ObjectMon #2 TimeMonitor HADTDC Timing

Run:185172 Event: 9419398 # of Events:3899 Time: Wed Jul 14 05:48:31 2004 Ref.Run:184778

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 31818

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

Entries 35510 Mean 564.5 RMS 7.229

CHA: Raw Time /ndf= 1.6 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

Entries 35510 Mean 55.44 RMS 2.55

CHA: Hit Width

/ndf= 11 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 23296

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 200 400 600 800 1000

1200

1400

1600

1800

Entries 29642 Mean 559.7 RMS 6.169

PHA: Raw Time /ndf=0.89 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 29642 Mean 56.91 RMS 2.705

PHA: Hit Width

/ndf= 6.8 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 10672 Mean 1.69 RMS 0.7637

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 100 200 300 400 500

Entries 12361 Mean 562.2 RMS 8.094

WHA: Raw Time /ndf= 1.3 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 200 400 600 800 1000

1200

1400

1600

RawWidthWHA Entries 12361 Mean 54.27 RMS 2.785

WHA: Hit Width /ndf= 4.9 (<15) 2χ GOOD