adc13 Entries 11651 Mean 42.13 RMS 6.307 Underflow 0 Overflow 0

ADC Counts

10 20 30 40 50 60 70 80 90 100 0

500

1000

1500

2000

2500 adc13

adc13tCut Entries 6164 Mean 44.99 RMS 6.774 Underflow 0 Overflow 0

ADC Counts in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0

100

200

300

400 500 adc13tCut

adc13notCut Entries 5487 Mean 38.91 RMS 3.659 Underflow 0 Overflow 0

ADC Counts not in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0 200 400 600 800 1000

1200

1400

1600

1800

2000 adc13notCut

tdc13 Entries 53760 Mean 433.2 RMS 300.2 Underflow 0 Overflow 0

TDC hits

200 400 600 800 1000 0 100 200 300 400 500 600 700 800 900 tdc13 adc17 Entries 11651 Mean 53.15 RMS 6.161 Underflow 0 Overflow 0

ADC Counts

10 20 30 40 50 60 70 80 90 100 0

200

400

600

800

1000 adc17

adc17tCut Entries 8959 Mean 54.5 RMS 5.992 Underflow 0 Overflow 0

ADC Counts in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0 100 200 300 400 500 600 700

adc17notCut Entries 2692 Mean 48.66 RMS 4.307 Underflow 0 Overflow 0

ADC Counts not in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0

100

200

300

400 500 adc17notCut

tdc17 Entries 63487 Mean 445.7 RMS 294.6 Underflow 0 Overflow 0

TDC hits

200 400 600 800 1000 0 200 400 600 800 1000

1200

1400

1600 tdc17