TrigMon #148 L1TriggerMonitor 1.3.3: L1 DCAS-ADMEM comparisons

Run:224521 Event: 16553859 # of Events:23684 Time: Mon Oct 9 08:11:20 2006

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24

0 20 40 60 80 100 120 140 160 180 200 Et tower in DCAS != ADMEM: Em E

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100

0

500

1000

1500

2000

2500

3 10× DCAS trigger tower Et vs ADMEM Em E

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24

0

1

2

3

4

5

6 Et tower in DCAS != ADMEM: Had E

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100

0 200 400 600 800 1000

1200

1400

1600 3 10× DCAS trigger tower Et vs ADMEM Had E