Time: Wed Jul 28 18:19:14 2004 Ref.Run:1852018

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

100

200

300

Entries 9019

= 1.1 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 200 400 600 800 1000

1200

Entries 9019

Mean -47.36

=0.93 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400

Entries 9019 Mean -0.3972 RMS 29.84

=0.94 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10 10^2

10^3

10^4

10^5

Entries 140255 Mean 2.498 RMS 1.779

= 2 (< 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:185634 Event: 15806888 # of Events:175908 Time: Wed Jul 28 18:19:14 2004 Ref.Run:1852016

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 500 1000

1500

2000

Entries 108622 Mean 179.8 RMS 103.7

= 1.3 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 1000

2000

3000

4000

5000

6000

Entries 108622 Mean 0.0004859 RMS 0.3547

=0.81 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

5000

10000

15000

Entries 108622 Mean -0.02351 RMS 8.729

=0.89 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

500

1000

1500

Entries 51585 Mean 178.7 RMS 103.4

= 1.4 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 1000

2000

3000

Entries 51585 Mean 0.00295 RMS 0.3114

= 1.4 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

Entries 51585 Mean -0.01014 RMS 12.42

=0.56 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500

Entries 18617 Mean 170 RMS 106

= 1.4 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

500

1000

1500

Entries 18617 Mean 0.03379 RMS 0.8637

= 1.5 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 1000

2000

3000

4000

Entries 18617 Mean 0.03911 RMS 12.5

= 1 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:185634 Event: 15806888 # of Events:175908 Time: Wed Jul 28 18:19:14 2004 Ref.Run:1852017

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10 10^2

10^3

10^4

10^5

Entries 140255 Mean 2.498 RMS 1.779

= 2 (< 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 10 10^2

10^3

10^4

10^5

Entries 140042 Mean 1.001 RMS 1.05

= 15 (> 3) 2χ Number of Muons