ObjectMon #2 TimeMonitor HADTDC Timing

Run:196948 Event: 538034 # of Events:16190 Time: Mon Apr 25 16:54:17 2005 Ref.Run:196352

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 92695

CHA: Eff. Eff. Check Ok

GOOD

corrected time [ns]

-10 -5 0 5

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 92695 Mean -1.22 RMS 3.931

CHA: Corr. Time /ndf= 1.4 (<17) 2χ GOOD

Width [ns]

0 20 40 60

Events

1 10 210 310 410

Entries 93154 Mean 56.4 RMS 3.817

CHA: Hit Width

/ndf= 1.6 (<17) 2χ GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 100490

PHA: Eff. Eff. Check Ok

GOOD

corrected time [ns]

-10 -5 0 5

Events

0 1000

2000

3000

4000

5000

6000

7000

Entries 120004 Mean -0.9684 RMS 3.247

PHA: Corr. Time /ndf= 5.8 (<17) 2χ GOOD

Width [ns]

0 20 40 60

Events

1 10 210 310 410

Entries 121751 Mean 58.37 RMS 4.317

PHA: Hit Width

/ndf= 2.2 (<17) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 27938

WHA: Eff. Eff. Check Ok

GOOD

corrected time [ns]

-10 -5 0 5 10

Events

0 200 400 600 800 1000

1200

1400

Entries 27938 Mean -1.158 RMS 4.353

WHA: Corr. Time /ndf= 1.4 (<15) 2χ GOOD

Width [ns]

0 20 40 60

Events

1 10 210 310

Entries 29127 Mean 55.97 RMS 4.937

WHA: Hit Width /ndf= 5.6 (<15) 2χ GOOD