0 100 200 300 400 500 600 700 800

Run: 116036 Eta Tower - Number of CSL events = 14810

0 2 4 6 8 10 12 14 16 18 20 22 24

Phi Em Tower

0 2 4 6 8 10 12 14 16 18 20 22 24 TRGSim++: DCAS Em Tower Occupancy

0 100 200 300 400 500 600 700 800 900

Run: 116036 Eta Tower - Number of CSL events = 14810

0 2 4 6 8 10 12 14 16 18 20 22 24

Phi Had Tower

0 2 4 6 8 10 12 14 16 18 20 22 24 TRGSim++: DCAS Had Tower Occupancy

0 100 200 300 400 500 600 700

Run: 116036 Eta Tower - Number of CSL events = 14810

0 2 4 6 8 10 12 14 16 18 20 22 24

Phi Em Tower

0 2 4 6 8 10 12 14 16 18 20 22 24 TRGSim++: DCAS Em Tower Sim vs Data

0 100 200 300 400 500 600 700 800

Run: 116036 Eta Tower - Number of CSL events = 14810

0 2 4 6 8 10 12 14 16 18 20 22 24

Phi Had Tower

0 2 4 6 8 10 12 14 16 18 20 22 24 TRGSim++: DCAS Had Tower Sim vs Data

TrigMon #3 CalTriggerMonitor DCAS Occupancy / TrigSim Comparisons

Run:116036 Event: 946967 # of Events:14810 Time: Sun May 27 09:50:04 2001