ObjectMon #2 TimeMonitor HADTDC Timing

Run:186306 Event: 7842460 # of Events:24817 Time: Tue Aug 17 08:35:46 2004 Ref.Run:185777

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 175665

CHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

Entries 190909 Mean 565.1 RMS 7.019

CHA: Raw Time /ndf= 11 (<19) 2χ GOOD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

Entries 190909 Mean 55.6 RMS 2.535

CHA: Hit Width

/ndf= 3.7 (<19) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 128709

PHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

Entries 161462 Mean 560.1 RMS 6.089

PHA: Raw Time /ndf= 14 (<18) 2χ GOOD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

Entries 161462 Mean 57.01 RMS 2.615

PHA: Hit Width

/ndf= 1.3 (<18) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 56055 Mean 1.688 RMS 0.7622

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

Entries 63396 Mean 563 RMS 7.891

WHA: Raw Time /ndf= 6 (<16) 2χ GOOD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

RawWidthWHA Entries 63396 Mean 54.44 RMS 2.685

WHA: Hit Width /ndf= 1.1 (<16) 2χ GOOD