Instrument Description:
Instrument name:
Instrument type:
Instrument Description:
Time for Labor:
Charged at $ 0.50 per minute ($30.00 an hour)
Date:	Job description:	Time:	Charge:
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
		00:00	$0.00
Totals:		00:00	$0.00
This document and all graphics are ©2015 by Robert D. English. All rights reserved.