YMon #75 EMT EMT 1D Multiplicity of CEM East Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 0

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 1

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 2

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 3

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 4

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 5

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 6

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 7

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 8

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 9

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 10

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 11

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 12

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 13

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 14

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 15

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 16

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 17

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 18

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 19

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 20

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 21

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 22

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: East Wedge 23

YMon #74 EMT EMT 1D Multiplicity of CEM West Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 0

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 1

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 2

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 3

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: West Wedge 4

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 5

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 6

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 7

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 8

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 9

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 10

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 11

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 12

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 13

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 14

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 15

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 16

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: West Wedge 17

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 18

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 19

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 20

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 21

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0

2646 events

CEM: West Wedge 22

Tower ID

0 1 2 3 4 5 6 7 8 9

Multiplicity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 23

YMon #77 EMT EMT 1D Multiplicity of PEM East Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 0

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 1

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 2

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 3

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 4

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 5

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 6

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 7

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 8

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 9

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 10

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0

0.02

0.04

0.06

0.08

0.1 0.12

2646 events

PEM: East Wedge 11

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 12

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 13

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 14

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 15

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 16

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 17

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: East Wedge 18

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 19

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 20

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: East Wedge 21

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0

0.02

0.04

0.06

0.08

0.1^{2646 events}

PEM: East Wedge 22

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 23

YMon #76 EMT EMT 1D Multiplicity of PEM West Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 0

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 1

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.02

0.04

0.06

0.08

0.1 0.12

2646 events

PEM: West Wedge 2

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 3

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 4

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 5

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 6

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 7

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 8

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: West Wedge 9

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: West Wedge 10

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 11

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 12

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: West Wedge 13

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 14

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 15

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 16

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 17

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 18

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 19

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 20

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 21

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

2646 events

PEM: West Wedge 22

Tower ID

10 11 12 13 14 15 16 17

Multiplicity

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 23

YMon #65 EMT EMT Whole Calorimeter Occupancy

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

0 0.02

0.04

0.06

0.08 0.1 0.12

Tower (Eta) ID

-18-17-16-15-14-13-12-11-10-9-8-7-6-5-4-3-2-10 1 2 3 4 5 6 7 8 9101112131415161718

Wedge (Phi) ID

0 2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 36 38 40 42 44 46 48 EMT Whole Calorimeter Occupancy 2646 Events

0 0^1

1_0^1

2 0^1

3 0^1

4 0^1

5_0^1

6 0^1

7 0^1

8_0^1

9 0^1

10 0^1

11_0^1

12 0^1

13 0^1

14_0^1

15 0^1

16 0^1

17_0^1

18_0^1

19 0^1

20 0^1

21_0^1

22 0^1

23 0^1

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9

-9 10

-10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT Whole Calorimeter Occupancy

YMon #71 EMT EMT 1D Occupancy of CEM East Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 0

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 1

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 2

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 3

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 4

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 5

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 6

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 7

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 8

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 9

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 10

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 11

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 12

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 13

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 14

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 15

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 16

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 17

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 18

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 19

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 20

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: East Wedge 21

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: East Wedge 22

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: East Wedge 23

YMon #70 EMT EMT 1D Occupancy of CEM West Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 0

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 1

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 2

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 3

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: West Wedge 4

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 5

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 6

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 7

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 8

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 9

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 10

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 11

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 12

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 13

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 14

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 15

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 16

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: West Wedge 17

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 18

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 19

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 20

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

-3 10×^{2646 events}

CEM: West Wedge 21

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0

2646 events

CEM: West Wedge 22

Tower ID

0 1 2 3 4 5 6 7 8 9

Occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

-3 10×^{2646 events}

CEM: West Wedge 23

YMon #73 EMT EMT 1D Occupancy of PEM East Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 0

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 1

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 2

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 3

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 4

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 5

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 6

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 7

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 8

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 9

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 10

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.02

0.04

0.06

0.08

0.1

0.12

2646 events

PEM: East Wedge 11

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 12

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 13

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 14

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 15

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: East Wedge 16

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 17

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: East Wedge 18

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: East Wedge 19

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: East Wedge 20

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05^{2646 events}

PEM: East Wedge 21

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: East Wedge 22

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: East Wedge 23

YMon #72 EMT EMT 1D Occupancy of PEM West Wedges

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 0

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1 2646 events

PEM: West Wedge 1

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.02

0.04

0.06

0.08

0.1

0.12

2646 events

PEM: West Wedge 2

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 3

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 4

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 5

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: West Wedge 6

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 7

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 8

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

2646 events

PEM: West Wedge 9

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: West Wedge 10

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 11

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 12

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: West Wedge 13

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

2646 events

PEM: West Wedge 14

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 15

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 16

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

2646 events

PEM: West Wedge 17

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

0.07

2646 events

PEM: West Wedge 18

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 19

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 20

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.01

0.02

0.03

0.04

0.05

0.06

2646 events

PEM: West Wedge 21

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

2646 events

PEM: West Wedge 22

Tower ID

10 11 12 13 14 15 16 17

Occupancy

0.02

0.04

0.06

0.08

0.1 2646 events

PEM: West Wedge 23

YMon #67 EMT EMT 2D Occupancy and Multiplicity Plots

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

2646 Events 2646 Events

YMon #68 EMT EMT 2D Occupancy/Leading Edge Time of CEM

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

-5 10

-4 10

-3 10

Tower (Eta) ID

-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8 9 10

Wedge (Phi) ID

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 EMT 2D Occupancy of CEM 2646 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9 -9 West East

EMT 2D Occupancy of CEM

0 200 400 600 800 1000

1200

1400

1600

Tower (Eta) ID

-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8 9 10

Wedge (Phi) ID

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 EMT 2D Leading Edge Time of CEM 2646 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9 -9 West East

EMT 2D Leading Edge Time of CEM

YMon #69 EMT EMT 2D Occupancy/Leading Edge Time of PEM

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

-2 10

-1 10

Tower (Eta) ID

-8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

Wedge (Phi) ID

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 EMT 2D Occupancy of PEM 2646 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

10 -10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT 2D Occupancy of PEM

600

700

800

900 1000

1100

1200

Tower (Eta) ID

-8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

Wedge (Phi) ID

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 EMT 2D Leading Edge Time of PEM 2646 Events

0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23

10 -10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT 2D Leading Edge Time of PEM

YMon #78 EMT EMT Leading Edge Time of CEM

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

2646 events

EMT Leading Edge Time of West CEM

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

0.001

0.002

0.003

0.004

0.005

2646 events

EMT Leading Edge Time of East CEM

YMon #79 EMT EMT Leading Edge Time of PEM

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

0.1

0.2

0.3

0.4 0.5

0.6 2646 events

EMT Leading Edge Time of West PEM

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

0.1

0.2

0.3

0.4

0.5 2646 events

EMT Leading Edge Time of East PEM

YMon #66 EMT EMT Summary Plots

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Time (ns)

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

0.2

0.4

0.6

0.8

1

2646 events

EMT Leading Edge Time Distribution

0 200 400 600 800 1000

1200

1400

1600

Tower (Eta) ID

-18 -17 -16 -15 -14 -13 -12 -11-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18

Wedge (Phi) ID

0 2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 36 38 40 42 44 46 48 EMT Leading Edge Time Distribution 2646 Events

0 0^1

1 0^1

2 0^1

3 0^1

4 0^1

5 0^1

6 0^1

7 0^1

8 0^1

9 0^1

10 0^1

11 0^1

12 0^1

13 0^1

14 0^1

15 0^1

16 0^1

17 0^1

18 0^1

19 0^1

20 0^1

21 0^1

22 0^1

23 0^1

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9

-9 10

-10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT Leading Edge Time Distribution

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0.1

0.2

0.3

0.4

0.5

-3 10× 2646 events

EMT Average Occupancy per channel for CEM TDC’s

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45

0.02

0.025

0.03

0.035

0.04

0.045

0.05

2646 events

EMT Average Occupancy per channel for PEM TDC’s

YMon #80 EMT EMT Width Distribution

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:14 2007

Time (ns)

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5 2646 events

EMT Width Distribution

0 10 20 30 40 50 60 70

Tower (Eta) ID

-18 -17 -16 -15 -14 -13 -12 -11-10 -9 -8 -7 -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18

Wedge (Phi) ID

0 2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 36 38 40 42 44 46 48 2646 Events

0 0^1

1 0^1

2 0^1

3 0^1

4 0^1

5 0^1

6 0^1

7 0^1

8 0^1

9 0^1

10 0^1

11 0^1

12 0^1

13 0^1

14 0^1

15 0^1

16 0^1

17 0^1

18 0^1

19 0^1

20 0^1

21 0^1

22 0^1

23 0^1

0 0 1 -1 2

-2 3

-3 4

-4 5

-5 6

-6 7

-7 8

-8 9

-9 10

-10 11

-11 12

-12 13

-13 14

-14 15

-15 16

-16 17 -17 West East

EMT Width Distribution

YMon #128 Slides ETDC Slide

Run:236652 Event: 504641 # of Events:2646 Time: Fri Mar 16 07:58:15 2007

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0.1

0.2

0.3

0.4

0.5

-3 10×^{2646 events}

EMT Average Occupancy per channel for CEM TDC’s

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45

0.02

0.025

0.03

0.035

0.04

0.045

0.05

2646 events

EMT Average Occupancy per channel for PEM TDC’s