ObjectMon #2 TimeMonitor HADTDC Timing

Run:162310 Event: 1549540 # of Events:32408 Time: Wed Apr 30 12:15:49 2003

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffCHA Entries 207554 Mean 1.644 RMS 0.785

CHA: Eff. KS=0.88 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

t0RawCHA

Entries 231234 Mean 568.6 RMS 7.015

CHA: Raw Time /ndf= 3.4 (<15) 2χ GOOD

Width [ns]

50 52 54 56 58 60 62

Events

0 5000

10000

15000

20000

25000

30000

35000

RawWidthCHA

Entries 231234 Mean 55.58 RMS 2.339

CHA: Hit Width

/ndf= 1.8 (<15) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffPHA75 Entries 195102 Mean 5.612 RMS 2.551

PHA: Eff. KS=0.15 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

t0RawPHA

Entries 255202 Mean 562.4 RMS 6.832

PHA: Raw Time /ndf= 1.6 (<15) 2χ GOOD

Nent = 67552 0.03 ± Mean = 562 0.03 ± RMS = 6.7

Width [ns]

50 55 60 65

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

RawWidthPHA

Entries 255202 Mean 57.32 RMS 2.784

PHA: Hit Width

/ndf= 10 (<15) 2χ GOOD

Nent = 28451 0.02 ± Mean = 57 0.02 ± RMS = 2.5

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 69356 Mean 1.663 RMS 0.7733

WHA: Eff. KS=0.99 (>0.01) GOOD

raw time [ns]

550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

t0RawWHA

Entries 78935 Mean 566.1 RMS 7.823

WHA: Raw Time /ndf= 1.3 (<15) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

RawWidthWHA Entries 78935 Mean 54.23 RMS 2.833

WHA: Hit Width

/ndf= 2.3 (<15) 2χ GOOD