Instrument Description:
Instrument name:
Instrument type:
Instrument Description:
Materials:
Part:	Description:	Amount:	Source:	Price Each:	Price:
Body Blank:				$0.00	$0.00
Body Top:				$0.00	$0.00
Neck Back:				$0.00	$0.00
Fingerboard:				$0.00	$0.00
Carbon fiber Reinforcements:				$0.00	$0.00
Headstock Top:				$0.00	$0.00
Headstock Back:				$0.00	$0.00
Binding Stock 1:				$0.00	$0.00
Inlay Stock 1:				$0.00	$0.00
Pick Guard Stock 1:				$0.00	$0.00
Total charge for materials:					$0.00
Hardware:
Part:	Description:	Amount:	Source:	Price Each:	Price:
Truss Rod:				$0.00	$0.00
Tuners:				$0.00	$0.00
String Retainers:				$0.00	$0.00
Truss Rod Cover Screws:				$0.00	$0.00
Nut:				$0.00	$0.00
Bridge:				$0.00	$0.00
Tail Piece:				$0.00	$0.00
Strap Holders:				$0.00	$0.00
Pickup Mounts:				$0.00	$0.00
Pickup Mounting Screws:				$0.00	$0.00
Jack Plate:				$0.00	$0.00
Total charge for hardware:					$0.00
Electronics:
	Description:	Amount:	Source:	Price Each:	Price:
Jack:				$0.00	$0.00
Pickup 1:				$0.00	$0.00
Potentiometer 1:				$0.00	$0.00
Switch 1:				$0.00	$0.00
Resistor 1:				$0.00	$0.00
Capacitor 1:				$0.00	$0.00
Henry Coil 1:				$0.00	$0.00
Terminal Block:				$0.00	$0.00
Pre-Amp:				$0.00	$0.00
Battery jack:				$0.00	$0.00
Battery Holder:				$0.00	$0.00
Total charge for Electronics:					$0.00
Total Parts Charges:
Item:	Price:
Total charge for materials	$0.00
Total charge for hardware:	$0.00
Total charge for electronics	$0.00
Grand total for parts and materials:	$0.00
This document and all graphics are ©2015 by Robert D. English. All rights reserved.