ObjectMon #2 TimeMonitor HADTDC Timing

Run:164200 Event: 769385 # of Events:8232 Time: Wed Jun 4 18:28:59 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 44304

CHA: Eff.

KS=0.00068 (<0.01) BAD

raw time [ns]

550 560 570 580

Events

0 500 1000

1500

2000

2500

Entries 49774 Mean 565.9 RMS 6.936

CHA: Raw Time /ndf= 6.4 (<15) 2χ GOOD

Nent = 49774 0.04 ± Mean = 566 0.03 ± RMS = 6.7

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

6000

7000

Entries 49774 Mean 55.63 RMS 2.514

CHA: Hit Width

/ndf= 13 (<15) 2χ GOOD

Nent = 49774 0.01 ± Mean = 56 0.01 ± RMS = 2.4

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 45340

PHA: Eff. KS= 0 (<0.01) BAD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

Entries 58901 Mean 560 RMS 6.865

PHA: Raw Time /ndf= 4.9 (<15) 2χ GOOD

Nent = 58901 0.03 ± Mean = 560 0.03 ± RMS = 6.7

Width [ns]

50 55 60 65

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Entries 58901 Mean 57.34 RMS 2.803

PHA: Hit Width

/ndf= 5.6 (<15) 2χ GOOD

Nent = 30601 0.02 ± Mean = 57 0.02 ± RMS = 2.5

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 16445 Mean 1.684 RMS 0.7638

WHA: Eff.

KS=6.1e-14 (<0.01) BAD

raw time [ns]

540 550 560 570 580

Events

0 100 200 300 400 500 600 700 800

Entries 19072 Mean 564.3 RMS 8.244

WHA: Raw Time /ndf= 1.9 (<15) 2χ GOOD

Nent = 19072 0.07 ± Mean = 564 0.07 ± RMS = 7.8

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

RawWidthWHA Entries 19072 Mean 54.24 RMS 2.863

WHA: Hit Width /ndf= 1.6 (<15) 2χ GOOD

Nent = 19072 0.02 ± Mean = 54 0.02 ± RMS = 2.7