ObjectMon #2 TimeMonitor HADTDC Timing

Run:179260 Event: 260796 # of Events:2554 Time: Fri Feb 20 20:47:02 2004 Ref.Run:177485

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 18108

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

Entries 20077 Mean 565.5 RMS 7.422

CHA: Raw Time /ndf= 2.2 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

Entries 20077 Mean 55.5 RMS 2.558

CHA: Hit Width

/ndf= 2.3 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 13776

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

Entries 16804 Mean 560.5 RMS 6.222

PHA: Raw Time /ndf= 1.2 (<15) 2χ GOOD

Width [ns]

50 55 60 65

Events

0 500 1000

1500

2000

2500

Entries 16804 Mean 57.17 RMS 2.816

PHA: Hit Width /ndf= 1 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 5929 Mean 1.682 RMS 0.7662

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 50 100 150 200 250 300

Entries 6979 Mean 563.5 RMS 8.259

WHA: Raw Time /ndf= 1.6 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 100 200 300 400 500 600 700 800

RawWidthWHA Entries 6979 Mean 54.32 RMS 2.988

WHA: Hit Width /ndf= 1 (<15) 2χ GOOD