ObjectMon #2 TimeMonitor HADTDC Timing

Run:194043 Event: 1059652 # of Events:13699 Time: Fri Feb 18 10:55:22 2005 Ref.Run:191783

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 71246

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580 590

Events

0 500 1000

1500

2000

2500

3000

3500

4000

Entries 74142 Mean 569 RMS 7.302

CHA: Raw Time /ndf= 1.3 (<16) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 74142 Mean 55.41 RMS 2.621

CHA: Hit Width

/ndf= 13 (<16) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 84565

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

Entries 108572 Mean 561.9 RMS 6.016

PHA: Raw Time /ndf= 1.4 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 108572 Mean 56.95 RMS 2.661

PHA: Hit Width

/ndf= 3.4 (<17) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 23802 Mean 1.839 RMS 0.682

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

Entries 25450 Mean 565.8 RMS 7.822

WHA: Raw Time /ndf= 2.1 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

RawWidthWHA Entries 25450 Mean 54.33 RMS 2.62

WHA: Hit Width /ndf= 1.7 (<15) 2χ GOOD