Advertisement

In Admin:

The worst security problems? We can’t tell from the FBI’s top 20 list

Linux vs. Windows installation comparo, Part 3

In Programming:

Variety is the spyce of Python

How to add spyce to your life

In Desktop:

MainActor delivers but needs a better supporting cast

Linux vs. Windows installation comparo, Part 3

In Core Linux:

Linus Torvalds answers 10 goofy questions

Knoppix makes a great GUI installer for Debian

Linux printing made easy, Part 2

Configuring CUPS -- even for unsupported printers

Summary

configuration -- namely adding and managing printers, even unsupported ones, with CUPS’s Web-based interface. (1,200 words)

n the last edition ofAsk the Geek, I talked about the basics of the Common Unix Printing System (CUPS). The CUPS software is unique because it offers a universal, standards-compliant printing system for Linux/Unix. This week, I will discuss CUPS configuration, especially adding and managing printers with the Web-based interface.

console-based interface by default. When you install CUPS via RPM, it should start automatically. To verify that the cupsd daemon is running, execute the following as root:

/etc/rc.d/init.d/cups
status

as output, you are ready to explore the Web interface:

cups: Scheduler is running.

/etc/rc.d/init.d/cups start

                                                      http://localhost:631/.

The :631 tells your browser to attach to port631 instead of the standard Web port,80. When you connect to the above URL (on the machine you installed the CUPS software on, naturally), you should see the screen displayed in Figure 1.

About us

feedback Privacy Terms of use Advertise