System	Arch			Dynamic	Comprehensive			Failwell	Outcome
	32bit	64bit	RISC		Drv.	Conf.	Maint.
RM CC4	Yes	Yes	No	No	Yes	Partial	No	No
MS SCCM	Yes	Yes	No	No	Yes	Yes	Yes	?	Recommended
Mandriva Pulse	Yes	Yes	Yes	No	No	Yes	Yes	?