ObjectMon #91 MuonMonitor Slide Show

Run:163064 Event: 11753937 # of Events:99950 Time: Sun May 18 07:51:37 2003

Entries 35285

ϕ 0 100 200 300 0 200 400 600 800 = 1.3 (< 3) 2χ (Stub) ϕ CMU Entries 35285

Mean -0.161

z [cm]

-200 -100 0 100 200 0 200 400 600 800 1000

Entries 35285

= 1.4 (< 3) 2χ CMU Z (Stub) Entries 35285

Mean -0.0351 RMS 9.154

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

Entries 35285

=0.89 (< 3) 2χ xΔ CMU

Entries 13679

ϕ 0 100 200 300 0 100 200 300 400 = 1.3 (< 3) 2χ (Stub) ϕ CMP Entries 39076

Mean 0.0095

T charge/p

-1 -0.5 0 0.5 1 0 500 1000

1500

2000

Entries 39076

=0.92 (< 3) 2χ T Charge/p^{Entries 13679}_{Mean 0.1127}

RMS 13.31

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

1200

Entries 13679 Mean 0.1127

= 1 (< 3) 2χ xΔ CMP

Entries 2434

ϕ 0 100 200 300 0 20 40 60 80 100 =0.97 (< 3) 2χ (Stub) ϕ CMX Entries 2434 Mean -14.25

z [cm]

-400 -200 0 200 400 0 50 100 150 200

Entries 2434

= 1.5 (< 3) 2χ CMX Z (Stub) Entries 2434

Mean -0.3355 RMS 19.81

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200

Entries 2434

= 1.5 (< 3) 2χ xΔ CMX

ObjectMon #92 MuonMonitor Slide Show 1

Run:163064 Event: 11753937 # of Events:99950 Time: Sun May 18 07:51:37 2003

Entries 39076 Mean 1.852 RMS 1.077

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

=0.48 (< 3) 2χ Muon Type

ObjectMon #88 MuonMonitor Muons by System

Run:163064 Event: 11753937 # of Events:99950 Time: Sun May 18 07:51:36 2003

Entries 35285 Mean 175.9 RMS 104

ϕ 0 100 200 300 0 100 200 300 400 500 600 = 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 35285}_{Mean -0.007061}

RMS 0.3645

η -2 -1 0 1 2 0 500 1000

1500

2000

Entries 35285 Mean -0.007061

=0.67 (< 3) 2χ η Muon CMU ^{Entries 35285}_{Mean -0.0351}

RMS 9.154

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

Entries 35285 Mean -0.0351

=0.89 (< 3) 2χ xΔ CMU

Entries 13679 Mean 171.6 RMS 103.6

ϕ 0 100 200 300 0 50 100 150 200 250 300 =0.89 (< 3) 2χ ϕ Muon CMP ^{Entries 13679}_{Mean -0.002559}

RMS 0.3115

η -2 -1 0 1 2 0 200 400 600 800

Entries 13679 Mean -0.002559

=0.61 (< 3) 2χ η Muon CMP ^{Entries 13679}_{Mean 0.1127}

RMS 13.31

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

1200

Entries 13679 Mean 0.1127

= 1 (< 3) 2χ xΔ CMP

Entries 2434 Mean 161.2 RMS 106.2

ϕ 0 100 200 300 0 20 40 60 = 1.1 (< 3) 2χ ϕ Muon CMX ^{Entries 2434}_{Mean -0.01908}

RMS 0.8404

η -2 -1 0 1 2 0 50 100 150 200

Entries 2434 Mean -0.01908

=0.74 (< 3) 2χ η Muon CMX ^{Entries 2434}_{Mean -0.3355}

RMS 19.81

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200

Entries 2434 Mean -0.3355

= 1.5 (< 3) 2χ xΔ CMX

ObjectMon #90 MuonMonitor Muons Generic

Run:163064 Event: 11753937 # of Events:99950 Time: Sun May 18 07:51:37 2003

Entries 39076 Mean 1.852 RMS 1.077

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

=0.48 (< 3) 2χ Muon Type

Entries 99950 Mean 0.3908 RMS 0.7594

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

10^5

= 6 (> 3) 2χ Number of Muons