Run Wedge Channel Cap Range Detector

Slope

(Ref)

Slope

212576 11 W 1 2 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 1 2 3 CHA 0.03125± 0.42500 0.00000 212576 11 W 1 2 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 1 2 5 CHA 0.00781± 0.10625 0.00000 212576 11 W 1 2 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 1 2 7 CHA 0.00195± 0.02773 0.00000 212576 11 W 1 3 0 CHA 0.25000± 3.40000 0.00000 212576 11 W 1 3 1 CHA 0.12500± 1.70000 0.00000 212576 11 W 1 3 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 1 3 3 CHA 0.03125± 0.42500 0.00000

212576 11 W 1 3 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 1 3 5 CHA 0.00781± 0.10625 0.00000 212576 11 W 1 3 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 1 3 7 CHA 0.00195± 0.02773 0.00000 212576 11 W 2 0 0 CHA 0.25000± 3.40000 0.00000 212576 11 W 2 0 1 CHA 0.12500± 1.70000 0.00000 212576 11 W 2 0 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 2 0 3 CHA 0.03125± 0.42500 0.00000 212576 11 W 2 0 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 2 0 5 CHA 0.00781± 0.10625 0.00000

212576 11 W 2 0 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 2 0 7 CHA 0.00195± 0.02773 0.00000 212576 11 W 2 1 0 CHA 0.25000± 3.40000 0.00000 212576 11 W 2 1 1 CHA 0.12500± 1.70000 0.00000 212576 11 W 2 1 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 2 1 3 CHA 0.03125± 0.42500 0.00000 212576 11 W 2 1 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 2 1 5 CHA 0.00781± 0.10625 0.00000 212576 11 W 2 1 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 2 1 7 CHA 0.00195± 0.02773 0.00000

212576 11 W 2 2 0 CHA 0.25000± 3.40000 0.00000 212576 11 W 2 2 1 CHA 0.12500± 1.70000 0.00000 212576 11 W 2 2 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 2 2 3 CHA 0.03125± 0.42500 0.00000 212576 11 W 2 2 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 2 2 5 CHA 0.00781± 0.10625 0.00000 212576 11 W 2 2 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 2 2 7 CHA 0.00195± 0.02773 0.00000 212576 11 W 2 3 0 CHA 0.25000± 3.40000 0.00000 212576 11 W 2 3 1 CHA 0.12500± 1.70000 0.00000

212576 11 W 2 3 2 CHA 0.06250± 0.85000 0.00000 212576 11 W 2 3 3 CHA 0.03125± 0.42500 0.00000 212576 11 W 2 3 4 CHA 0.01562± 0.21250 0.00000 212576 11 W 2 3 5 CHA 0.00781± 0.10625 0.00000 212576 11 W 2 3 6 CHA 0.00391± 0.05313 0.00000 212576 11 W 2 3 7 CHA 0.00195± 0.02773 0.00000 212576 11 W 0 0 0 CEM 0.25000± 3.40000 0.00000 212576 11 W 0 0 1 CEM 0.12500± 1.70000 0.00000 212576 11 W 0 0 2 CEM 0.06250± 0.85000 0.00000 212576 11 W 0 0 3 CEM 0.03125± 0.42500 0.00000